\begin{table}%t1
 %\centering
\par
\caption{Photometry of the three EROs 1269, 822 and 850.
{ Magnitudes are in the Vega system. Colors are measured within the 
aperture defined by the $K$s-band isophote. 
The $K$s-band magnitude is the MAG\_AUTO measured by Sextractor.}}\label{t1}
 {\begin{tabular}{lccccccccc}
\hline
\hline
  Object  & RA(J2000)&Dec(J2000)& $U_{300}-K$s& $B_{450}-K$s&$V_{606}-K$s& $I_{814}-K$s& $J{\rm s}-K$s& $H-K$s& $K$s\\
  \hline
HDFS\_1269&22:32:49.25&$-$60:32:11.62& $>$7.7& $7.6\pm0.5$& $6.9\pm0.2$&$5.5\pm0.1$ &$3.0\pm0.2$&$1.2\pm0.1$&$20.80\pm0.05$\\
HDFS\_822& 22:32:53.39&$-$60:31:54.33& $>$7.6& $>$7.6&      $7.0\pm0.3$&$5.7\pm0.2$ &$3.5\pm0.3$&$1.4\pm0.2$&$20.9\pm0.1$\\
HDFS\_850& 22:32:53.01&$-$60:33:57.03& $>$6.8& $>$6.8&      $7.1\pm0.3$&$5.6\pm0.2$ &$3.7\pm0.4$&$1.1\pm0.2$&$21.7\pm0.1$\\
\hline
\end{tabular}}
\end{table}