\begin{table}%tA.1
\par
   %\centering
\par
      \caption{SE{\sc {xtractor}} configuration files used for the 
F02 deep survey, $\chi^2$-image.\label{sexchi2}}
                        $$
\begin{tabular}{lll}
           \hline\hline
            \noalign{\smallskip}
\multicolumn{3}{l}{{\tt \#Default configuration file for} SE{\sc xtractor} V1.2{\sc b}14}  \\
{\tt \# EB 23/07/98} & & \\
\multicolumn{3}{l}{\tt \# (*) indicates parameters which can be omitted from this config file.} \\
\multicolumn{3}{l}{\tt \#----------------------------------------- Catalog ------------------------------------}
 \\
\par
CATALOG\_NAME  &  02hr\_chisq.cat &\# name of the output catalog \\
CATALOG\_TYPE  &  ASCII\_HEAD  &       \# "NONE","ASCII\_HEAD","ASCII","FITS\_1.0" \\
                        & &       \# or "FITS\_LDAC" \\
\par
PARAMETERS\_NAME& photom\_new.param&  \# name of the file \\
                            & &   \# containing catalog contents \\
\par
\multicolumn{3}{l}{\tt \#---------------------------------------- Extraction ----------------------------------} \\
\par
DETECT\_TYPE    & CCD &            \# "CCD" or "PHOTO" (*) \\
DETECT\_MINAREA & 3   &            \# minimum number of pixels above threshold\\
DETECT\_THRESH  & 1.1 &         \# $<$sigmas$>$ or $<$threshold$>$,$<$ZP$>$ in mag.arcsec$^{-2}$\\
ANALYSIS\_THRESH& 1.1 &         \# $<$sigmas$>$ or $<$threshold$>$,$<$ZP$>$ in mag.arcsec$^{-2}$\\
THRESH\_TYPE    & ABSOLUTE & \\
FILTER         & N & \\
FILTER\_NAME    & gauss\_3.0\_7x7.conv & \# name of the file containing the filter\\
\par
DEBLEND\_NTHRESH& 32  &            \# Number of deblending sub-thresholds\\
DEBLEND\_MINCONT& 0.002 &          \# Minimum contrast parameter for deblending\\
\par
CLEAN          & Y &  \\
CLEAN\_PARAM    & 1.0 &             \# Cleaning efficiency\\
MASK\_TYPE      & CORRECT &        \# type of detection MASKing: can be one of\\
               & &                 \# "NONE", "BLANK" or "CORRECT"\\
\par
\multicolumn{3}{l}{\tt \#--------------------------------------- Photometry -----------------------------------} \\
\par
PHOT\_APERTURES &   15.,25.&    \# MAG\_APER aperture diameter(s) in pixels\\
PHOT\_FLUXFRAC &  0.2, 0.5, 0.8&        \# Fraction of FLUX\_AUTO defining FLUX\_RADIUS\\
PHOT\_AUTOPARAMS& 2.5, 3.5     &   \# MAG\_AUTO parameters: $<$Kron\_fact$>$,$<$min\_radius$>$\\
SATUR\_LEVEL    & 40000.        &  \# level (in ADUs) at which arises saturation\\
PHOT\_AUTOAPERS & 15.0, 15.0   &   \# MAG\_AUTO minimum apertures: estimation,photometry\\
\par
MAG\_ZEROPOINT  & 31.90        &   \# magnitude zero-point\\
MAG\_GAMMA      & 4.0          &   \# gamma of emulsion (for photographic scans)\\
GAIN           & 2.0       &    \# detector gain in e$-$/ADU.\\
PIXEL\_SCALE    & 0.205  &      \# size of pixel in arcsec (0=use FITS WCS info).\\
\par
\multicolumn{3}{l}{\tt \#--------------------------------- Star/Galaxy Separation ----------------------------} \\
\par
SEEING\_FWHM    & 0.9 &                               \# stellar FWHM in arcsec\\
STARNNW\_NAME   & default.nnw & \# Neural-Network\_Weight table filename\\
\par
\multicolumn{3}{l}{\tt \#------------------------------------- Background ------------------------------------} \\
\par
BACK\_SIZE      & 128         &    \# Background mesh: $<$size$>$ or $<$width$>$,$<$height$>$\\
BACK\_FILTERSIZE& 9           &    \# Background filter: $<$size$>$ or $<$width$>$,$<$height$>$\\
BACKPHOTO\_TYPE & LOCAL       &    \# can be "GLOBAL" or "LOCAL" (*)\\
BACKPHOTO\_THICK& 30          &    \# thickness of the background LOCAL annulus (*)\\
BACK\_TYPE      & AUTO   & \\
BACK\_VALUE     & 0 & \\
\multicolumn{3}{l}{\tt \#------------------------------------- Check Image -----------------------------------} \\
\par
CHECKIMAGE\_TYPE &NONE  & \# can be one of "NONE", "IDENTICAL", \\
                    &   &          \# "BACKGROUND", "-BACKGROUND","BACKGROUND\_RMS",\\
%                    &    &         \# "MINIBACKGROUND", "MINIBACK\_RMS",\\
%                    &     &        \# "FILTERED", "OBJECTS", "-OBJECTS",\\
%                    &      &       \# "SEGMENTATION", or "APERTURES",\\
\par
CHECKIMAGE\_NAME &check.fits &      \# Filename for the check-image (*)\\
\par
\multicolumn{3}{l}{\tt \#-------------------------------- Memory (change with caution!) ---------------------} \\
MEMORY\_OBJSTACK& 2000      &      \# number of objects in stack\\
MEMORY\_PIXSTACK& 5000000   &      \# number of pixels in stack\\
MEMORY\_BUFSIZE & 512       &      \# number of lines in buffer\\
\par
\multicolumn{3}{l}{\tt \#----------------------------------- Miscellaneous ---------------------------------} \\
\par
VERBOSE\_TYPE  &  NORMAL      &     \# can be "QUIET", "NORMAL" or "FULL" (*)\\
\par
\multicolumn{3}{l}{\tt \#------------------------------------- New Stuff -----------------------------------} \\
\par
WEIGHT\_TYPE   & MAP\_WEIGHT &  \\
\#WEIGHT\_TYPE  &  BACKGROUND & \\
\noalign{\smallskip}
            \hline
         \end{tabular}
      $$
   \end{table}