\begin{table}%t9
\caption{Observed fluxes estimated in the case of the model resulting from combined EPIC-MOS data fitted with the two-temperature model, in the case of the warm local absorption model. \label{fluxes}}
%\centering
\par
\begin{tabular}{cccc}
\hline \hline
Energy & April 2002 & Sept. 2002 & Variability\\
(keV) & (erg~cm$^{-2}$~s$^{-1}$) & (erg~cm$^{-2}$~s$^{-1}$) &  \\
\hline
0.8--10.0 & 4.61 $\times$ 10$^{-13}$ & 3.30 $\times$ 10$^{-13}$ & $\sim$27\% \\
0.8--1.0 & 0.66 $\times$ 10$^{-13}$ & 0.53 $\times$ 10$^{-13}$ & $\sim$20\% \\
1.0--5.0 & 3.24 $\times$ 10$^{-13}$ & 2.33 $\times$ 10$^{-13}$ & $\sim$28\% \\
\hline
\end{tabular}
\end{table}