\begin{table}%t3
\caption{\label{mstars} Sample stars with absolute magnitude fainter than 8.50 and a distance up to 6 pc, M-type stars; columns as in Table~\ref{fgstars}.}
%\begin{center}
\par
\begin{tabular}{lllrrrlrrl}
\hline\hline
Catalogue&$M_{V}$&Spectral&Distance&Mode&Count rate&Error&Likelihood&Exposure&log $L_{\rm X}$\\
name&&type&(pc)&&&&or S/N&time\\
\hline
Gl 1&10.35& M3   V&4.36&S&0.059340&0.024300&9.0&156&26.91\\
&&&&P&0.019690&0.002380&104.0&4604&26.43\\
Gl 15A&10.32& M1.5 V&3.57&S&0.260200&0.026180&202.0&453&27.38\\
&&&&H&0.013900&0.003060&4.4&1606&26.71\\
Gl 15B&13.29& M3.5 V&3.57&S&0.260200&0.026180&202.0&453&27.38\\
&&&&H&0.053440&0.005780&8.7&1606&27.29\\
Gl 34B&8.64& K7   V&5.95&S&0.137900&0.021990&71.0&381&27.54\\
&&&&H&0.026470&0.002070&10.2&6391&27.43\\
Gl 54.1&14.19& M4.5 V&3.72&S&0.253800&0.025840&200.0&461&27.40\\
&&&&P&0.079810&0.008050&142.0&1359&26.90\\
Gl 65AB&15.41& M5.5 V&2.68&S&0.680300&0.056820&318.0&484&27.55\\
&&&&P&0.355700&&3253.0&16~136&27.26\\
&&&&H&1.410000&0.010100&121.7&13~884&28.46\\
Gl 83.1&14.03& M4.5 V&4.45&S&0.167400&0.024950&111.0&295&27.38\\
Gl 166C&12.69& M4.5 V&5.04&S&0.796400&0.051660&572.0&344&28.16\\
&&&&H&0.107100&0.010400&9.8&1022&27.89\\
Gl 169.1A&12.34& M4   V&5.51&P&0.011920&0.002220&41.0&3323&26.41\\
Gl 191&10.88& M1 p V&3.92&S&0.048740&0.019720&10.0&248&26.73\\
&&&&P&0.018180&0.001320&353.0&14~268&26.30\\
Gl 205&9.19& M1.5 V&5.69&S&0.196300&0.022530&152.0&455&27.66\\
&&&&P&0.187000&0.006120&2014.0&5156&27.64\\
Gl 213&12.70& M4   V&5.79&S&0.016150&0.006921&9.0&461&26.59\\
&&&&P&0.004701&0.000729&43.0&13~362&26.05\\
Gl 229AB&9.34& M1 V&5.77&S&0.053500&0.011580&39.0&592&27.11\\
Gl 234AB&13.08&M4.0 V&4.12&S&0.767000&&&490&27.97\\
Gl 251&11.31& M3   V&5.52&P&0.005924&0.001500&30.0&4048&26.11\\
Gl 273&11.95& M3.5 V&3.80&S&0.034000&0.014910&9.0&247&26.55\\
&&&&P&0.010390&0.002310&37.0&2932&26.03\\
Gl 285&12.30& M4   V&5.93&S&1.467000&0.078880&1220.0&253&28.57\\
Gl 300&13.22& M3.5 V&5.89&P&0.007263&0.001580&28.0&4096&26.26\\
Gl 388&10.95& M3   V&4.89&S&3.701000&0.194400&1500.0&104&28.80\\
&&&&P&2.226000&0.013500&9999.0&25~092&28.58\\
&&&&H&0.698700&0.006710&94.6&15~302&28.68\\
Gl 406&16.56& M6   V&2.39&S&0.227500&0.025720&183.0&384&26.97\\
&&&&P&0.250000&0.009960&2566.0&2604&27.01\\
Gl 411&10.46& M2   V&2.55&S&0.167000&0.024170&83.0&341&26.89\\
&&&&P&0.212400&0.004760&3844.0&10~006&27.00\\
Gl 412A&10.34& M1   V&4.83&S&0.184800&0.026840&111.0&364&27.49\\
&&&&H&0.005208&0.000526&5.0&24~751&26.54\\
Gl 412B&15.99& M5.5 V&4.83&S&0.184800&0.026840&111.0&364&27.49\\
&&&&H&0.042180&0.001320&25.4&24~751&27.45\\
Gl 445&12.14& M3.5 V&5.39&P&0.021170&0.004150&41.0&1485&26.65\\
Gl 447&13.50& M4   V&3.34&S&0.079610&0.017270&41.0&364&26.80\\
&&&&P&0.052780&&174.0&3885&26.63\\
Gl 473AB&14.99& M5.5 V&4.39&S&0.238600&0.026880&147.0&430&27.52\\
&&&&P&0.295600&0.012900&2437.0&1922&27.61\\
Gl 526&9.80& M1.5 V&5.43&P&0.035310&0.007460&36.0&747&26.87\\
Gl 551&15.48& M5.5&1.29&S&1.374000&0.110700&445.0&374&27.22\\
&&&&P&0.541100&0.005680&9999.0&17~157&26.81\\
\hline
&&&&F&0.930500&0.035500&9999.0&725&27.74\\
Gl 570BC&9.35& M1   V&5.90&S&0.173100&0.070810&9.0&44&27.64\\
&&&&P&0.238000&&1305.0&5321&27.77\\
&&&&H&0.028530&0.003470&7.4&2443&27.46\\
Gl 570D&&T8&5.90&H&$<$0.00158&&1.3$^1$&2430&26.20\\
Gl 588&10.44& M2.5 V&5.93&S&0.039920&0.012640&13.0&416&27.00\\
&&&&P&0.026350&&61.0&4331&26.82\\
Gl 628&11.93& M3   V&4.26&S&0.047450&0.011080&27.0&554&26.79\\
Gl 674&11.10& M3   V&4.54&S&0.266600&0.040960&76.0&193&27.60\\
Gl 682&12.45& M4.5 V&5.04&P&0.007986&0.002780&8.0&1433&26.16\\
Gl 687AB&10.88& M3   V&4.53&S&0.062050&0.004069&374.0&5788&26.96\\
&&&&P&0.062300&0.003340&1259.0&6274&26.96\\
&&&&H&0.020350&0.001200&15.3&15~193&27.08\\
Gl 693&11.93&M3.5 V&5.81&S&$<$0.03522&&0.7&129&26.93\\
Gl 699&13.25& M4   V&1.82&S&0.029760&0.011060&13.0&399&25.85\\
&&&&P&0.023370&0.002620&105.0&4127&25.74\\
Gl 725AB&11.14& M3   V&3.56&S&0.049080&0.006292&91.0&1781&26.65\\
&&&&P&0.062860&0.005710&158.0&2263&26.76\\
&&&&H&0.021700&0.002330&8.3&4178&26.90\\
Gl 729&13.09& M3.5 V&2.97&S&0.942000&0.080930&334.0&326&27.78\\
&&&&H&0.204200&0.006880&27.5&4305&27.71\\
Gl 752A&10.28& M3   V&5.87&P&0.035360&&139.0&10~492&26.94\\
&&&&H&0.011460&0.000778&14.6&21~758&27.05\\
Gl 752B&18.68& M8   V&5.87&H&0.000444&0.000323&3.0&21~757&25.64\\
Gl 754&13.41& M4.5&5.71&P&0.004324&0.000974&15.0&6529&26.01\\
Gl 825&8.70& M0.5 V&3.95&S&0.137300&0.022020&83.0&403&27.19\\
&&&&P&0.248600&0.005250&3589.0&9467&27.44\\
Gl 832&10.20& M1 V&4.94&P&0.033740&0.004580&54.0&2041&26.77\\
Gl 860AB&11.76& M3   V&4.04&S&0.448600&0.033550&468.0&427&27.72\\ 
Gl 866AB&15.18& M5   V&3.45&S&0.196900&0.038900&57.0&161&27.23\\
&&&&P&0.269900&0.004640&3800.0&12~892&27.36\\
Gl 873&11.71& M3.5 V&5.05&S&5.384000&0.098370&9999.0&560&28.99\\
&&&&P&0.784500&&5458.0&4463&28.16\\
Gl 876&11.80& M3.5 V&4.70&P&0.019320&0.003770&34.0&1766&26.49\\
Gl 887&9.76& M2   V&3.29&S&0.137400&0.037470&28.0&148&27.03\\
&&&&P&0.222000&0.004350&3425.0&12~729&27.24\\
Gl 905&14.79& M5.5 V&3.16&S&0.177200&0.023810&100.0&350&27.10\\
Gl 908&10.11& M1   V&5.97&S&0.051160&0.013450&27.0&414&27.12\\
GJ 1002&15.40&M5.5 V&4.69&P&$<$0.00219&&0.3&1673&25.54\\
GJ 1005AB&12.99& M3.5 V&5.36&P&0.007931&0.002540&10.0&1643&26.21\\
GJ 1061&15.17& M5.5 V&3.70&P&0.011900&0.003690&16.0&1321&26.07\\
GJ 1111&16.99& M6.5 V&3.63&P&0.039730&&264.0&10~312&26.58\\
GJ 1116AB&15.48& M5.5 V&5.23&S&0.340000&0.034000&231.0&337&27.82\\
&&&&P&0.171700&&389.0&3021&27.53\\
&&&&H&0.070920&0.003670&17.9&5319&27.75\\
GJ 1245ABC&15.18& M5.5 V&4.54&S&0.198~200&0.016990&331.0&797&27.47\\
&&&&H&0.026270&0.003120&6.8&2849&27.19\\
LHS 288&15.61&M5.5&4.49&P&0.197300&0.016300&302&730&27.46\\
&&&&H&0.00079&0.00028&11.7$^1$&12~927&25.66$^2$\\
LHS 292&17.32& M6.5 V&4.54&P&0.006161&0.001330&39.0&5146&25.96\\
LP 71-82&14.43&dM7 e&5.00&S&0.143900&0.004378&2290.0&9529&27.41\\
LP 816-60&12.71&M&5.49&S&$<$0.02430&&1.9&326&26.72\\
LP 944-20&18.25&M9  V&4.97&H&$<$0.00415&&&220~800&25.57$^3$\\
LTT 17897&12.69& M3.5 V&5.37&S&0.404000&0.044720&193.0&475&27.92\\
L 34-26&12.90&dM5 e&5.99&S&0.594400&0.070090&171.0&753&28.18\\
DENIS 1048-39&18.50&M9  V&4.10&S&$<$0.01599&&0.5&409&26.29\\
\hline
\end{tabular}
{
Given value is the source likelihood.\\
Source not included in the HRI catalog. See Sect.~5.4.2 for details.\\ 
X-ray data taken from \citet{Neuhaeuser99}.}
%\end{center}
\par
\end{table}