\begin{table}%t3
%\centering
\par
\caption{X-ray sources in the \object{PSR~J0751+1807} MOS field of view.  Information includes the source identification number, right ascension and declination of the source, count rate and detection likelihood.  The detection likelihood value is the value given by "emldetect'' for detection in the two MOS cameras, corrected for the coding error in versions 4.11.15 and earlier.}
\label{tab:0751fieldsources}
\begin{tabular}{lcccc}
\hline
\hline
Src & RA (2000) & Dec (2000) & Counts/s & Like- \\ ID & $^{\rm h}$
\hspace*{3mm} $^{\rm m}$ \hspace*{3mm} $^{\rm s}$ & $^{\circ}$ \hspace*{3mm} $^\prime$
\hspace*{3mm} $^{\prime\prime}$ & $\times10^{-3}$ & lihood \\
\hline
 3  & 7 50 54.1 & 17 57  59.3 &  $5.6\pm0.8$ &  62  \\
 4  & 7 50 54.8 & 17 58  27.9 &  $5.6\pm0.8$ &  63 \\
 5  & 7 51 12.9 & 17 58  44.3 &  $4.4\pm0.6$ &  53 \\
 13 & 7 51  9.7 & 18 0   1.04 &  $3.3\pm0.5$ &  40 \\
 17 & 7 51 46.8 & 18 0   36.0 &  $6.4\pm0.8$ &  99 \\
 19 & 7 51 44.0 & 18 1   7.05 &  $3.8\pm0.7$ &  32 \\
 20 & 7 51 13.8 & 17 57  21.3 &  $3.7\pm0.7$ &  23\\
 23 & 7 50 45.1 & 18 1   30.8 & $3.5\pm0.6$ &   31 \\
 24 & 7 50 25.2 & 18 1   48.4 & $6.6\pm1.1$ &   40 \\
 25 & 7 51 26.9 & 18 2   0.08 & $6.4\pm0.6$ &   134 \\
 26 & 7 50 20.9 & 18 2   25.6 & $5.3\pm1.0$ &   34 \\
 27 & 7 50 57.4 & 18 3   19.2 & $2.8\pm0.4$ &   39 \\
 28 & 7 51  1.6 & 18 3   20.7 & $3.7\pm0.5$ &   65 \\
 29 & 7 51 35.6 & 18 3   29.6 & $4.9\pm0.6$ &   64 \\
 31 & 7 50 36.6 & 18 3   28.8 & $3.0\pm0.7$ &   18 \\
 33 & 7 51  7.9 & 18 4   21.4 & $3.6\pm0.4$ &   67 \\
 34 & 7 50 37.9 & 18 5    2.7 & $3.3\pm0.6$ &   28 \\
 36 & 7 50 52.3 & 18 5   19.1 & $2.6\pm0.4$ &   32 \\
 37 & 7 50 38.0 & 18 5   40.8 & $4.0\pm0.6$ &   48 \\
 38 & 7 50 48.1 & 18 5   55.1 & $3.3\pm0.5$ &   60 \\
 39 & 7 51 40.4 & 18 6   12.9 & $9.6\pm1.1$ &   106 \\
 40 & 7 50 49.2 & 18 6   39.9 & $2.8\pm0.4$ &   43 \\
 41 & 7 52  1.1 & 18 6   42.6 & $5.3\pm0.9$ &   38 \\
 42 & 7 51 48.5 & 18 6   44.6 & $8.3\pm0.8$ &   141 \\
 43 & 7 50 52.7 & 18 6   55.7 & $6.9\pm0.6$ &   202 \\
 44 & 7 51 13.6 & 17 56  50.7 & $6.1\pm0.9$ &   56 \\
 45 & 7 51 37.2 & 18 7   20.4 & $9.6\pm0.7$ &   255 \\
 47 & 7 51  9.1 & 18 7   36.3 & $8.9\pm0.6$ &   327 \\
 51 & 7 51  4.2 & 18 8   45.0 & $12.6\pm0.7$ &   466 \\
 52 & 7 51 17.8 & 18 8   56.4 & $36.3\pm1.2$ &   2017 \\
 55 & 7 51 51.5 & 18 9   59.2 & $4.2\pm0.6$ &   44 \\
 56 & 7 50 46.5 & 18 9   45.2 & $4.6\pm0.7$ &   56 \\
 59 & 7 50 41.7 & 18 10  26.7 &  $3.0\pm0.5$ &  37 \\
 60 & 7 51 27.3 & 18 10  40.2 &  $3.0\pm0.5$ &  41 \\
 62 & 7 51 14.9 & 18 11  30.0 &  $3.1\pm0.4$ &  56 \\
 63 & 7 50 40.1 & 18 12  14.3 &  $17.2\pm1.2$ &  355 \\
 64 & 7 51 17.5 & 18 12   2.9 &  $2.7\pm0.4$ &  47 \\
 65 & 7 51 56.1 & 18 13  55.7 &  $5.4\pm1.0$ &  37 \\
 66 & 7 51 54.1 & 18 13  54.9 &  $8.6\pm1.2$ &  73 \\
 67 & 7 51 20.3 & 18 14   0.7 &  $6.6\pm0.6$ &  117 \\
 68 & 7 51 37.5 & 17 55  46.9 &  $6.9\pm1.1$ &  53 \\
 71 & 7 51 13.5 & 18 15  33.4 &  $3.7\pm0.6$ &  40 \\
 72 & 7 50 43.2 & 18 15  41.3 &  $4.4\pm0.8$ &  28 \\
 73 & 7 51 36.8 & 18 16   0.5 &  $6.3\pm0.8$ &  96\\
 75 & 7 51 24.2 & 18 17  43.5 &  $5.2\pm0.8$ &  38 \\
 76 & 7 51 17.5 & 17 54  10.7 &  $6.1\pm1.0$ &  41 \\
\hline
\end{tabular}
\end{table}