\begin{table}%t4
         \caption{\label{columndensities}IRAS~16293-2422 predicted column densities (cm$^{-2}$).} 
         %\centering
\par
         \begin{tabular}{lllll}
            \hline\hline\noalign{\smallskip}
   {Time(yrs)}   &  $3E3$  & $3E3$  & $3E4$  & $3E4$  \\
            Species &$N _{{\rm rad}}$ &$N _{{\rm beam}}$
                    &$N _{{\rm rad}}$ &$N _{{\rm beam}}$ \\
          \noalign{\smallskip}  \hline\noalign{\smallskip}
H$_2$         &     2.0E+24   &     2.0E+23   &     2.0E+24   &     2.0E+23\\
He         &     3.4E+23   &     3.3E+22   &     3.4E+23   &     3.3E+22\\
H          &     2.2E+19   &     2.0E+19   &     6.0E+19   &     6.1E+19\\
O          &     5.7E+19   &     1.4E+19   &     1.0E+19   &     1.8E+18\\
N$_2$         &     1.4E+20   &     1.4E+19   &     1.4E+20   &     1.3E+19\\
CO         &     1.8E+20   &     1.0E+19   &     1.6E+20   &     1.0E+19\\
O$_2$         &     8.1E+18   &     2.2E+18   &     4.5E+19   &     8.5E+18\\
H$_2$O        &     1.8E+20   &     8.2E+17   &     1.2E+20   &     2.6E+17\\
CO$_2$       &     4.7E+19   &     1.5E+17   &     7.4E+19   &     3.0E+17\\
N          &     3.4E+17   &     1.3E+17   &     2.8E+17   &     4.8E+16\\
NO         &     1.2E+17   &     9.1E+16   &     3.5E+17   &     3.4E+17\\
NH$_3$        &     2.0E+17   &     6.5E+16   &     2.9E+17   &     7.8E+16\\
OH         &     5.2E+16   &     3.0E+16   &     1.0E+17   &     9.7E+16\\
CH$_4$        &     2.3E+17   &     1.9E+16   &     2.3E+17   &     1.1E+16\\
C$_2$H$_2$       &     2.2E+16   &     6.4E+15   &     2.4E+16   &     4.5E+15\\
e$^{-}$          &     2.1E+16   &     5.2E+15   &     2.5E+16   &     5.7E+15\\
C$_2$H$_4$       &     5.2E+16   &     3.8E+15   &     9.7E+14   &     7.9E+12\\
Fe$^{+}$        &     1.4E+16   &     3.1E+15   &     1.7E+16   &     3.5E+15\\
H$_2$CO       &     2.9E+16   &     1.8E+15   &     1.7E+15   &     3.9E+14\\
HNC        &     1.6E+16   &     1.0E+15   &     2.6E+16   &     3.3E+14\\
Fe         &     2.6E+16   &     7.9E+14   &     2.3E+16   &     4.1E+14\\
C$_2$H$_6$       &     2.3E+15   &     7.0E+14   &     3.3E+12   &     1.7E+12\\
CHOOH      &     6.1E+15   &     6.5E+14   &     1.2E+16   &     7.9E+14\\
CH$_2$CO      &     1.2E+15   &     6.1E+14   &     4.2E+13   &     2.7E+13\\
CH$_3$OH      &     1.3E+17   &     5.2E+14   &     1.8E+16   &     3.9E+13\\
HNO        &     5.2E+14   &     5.1E+14   &     1.1E+16   &     1.2E+16\\
H$_3^+$        &     4.7E+14   &     4.8E+14   &     6.5E+14   &     6.7E+14\\
SO         &     2.0E+15   &     4.7E+14   &     1.3E+15   &     2.0E+14\\
N$_2$H$^+$       &     4.2E+14   &     4.4E+14   &     5.6E+14   &     5.9E+14\\
NH$_2$        &     5.7E+15   &     4.3E+14   &     1.5E+16   &     9.1E+15\\
HCN        &     3.4E+16   &     4.0E+14   &     5.5E+16   &     1.7E+14\\
SO$_2$        &     1.1E+16   &     3.5E+14   &     1.4E+16   &     8.9E+14\\
H$_3$O$^+$       &     3.6E+14   &     2.6E+14   &     1.2E+14   &     5.6E+13\\
S          &     1.6E+15   &     2.1E+14   &     2.6E+14   &     1.5E+13\\
CS         &     4.2E+14   &     1.3E+14   &     2.0E+14   &     9.6E+13\\
HCO$^+$       &     3.2E+14   &     1.2E+14   &     4.5E+14   &     1.6E+14\\
C$_3$H        &     1.5E+14   &     1.2E+14   &     1.7E+13   &     7.1E+12\\
HC$_3$N       &     2.6E+14   &     7.8E+13   &     5.1E+13   &     9.3E+12\\
He$^+$       &     6.5E+13   &     6.7E+13   &     5.2E+13   &     5.3E+13\\
C          &     7.8E+13   &     6.7E+13   &     6.3E+12   &     4.4E+12\\
CH$_3$CHO     &     1.6E+14   &     6.6E+13   &     1.7E+13   &     6.4E+12\\
NH         &     1.2E+15   &     4.8E+13   &     1.7E+15   &     6.9E+14\\
C$_3$H$_2$       &     7.8E+13   &     4.7E+13   &     4.9E+13   &     3.0E+13\\
N$^+$         &     4.5E+13   &     4.6E+13   &     2.4E+13   &     2.5E+13\\
C$_4$H        &     6.5E+13   &     4.3E+13   &     4.0E+13   &     2.5E+13\\
H$^+$         &     4.4E+13   &     4.1E+13   &     1.9E+13   &     1.9E+13\\
C$_3$H$_3$       &     1.0E+14   &     3.3E+13   &     7.3E+12   &     1.0E+12\\
C$_2$H$_5$OH     &     2.4E+13   &     2.4E+13   &     3.9E+10   &     1.1E+10\\
C$^+$         &     4.3E+13   &     2.3E+13   &     1.1E+13   &     6.4E+12\\
O$_2^+$        &     2.1E+13   &     1.7E+13   &     3.0E+13   &     2.5E+13\\
NO$_2$       &     7.5E+13   &     1.6E+13   &     2.7E+14   &     2.7E+14\\
H$_2$CS       &     7.9E+14   &     1.6E+13   &     5.1E+14   &     7.6E+11\\
NH$_4^+$       &     1.8E+13   &     1.5E+13   &     1.8E+13   &     1.4E+13\\
C$_2$S        &     3.4E+13   &     1.5E+13   &     1.8E+12   &     1.1E+12\\
HNO$^+$       &     8.8E+12   &     9.2E+12   &     4.4E+13   &     4.7E+13\\
CN         &     1.4E+13   &     9.2E+12   &     1.7E+12   &     9.0E+11\\
  \hline
     \end{tabular}
   \end{table}