\begin{table}%T1
\par
\caption{Log of observations with the STIS. \label{t1}}
%\centerline
{
\begin{tabular}{llllcl} \hline \hline
Date & HST& Offset & Pos angle & Aperture & Spectral coverage \\
& Proposal & from $\eta $ Car & Degrees & & \AA  \\
& & $R$(\arcsec), $\theta$&(N through E)  \\ \hline
Feb. 21, 1999 & 8036 & 0.4, 45$\degr$& $-27.97\degr$ &$52 \arcsec \times0\farcs1$ &6480$-$7000~\AA $^1$\\
Mar. 13, 2000 & 8327 & 0, 0 $^2$& $-41.14\degr$ &$52 \arcsec \times 0\farcs2$F2&2480--2910~\AA \\
& & & & & 3795--4335~\AA \\
& & & & &4818--5100~\AA \\
& & & & &6480--7565~\AA $^{3, 4}$\\
& & & & &9300--9600~\AA \\
Mar. 21, 2000 & 8483 & $N\times 0.1$, 55$\degr$$^5$ & $-35.02\degr$ & $52\arcsec\times 0\farcs 1$ & 4818--5100~\AA \\
& & $N\times 0.25$, 55$\degr$$^5$ &  &  & 6480--7050~\AA\\
Apr. 17, 2001 & 8619 & $1\farcs 5$, 315$\degr$ & 22.06$\degr$ & $52\arcsec \times 0\farcs 2$& 4052--4593~\AA $^6$\\
& & & & & 4818--5100~\AA \\
& & & & & 6480--7050~\AA $^3$\\
Nov. 27, 2001 & 8619 & $1\farcs 5$, 315$\degr$ & $-130.97\degr$ & $52\arcsec\times 0\farcs 2$ & 2480--2633~\AA \\
& & & & & 3022--10135~\AA $^{3, 4, 6}$\\
Dec. 16, 2002 & 9420 & $1\farcs 5$, 315$\degr$ & $-114.94\degr$ & $52\arcsec\times 0\farcs 2$ &1640--2492~\AA \\
& & & & & 2897--3052~\AA \\ \hline
\end{tabular}}
\par
\medskip
$^1$ Initial discovery spectrum \citep{ZGH01}. %%(Zethson et al, 2001)
\par
$^2$ Mar. 13, 2000 observations were accomplished with the F2 ($0\farcs 85
$) fiducial blocking the $\eta $ Car at the STIS entrance.
\par
$^3$ Repeated spectra from 6480$-$7000~\AA\ to check for variability.
\par
$^4$ Repeated spectra at 6995$-$7565~\AA\ to check variability.
\par
$^5$ Mapping spectra were recorded in the 4818$-$5100~\AA\ with
$0\farcs1 $ offsets and 6480$-$7050~\AA\ spectral range  with
$0\farcs25 $ offsets to map the spatial structure of the
Homunculus and the Little Homunculus. We used these spectra to
estimate the size of the strontium filament in \ion{Fe}{ii} and
[\ion{Sr}{ii}].
\par
$^6$ Repeated spectra 4194$-$4593~\AA; 4818$-$5104~\AA\ to check variability.
\end{table}