\begin{table}%t2
\caption{Thomas-Fermi-Pauli scaling parameters for the \ion{Fe}{xiii} SSTRUCT model.}\label{scal-params}
%\centering
\par
\begin{tabular}{llllllll}
\hline
\hline
$1$s&1.40089 &$2$s &1.11249 &$3$s &1.13553 &$4$s &1.17266\\
   &        &$2$p &1.05861 &$3$p &1.10042 &$4$p &1.12312\\
   &        &   &        &$3$d &1.12388 &$4$d &1.14800\\
   &        &   &        &   &        &$4$f &1.32369\\
\hline
\end{tabular}
\end{table}