\begin{table}%T3
\par
%\centering
\par
\caption{Parameters derived from GOES data and RHESSI X-ray spectra
at the time of the May~17, 2002 drifting structure observations, $A$
and $V$ are the area and volume of RHESSI X-ray source, $n\rm _e^{GR}$ and
$n\rm _{nt}^{GR}$ are the electron plasma and non-thermal densities
derived from the GOES emission measure and the RHESSI source volume
and spectrum parameters, $n\rm _e^{R}$ and $n\rm _{nt}^{R}$ are the electron
plasma and non-thermal densities derived from the RHESSI emission
measure and the RHESSI source volume and spectrum parameters,
$n\rm _{e}^{Rad,max}$ is the electron plasma density derived from the
radio spectrum.} \label{t3}
\begin{tabular}{lc}
 \hline\hline
 Time (UT) & 7:38:22--:42 \\
 GOES Emission measure (10$^{49}$~cm$^{-3}$) & 1.0 \\
 GOES Temperature (10$^{6}$ K) & 16 \\
\hline
RHESSI fit interval (keV)              & 3$-$100 \\
RHESSI Emission measure (10$^{49}$~cm$^{-3}$) & 0.56 \\
RHESSI Temperature (10$^{6}$ K) & 20.1 \\
\hline
 $n_{\rm e}$ $\times$ $n_{\rm nt}$ $\times$ $V$ (10$^{45}$~cm$^{-2}$ s$^{-1}$) & 2.64 \\
 High energy limit (keV)   & 32~000 \\
Power-law index  & 5.72 \\
$A$ (10$^{17}$~cm$^{2}$)& 4.00  \\
\hline 
$V$ (10$^{26}$~cm$^{3}$) & 1.9  \\
$n\rm _e^{GR}$ (GOES-RHESSI) (10$^{11}$~cm$^{-3}$) & 2.29  \\
$n\rm _{nt}^{GR}$ (GOES-RHESSI) (10$^{7}$~cm$^{-3}$) &  6.1  \\
$n\rm _e^R$ (RHESSI) (10$^{11}$~cm$^{-3}$) & 1.72  \\
$n\rm _{nt}^R$ (RHESSI) (10$^{7}$~cm$^{-3}$) & 8.1  \\
$n\rm _{e}^{Rad,max}$  (10$^{10}$~cm$^{-3}$) & 4.00  \\
 \hline
\end{tabular}
\end{table}