\begin{table}%t1
\caption{Values of parameters characterizing the X-ray ejection.}
\label{xrepar}
%\centerline
{
\begin{tabular}{cccccccc}
\hline  \hline
Time & Tempe- & Emission & Visible & Total & Electron & Electron & Mass, $M$ \\
 & rature, $T$ & measure, $EM$ & volume, $V_{\rm{vis}}$ & volume, $V_{\rm{tot}}$ & 
density, $n_{\rm{e}}$ & pressure, $p_{\rm{e}}$ & \\
UT & [$10^6$~K] & [$10^{47}$~cm$^{-3}$] & [$10^{29}$~cm$^3$] & 
[$10^{29}$~cm$^3$] &  [$10^{9}$~cm$^{-3}$] & [dyn~cm$^{-2}$] & [$10^{14}$~g] \\
\hline
05:29:28$^{a}$ & 7.8 & 1.7 & 0.37--0.67 & 0.78--1.1 & 1.6--2.1 & 1.7--2.3 & 2.8--2.9 \\
05:29:46$^{a}$ & 7.8 & 2.0 & 0.37--0.69 & 0.78--1.2 & 1.7--2.3 & 1.8--2.5 & 3.0--3.3 \\
05:30:06$^{a}$ & 7.9 & 2.3 & 0.38--0.71 & 0.78--1.2 & 1.8--2.4 & 1.9--2.7 & 3.1--3.5 \\
05:30:28$^{a}$ & 7.9 & 2.6 & 0.40--0.76 & 0.79--1.3 & 1.8--2.6 & 2.0--2.8 & 3.3--3.9 \\
05:30:50$^{a}$ & 7.9 & 2.9 & 0.44--0.85 & 0.84--1.4 & 1.8--2.6 & 2.0--2.8 & 3.6--4.3 \\
05:31:14 & 8.2 & 2.7 & 0.51--0.99 & 0.94--1.6 & 1.7--2.3 & 1.9--2.6 & 3.6--4.4 \\
05:31:36 & 8.1 & 2.9 & 0.62--1.2 & 1.1--1.9 & 1.6--2.2 & 1.8--2.4 & 3.9--4.9 \\
05:32:00 & 7.9 & 3.0 & 0.78--1.5 & 1.3--2.3 & 1.4--2.0 & 1.6--2.2 & 4.2--5.5 \\
05:32:22 & 7.9 & 3.3 & 0.99--1.8 & 1.6--2.8 & 1.4--1.8 & 1.5--2.0 & 4.8--6.3 \\
05:32:46 & 7.8 & 3.4 & 1.3--2.4 & 2.0--3.5 & 1.2--1.6 & 1.3--1.7 & 5.4--7.0 \\
05:33:08 & 7.7 & 3.6 & 1.7--3.0 & 2.6--4.4 & 1.1--1.5 & 1.2--1.5 & 6.1--8.0 \\
05:33:32 & 7.6 & 3.8 & 2.3--4.0 & 3.3--5.6 & 0.98--1.3 & 1.0--1.3 & 7.1--9.2 \\
05:33:54 & 7.6 & 3.7 & 3.1--5.1 & 4.3--7.1 & 0.85--1.1 & 0.88--1.1 & 7.8--10.0 \\
05:34:18 & 7.4 & 3.8$^{b}$ & 4.2--6.8 & 5.7--9.2 & 0.75--0.95 & 0.76--0.97 & 
9.0--11.4 \\
05:34:40 & 7.3 & 3.6$^{b}$ & 5.6--8.7 & 7.3--11.6 & 0.64--0.80 & 0.64--0.80 & 
9.7--12.3 \\
05:35:04 & 7.1 & 3.3$^{b}$ & 7.5--11.5 & 9.7--15.0 & 0.53--0.66 & 0.52--0.65 & 
10.6--13.3 \\
05:35:26 & 7.0 & 2.9$^{b}$ & 9.9--14.8 & 12.4--18.9 & 0.45--0.55 & 0.43--0.53 & 
11.3--14.0 \\
05:35:50 & 7.0 & 2.6$^{b}$ & 13.2--19.3 & 16.2--24.2 & 0.36--0.44 & 0.35--0.43 &
 11.9--14.7 \\
\hline
\end{tabular}}
\medskip
$^{a}$ The signal from feature B was included. Actual temperature
values should be somewhat higher, whereas actual values of emission
measure, electron density, electron pressure and mass should be somewhat lower. \\
$^{b}$ The signal from the part of the X-ray ejection that runs away
outside the HN field of view was added from the SXT QN AlMg images (so-called
{\em Quarter Normal} resolution, QN -- pixel size $9\farcs8$~$\times$ $9\farcs8$).
\end{table}