\begin{table}%t1
\caption{Infrared/sub-mm/mm observations of IRAS~05436$-$0007
collected from the literature (Sect.~\ref{sec:data}). No reddening
correction was applied. We adopt the coordinates of the 2MASS~source,
$\alpha_{2000}=5^{\rm h}46^{\rm m}13\fs13$ $\delta_{2000}=-0^{\circ}6'4\farcs8$, as
the position of the outburst star.}\label{tab:sum}
%%\centering
\par
\begin{tabular}{cccl}
\hline \hline
$\lambda$  & Flux     &  Obs.    & {\bf Name}, reference                        \\
$\mu$m     & [mJy]    &  date    &                                             \\ 
\hline
1.25       & 1.997    &  1998    & {\bf 2MASS J05461313$-$0006048}                \\
1.65       & 13.94    &  1998    & {\bf 2MASS J05461313$-$0006048}                \\ 
2.17       & 50.96    &  1998    & {\bf 2MASS J05461313$-$0006048}                \\ 
\hline
6.7        & 267      &  1997    & ISOCAM map, ISO\_id: 68901103                \\
14.3       & 559      &  1997    & ISOCAM map, ISO\_id: 68901122                \\ 
\hline
12         & 527      &  1983    & {\bf IRAS 05436$-$0007}, PSC                   \\
25         & 1200     &  1983    & {\bf IRAS 05436$-$0007}, PSC                   \\
60         & 2000     &  1983    & {\bf IRAS 05436$-$0007}, Scanpi                \\ 
\hline
350        & 2500     &  1997    & {\bf LMZ~12}, Lis et~al. (\cite{Lis99})              \\
850        & 180      &  1998    & {\bf Ori B smm~55},   Mitchell et~al. (\cite{Mit01}) \\
1300       & 93       &  1998    & {\bf LMZ~12}, Lis et~al. (\cite{Lis99})              \\ 
\hline
\end{tabular}
\end{table}