\begin{table}%t2
\caption{Model parameters for cores with axial asymmetry.}\label{tab:run_params}
%\centerline
 {\begin{tabular}{cccccc}
\hline
\hline
Model ID & $A$ & $p$ & $e$ & $M_{\rm core}/M_\odot$ & 
$\tau_{\rm V}(\theta = 0\degr)$ \\ \hline
2.1 & 28 & 4 & 1.5 & 1.4 & 94 \\
2.2 & 81 & 4 & 2.5 & 3.4 & 94 \\
2.3 & 28 & 1 & 1.5 & 2.4 & 94 \\
2.4 & 81 & 1 & 2.5 & 6.3 & 94 \\
\hline
\end{tabular}}
\begin{list}{}{}
\item[$e$:] south-to-north pole optical depth ratio.
\item[$M_{\rm core}$:] core mass.
\item[$\tau_V(\theta = 0\degr)$:] visual optical depth from the 
centre to the surface of the core along the pole ($\theta=0\degr$).
\end{list}
\end{table}