\begin{table}%t8
\caption{EPIC-MOS and EPIC-pn count rates obtained for HD~168112 during the two {\it XMM-Newton} observations between 0.4 and 10.0~keV. The error bars represent the 1-$\sigma$ confidence interval.\label{cr}}
%\centering
\par
\begin{tabular}{lrrr}
\hline \hline
	& \multicolumn{3}{c}{EPIC} \\
\cline{2-4}
Observation & \multicolumn{1}{c}{MOS1} & \multicolumn{1}{c}{MOS2} & \multicolumn{1}{c}{pn} \\
	& \multicolumn{1}{c}{(cts~s$^{-1}$)} & \multicolumn{1}{c}{(cts~s$^{-1}$)}
 & \multicolumn{1}{c}{(cts~s$^{-1}$)} \\
\hline
April 2002 & 0.060 & 0.057 & 0.157 \\
  & $\pm$0.003 & $\pm$0.003 & $\pm$0.006 \\
Sept. 2002 & 0.037 & 0.039 & 0.111 \\
  & $\pm$0.002 & $\pm$0.002 & $\pm$0.004 \\
\hline
\end{tabular}
\end{table}