\begin{table} %T5
\par
%\centering
\par
\caption{\label{tab:L} Summary of cluster parameters for EdS model $H_{0}=50$, $q_{0}=0.5$.  
Spectral fitting errors, L, $\beta $ and $r_{\rm c}$ are 1$\sigma$ on one 
parameter. Fluxes are the measured, absorbed fluxes in ROSAT 
band. Fract$_{r}$ is the fractional correction made from the spectral 
extraction region, to the total counts within the $r_{\rm v}$ radius 
after accounting for point source excision, inter-chip gaps loss 
etc.. The 3rd \& 4th rows summarise the data for the case when the
core region has been excised from the
cluster core. (Except for RX~J1701.3, where following the CHANDRA data, we excise a cooling flow enhancement to 120~kpc). } 
\begin{tabular}{l l l l l l l l l}\hline\hline 
&RX~J0337.7&RX~J0505.3&RX~J0847.2&RX~J1120.1&RX~J1325.5&RX~J1334.3&RX~J1354.2&RX~J1701.3\\ \hline 
Centroid RA & 03:37:45&05:05:19& 08:47:10&11:20:07&13:25:37&13:34:20&13:54:17&17:01:24\\ 
Centroid Dec& --25:22:32&--28:48:50&+34:48:54&+43:18:04&--38:25:44&+50:31:02&--02:21:44&  +64:14:12 \\ \hline 
&&\multicolumn{5}{c}{Cooling flow excised}&&\\ \hline
$T_{x}^{\rm cf}$ (keV)& 2.52 & 2.56 & 3.91 & 5.35 & 3.77 & 4.98 & 3.86 & 4.8\\  
& $\rm ^{+0.36}_{-0.32}$ & $\pm$0.3 & $\rm ^{+0.5}_{-0.35}$ & $\rm ^{+0.42}_{-.32}$ & $\rm ^{+0.4}_{-0.36}$ &$\rm ^{+0.26}_{-0.32}$ & $\rm ^{+0.62}_{-0.55}$ & $\rm ^{+1.9}_{-1.3}$\\ \hline 
$L_{\rm bol}^{\rm cf}$~10$^{44}$ & 1.91 & 1.97 & 3.89 & 13.7 & 4.2 & 9.47 & 5.3 & 10.2\\ 
 erg s$^{-1}$ & $\pm$0.17 & $\pm$0.16 & $\pm$0.7 & $\pm$0.23 &
 $\pm$0.8 & $\pm$0.24 & $\pm$0.4 & $\pm$1.1 \\\hline  
&&\multicolumn{5}{c}{No cooling flow excision}&&\\ \hline
$T_{x}$ (keV)& 2.6 & 2.5 & 3.62 & 5.45 & 4.15 & 5.20 & 3.66 & 4.5\\  
& $\pm$0.35& $\pm$0.3 & $\rm ^{+0.58}_{-0.51}$ & $\pm$0.3 &$\rm ^{+0.4}_{-0.3}$ &  
$\rm ^{+0.26}_{-0.28}$ & $\rm ^{+0.6}_{-0.5}$ & $\rm ^{+1.5}_{-1.0}$\\ \hline 
$L_{\rm bol}$~10$^{44}$ & 1.97 & 2.03 & 4.07 & 14.4 & 4.5 & 9.59 & 5.18 & 11.1\\ 
 erg s$^{-1}$ & $\pm$0.1 & $\pm$0.11 & $\pm$0.2 & $\pm$0.2 & $\pm$0.7 &  
$\pm$0.27 & $\pm$0.3 & $\pm$1.0 \\\hline 
Flux (0.5--2)& 4.37 & 5.64 & 7.04 & 24.5 & 8.0 &14.1 &9.8 &24 \\ 
10$^{-14}$cgs & $\pm$0.2 & $\pm$0.2 & $\pm$0.3 & $\pm$0.54 & $\pm 0.03 $ &  
$\pm$0.2 & $\pm$0.5 & $\rm ^{+1.5}_{-1.2}$\\ \hline
\nh (10$^{20}$ )&0.99&1.5&3.2&2.1&4.8&1.05&3.4&2.6 \\
(atom cm$^{-2}$)&&&&&&&& \\\hline 
$\beta$ & 0.76 & 0.66 & 0.81 & 0.77 & 0.64 & 0.66 & 0.68 & 0.64\\ 
& $\rm ^{+0.08}_{-0.04}$ &$\rm ^{+0.05}_{-0.04}$ &$\pm$0.045&$\pm$0.03&$\rm ^{+0.09}_{-0.07}$&$\pm$0.02&$\pm$0.055&$\pm 0.05$\\\hline 
$r_{\rm c}$ (kpc)&145&164&307&209&115&154&248&204\\ 
$h_{50}^{-1}$&$\pm$18&$\pm$17&$\pm$30&$\rm ^{+9}_{-8}$&$\pm
20$&$\pm$10&$\rm ^{+36}_{-26}$&{\em fixed}\\\hline 
Abundance &0.38&0.17&0.30&0.47&0.31&0.15&0.25&0.24\\ 
(Z)&$\pm$0.09 &$\pm$0.08&$\pm$0.28&$\pm$0.09&$\rm ^{+0.19}_{-0.17}$ & $\pm$0.08  
& $\pm$0.14 & $\pm 0.2$\\\hline 
$z$ (optical) &0.577 &0.51&0.56&0.60&0.445&0.62&0.551&0.45\\ \hline 
Normaln.& 1.68 & 2.12 &2.65 &9.42 & 2.7 &5.61 &4.01 & 5.58 \\ 
Mekal 10$^{-4}$& $\pm$0.10 & $\pm$0.08&$\rm ^{+0.12}_{-0.11}$ &$\rm ^{+0.23}_{-0.17}$  
&$\rm ^{+0.08}_{-0.07}$ &$\pm$0.16 &$\rm ^{+0.14}_{-0.23}$ &$\rm ^{+0.50}_{-0.40}$\\ \hline 
Radius ($''$)& 120 & 120 & 120 & 145 &90 & 120 & 120 & 120\\ 
Spect. extract.&&&&&&&&\\ \hline 
Fract$_{r}$ counts  & 0.90 & 0.87 & 0.79 & 0.965 & 0.52 & 0.84 & 0.83 & 0.81\\ 
within $r_{\rm v}$&&&&&&&&\\ \hline
\par
\end{tabular}  
\end{table}