\begin{table}%t1
\caption{\label{fgstars}Sample stars with absolute magnitude 
between 3.00 and 5.80 (and some F-type stars brighter than 3.00) and a distance up to 14 pc, 
the F- and G-type stars. Table contains the star's name (Col.~1), its absolute visual 
magnitude (Col.~2), and its spectral type (Col.~3) as in CNS4; the distance (in pc, Col.~4) 
is computed from the CNS4 parallax.  Mode (Col.~5) denotes the source of the X-ray data, S denoting
survey data, P pointed PSPC data, and H pointed HRI data.  The countrate (Col.~6) and
its error (Col.~7) are quoted in cts/s, the likelihood or SNR are dimensionless (Col.~8), the
exposure time (Col.~9) is in seconds, and the X-ray luminosity (Col.~10) in cgs-units.}
%\begin{center}
\par
\begin{tabular}{lllrrrlrrl}
\hline\hline
Catalogue&$M_{V}$&Spectral&Distance&Mode&Count rate&Error&Likelihood&Exposure&log $L_{\rm X}$\\
name&&type&(pc)&&&&or S/N&time\\
\hline
Gl 5&5.44& K0 V e&13.70&S&0.686800&0.048430&624.0&327&28.97\\
&&&&P&0.793700&0.017800&3690.0&2575&29.03\\
&&&&F&0.190600&0.005840&8385.0&5806&29.11\\
Gl 17&4.55& F9 V&8.59&P&0.022820&0.003500&75.0&2385&27.08\\
Gl 19&3.42& G2 IV&7.47&S&0.069990&0.023200&15.0&195&27.45\\
&&&&P&0.038040&0.004100&114.0&2668&27.18\\
&&&&F&0.010850&0.002680&26.0&1667&27.34\\
&&&&H&0.037140&0.001630&21.0&14~526&27.77\\
Gl 27&5.64& K0 V&11.11&H&0.004537&0.000952&4.9&6405&27.21\\
Gl 34A&4.57& G3 V&5.95&S&0.137900&0.021990&71.0&381&27.54\\
&&&&H&0.026470&0.002070&10.2&6391&27.43\\
Gl 53A&5.78& G5 VI&7.55&H&0.004004&0.000662&6.0&12~750&26.82\\
Gl 61&3.44& F8 V&13.47&S&0.134900&0.022790&66.0&354&28.25\\
Gl 67A    & 4.44 & G1.5 V   & 12.64&S&$<$0.03801&&2.1&377&27.64\\
Gl 71&5.68& G8 Vp&3.65&S&0.051750&0.013440&24.0&445&26.69\\
&&&&H&0.009015&0.002360&3.9&2000&26.54\\
Gl 75&5.64& K0 V&9.98&S&0.360200&0.026490&505.0&572&28.41\\
Gl 92A&4.85& G0 V e&10.85&S&0.423400&0.039160&285.0&299&28.55\\
Gl 107A&3.87& F7 V&11.23&S&0.152400&0.018690&140.0&527&28.14\\
&&&&H&0.016830&0.002590&5.5&2850&27.79\\
Gl 111&3.72& F6 V&13.97&S&0.906300&0.059260&559.0&288&29.10\\
&&&&P&0.721600&0.020700&3473.0&1779&29.00\\
&&&&F&0.167500&0.008840&4878.0&2136&29.07\\
Gl 124&3.93& G0 V&10.53&S&0.021440&0.007394&13.0&523&27.23\\
&&&&P&0.058940&0.006000&145.0&1821&27.67\\
&&&&H&0.010690&0.001140&8.8&9309&27.53\\
Gl 136&5.10& G2 V&12.12&S&0.095070&0.020590&35.0&328&28.00\\
Gl 137&5.02& G5 V e&9.16&S&1.201000&0.094630&472.0&286&28.86\\
&&&&P&0.917700&0.024400&3994.0&1594&28.74\\
&&&&F&0.285900&0.011600&4366.0&2144&28.94\\
&&&&H&0.336300&0.005450&52.8&11~246&28.91\\
Gl 138    & 4.81 & G1 V     & 12.08&S&$<$0.02417&&0.5&338&27.40\\
Gl 139&5.35& G5 V&6.06&S&0.025950&0.009569&10.0&519&26.84\\
&&&&P&0.020170&0.004010&39.0&1738&26.73\\
&&&&H&0.003099&0.000932&3.6&5913&26.51\\
Gl 147&3.59& F8 V&13.72&P&0.011510&0.002340&15.0&2809&27.19\\
Gl 150&3.75& K0 IVe&9.04&S&0.019220&0.008239&9.0&532&27.05\\
&&&&P&0.030400&0.002490&178.0&6383&27.25\\
Gl 177&4.86& G1 V&13.32&S&0.490200&0.045960&272.0&539&28.80\\
Gl 178&3.66& F6 V&8.03&S&1.957000&0.146700&481.0&392&28.96\\
Gl 189&4.36& F7 V&11.65&S&0.484500&0.109600&26.0&1236&28.67\\
&&&&P&1.459000&0.053800&4208.0&500&29.15\\
&&&&F&0.349300&0.015200&3505.0&1507&29.23\\
Gl 197    & 4.20 & G2 IV-V  & 12.65&S&$<$0.02212&&4.2&456&27.40\\
Gl 211&5.79& K1 V e&12.24&S&0.368900&0.032980&331.0&367&28.60\\
&&&&P&0.307700&0.007600&4435.0&5498&28.52\\
Gl 216A&3.82& F6 V&8.97&S&0.343000&0.028840&330.0&488&28.30\\
&&&&P&0.032120&0.004440&64.0&2016&27.27\\ 
Gl 222AB&4.74& G0 V&8.66&S&1.942000&0.068150&2940.0&431&29.02\\
&&&&F&0.408600&0.008850&9999.0&5284&29.04\\
&&&&H&0.426400&0.011600&31.9&3119&28.96\\
Gl 231&5.05& G5 V&10.15&S&0.017000&0.004695&21.0&1166&27.10\\
&&&&P&0.024660&0.003440&50.0&2660&27.26\\
Gl 280A&2.63& F5 IV-V&3.50&S&3.655000&0.097970&5080.0&400&28.51\\
&&&&P&2.641000&0.027000&9999.0&3654&28.37\\
&&&&F&0.360200&0.018800&3793.0&1061&28.20\\
\hline
Gl 302&5.45& G7.5 V&12.58&S&0.032240&0.011320&13.0&355&27.56\\
Gl 324A   & 5.46 & G8 V     & 12.53&S& $<$0.04913&&3.6&337&27.74\\
Gl 354A&2.53&F6 IV&13.49&S&$<$0.01938&&2.1&397&27.40\\
Gl 356A&5.17& G8 V&11.18&S&0.298200&0.026960&254.0&467&28.43\\
&&&&P&0.362400&&779.0&3899&28.51\\
&&&&H&0.073430&0.004580&11.0&3526&28.42\\
Gl 395&4.29& F8 V&12.85&S&0.195400&0.020980&172.0&572&28.36\\
Gl 423AB&4.72& G0 V e&8.35&S&4.539000&0.157500&3380.0&192&29.36\\
Gl 434&5.43& G8 V e&9.54&S&0.348000&0.037120&194.0&314&28.36\\
&&&&P&0.390100&0.014200&3272.0&1956&28.41\\
&&&&F&0.090090&0.004100&3880.0&5572&28.47\\
Gl 442A&5.05& G5 V&9.24&H&0.002430&0.000621&3.6&10~109&26.78\\
Gl 449&3.41& F9 V&10.90&S&0.343700&0.030270&264.0&417&28.47\\
&&&&P&0.377500&0.007230&4123.0&7433&28.51\\
Gl 454    & 5.00 & K0 IV    & 12.91&S&$<$0.05198&&7.9&352&27.79\\
Gl 475&4.66& G0 V&8.37&S&0.023470&0.008381&12.0&509&27.07\\
&&&&P&0.036830&&148.0&20~537&27.27\\
Gl 482AB&3.10& F0 V&11.83&S&2.039000&0.121100&888.0&146&29.31\\
Gl 502&4.46& G0 V&9.15&S&0.255000&0.037070&78.0&504&28.19\\
&&&&P&0.294400&0.006210&3909.0&8010&28.25\\
Gl 506&5.08& G6 V&8.53&P&0.014160&0.002460&50.0&3113&26.87\\
&&&&H&0.002125&0.000856&2.8&5419&26.65\\
Gl 534&2.41& G0 IV&11.34&S&0.143800&0.023100&55.0&377&28.12\\
&&&&P&0.185100&0.005610&1770.0&6404&28.23\\
Gl 559A&4.38& G2 V&1.34&S&3.876000&0.211800&589.0&420&27.70\\
&&&&P&3.357000&0.033600&9999.0&3260&27.64\\
&&&&H&0.658200&0.014700&25.0&3038&27.53\\
Gl 559B&5.72& K0 V&1.34&S&3.876000&0.211800&589.0&420&27.70\\
&&&&P&3.357000&0.033600&9999.0&3260&27.64\\
&&&&H&0.773600&0.015900&48.9&3038&27.60\\
Gl 566A&5.59& G8 V e&6.70&S&2.440000&0.183400&416.0&400&28.90\\
&&&&P&2.351000&0.020700&9999.0&5213&28.88\\
&&&&F&0.604100&0.011900&9999.0&4270&28.99\\
&&&&H&0.767300&0.017400&32.7&2495&29.00\\
Gl 567&5.70& K2 V&11.54&S&0.362900&0.034130&245.0&398&28.54\\
&&&&P&0.211600&&1735.0&13~998&28.31\\
Gl 575A&4.71& F9 V n&12.76&S&3.414000&0.076010&9070.0&612&29.60\\
&&&&P&3.510000&0.040400&9999.0&2166&29.61\\
&&&&H&1.141000&0.005250&190.6&40~853&29.73\\
Gl 575B&5.34&dG2&12.76&S&3.414000&0.076010&9070.0&612&29.60\\
&&&&P&3.510000&0.040400&9999.0&2166&29.61\\
&&&&H&1.141000&0.005250&190.6&40~853&29.73\\
Gl 598&4.07& G0 V&11.75&S&0.062080&0.014010&30.0&503&27.79\\
&&&&P&0.072190&0.005470&251.0&2726&27.85\\
Gl 601A&2.40& F2 IV&12.31&S&0.144300&0.024700&58.0&365&28.20\\
Gl 603&3.62& F6 V&11.12&S&0.035450&0.011590&10.0&560&27.50\\ 
Gl 620.1A&4.83& G3/5 V&12.87&S&0.654400&0.044910&646.0&349&28.89\\
&&&&P&0.699200&0.020600&3231.0&1724&28.92\\
&&&&F&0.181900&0.007560&4302.0&3269&29.03\\
Gl 624&4.48& G0 V&12.11&S&1.027000&0.080740&493.0&166&29.03\\
Gl 635AB&2.74&G0 IV&10.80&S&0.127800&0.018560&77.0&494&28.03\\
&&&&P&0.128600&0.004240&2371.0&7752&28.03\\
&&&&H&0.015160&0.003790&3.9&1219&27.71\\
Gl 666A&5.75& G8 V&8.79&S&0.029000&0.013510&8.0&251&27.21\\
&&&&P&0.012090&0.003340&10.0&1250&26.83\\
Gl 695Aa&3.80& G5 IV&8.40&S&0.197000&0.018860&232.0&718&28.00\\
&&&&P&0.163900&0.017000&95.0&587&27.92\\
&&&&F&0.025270&0.003300&98.0&2473&27.81\\
&&&&H&0.015870&0.004320&3.6&910&27.51\\
\hline
Gl 702A&5.68& K0 V e&5.09&S&1.649000&0.127200&410.0&347&28.49\\
&&&&F&0.247300&0.011500&4242.0&1903&28.36\\
&&&&H&0.210900&0.016400&11.0&778&28.20\\
Gl 713A&4.15& F7 V&8.06&S&0.155800&0.009018&506.0&2629&27.86\\
&&&&P&0.152800&0.006840&2255.0&3490&27.85\\
Gl 722&5.26& G5 V&12.98&S&0.045080&0.016000&15.0&283&27.74\\
Gl 771A&3.04& G8 IV&13.71&S&0.247900&0.029290&202.0&343&28.52\\
&&&&H&0.052870&0.006060&7.6&1474&28.46\\
Gl 780&4.62& G8 V&6.11&S&0.073070&0.027780&10.0&124&27.29\\
&&&&H&0.018620&0.002170&8.2&4350&27.30\\
Gl 827&4.38& F8 V&9.22&P&0.009295&0.002730&22.0&1820&26.75\\
&&&&H&0.004878&0.001060&4.9&5914&27.08\\
Gl 848AB&3.41& F5 V&11.76&S&0.259900&0.024040&261.0&505&28.41\\
Gl 853A&4.71& G1 V&13.61&S&0.040330&0.013370&12.0&359&27.73\\
Gl 903&2.51& K1 IVe&13.79&S&0.014180&0.004882&12.0&977&27.29\\
&&&&P&0.015300&0.001930&110.0&5669&27.32\\
Gl 904&3.42& F7 V&13.79&S&0.111500&0.019300&73.0&373&28.18\\
Gl 914A&5.34& G3 V&12.40&S&0.029120&0.011240&12.0&369&27.51\\
\hline
\end{tabular}
%\end{center}
\par
\end{table}