\begin{table}%T5
\caption{\label{result}
Reddening-corrected H$\beta$ luminosity and results from dereddened line ratios.}
\par
%\begin{center}
 {
\begin{tabular}{lccc}
\hline
\hline
 & \rm{ESO~103-G035} & \rm{TXS~2226-184} & \rm{\object{IC~1481}}\\
\hline
$L_{\rm H\beta}$$^a$ (10$^{40}$~erg~s$^{-1}$) & 2.65
& 0.49 & 0.59\\
%\hline
$A_{\rm V}$$^a$ & 1.9 & 1. & 0.47 \\
%\hline
$n_{\rm e}$$^a$ (cm$^{-3}$) & 600 $\pm$ 50 & 550 $\pm$ 100 & --\\
%\hline
$T^b$ (K) & 13~000 $\pm$ 500 & -- & --\\
%\hline
$[\mbox{\ion{O}{iii}}]~\lambda5007/[\mbox{\ion{O}{ii}}]~\lambda3727$ & 
3.69 & 0.48 & 0.3\\
%\hline
$[\mbox{\ion{O}{iii}}]~\lambda5007/[\mbox{\ion{O}{i}}]~\lambda6300$ & 
10.15 & 2.08 & 1.23\\
%\hline
$[\mbox{\ion{O}{i}}]~\lambda6300/$H$\alpha$ & 
0.3 & 0.46 & 0.27\\
%\hline
$[\mbox{\ion{S}{ii}}]~\lambda6716+\lambda6731/$H$\alpha$ & 
0.67 & 0.66 & 0.79$^c$\\
%\hline
$[\mbox{\ion{N}{ii}}]~\lambda6583/$H$\alpha$ & 
1.05 & 1.15 & 0.65\\
\hline
\end{tabular}}
$^a$ Derived
from the central region ($2\arcsec \times 2\arcsec$).\\
$^b$ Derived from 
the central row ($0\farcs68 \times 2\arcsec$).\\
$^c$ Using an estimated ratio of
[\ion{S}{ii}]~$\lambda6716/\lambda6731 \sim 1.07 $for a typical 
$n_{\rm e}$ of $\sim$550~cm$^{-3}$.
%\end{center}
\par
\end{table}