\begin{table} %T2
%%\centering
\par
\caption{Integral and differential source counts at 95~{\rm $\mu$m}.} 
\label{ci}  
$$
\begin{tabular}{l l  c  c   c c c} 
\cline{1-2}\\[-7.6mm]\\\cline{1-2}\\[-5mm]
\cline{4-7}\\[-7.6mm]\\ \cline{4-7}
\multicolumn{2}{c}{Integral}&&\multicolumn{3}{c}{Differential}\\
\cline{1-2}
\cline{4-7} 
$S$  & ${\rm d}N({>}S)$ 	&&	Flux bin &Bin center & ${\rm d}N/{\rm d}S \times S^{2.5}$ \\
{\rm mJy}   & deg$^{-2}$&&	{\rm mJy}      & {\rm mJy}       & deg$^{-2}$~{\rm mJy}$^{1.5}$   \\
\cline{1-2}
\cline{4-7} 
30    & 70.0 & & 30--100   & 54  & $2.63e4\pm 1.06e4$\\
60    & 45.7 & & 60--150   & 94  & $3.42e4\pm 1.12e4$\\
100   & 18.8 & & 100--300  & 173 & $3.79e4\pm 1.25e4$\\
\cline{4-7}
150   & 10.3 & & & & & \\
300   & 1.8  & & & & &\\
\cline{1-2}
\end{tabular}
$$
\end{table}