\begin{table}%t1
%\centering
\par
\caption{The predicted line strengths in pm (${=}10$~m\AA ) for the OH A-X and Be lines
using 1D {\sc marcs} and Holweger-M\"uller solar model atmospheres calculated with
different combinations of microturbulence ($\xi_{\rm turb}$) and additional continuous
opacity over standard values ($\Delta \kappa_\nu^{\rm cont}/\kappa_\nu^{\rm cont}$).
The "observed" equivalent widths used for the 3D calculations are those computed
using $\Delta \kappa_\nu^{\rm cont}/\kappa_\nu^{\rm cont} = 0.60$ (i.e. 60\% extra
opacity) and
$\xi_{\rm turb}=1.0$, as found by Balachandran \& Bell (\cite{Balachandran98}).
\label{t:eqw1d}}
\begin{tabular}{lcccccccc}
 \hline\hline
line & $\chi_{\rm exc}$ & log~$gf$ &
$\Delta \kappa_\nu^{\rm cont}/\kappa_\nu^{\rm cont}$&
\multicolumn{2}{c}{$W_\lambda$({\sc marcs})} &&
\multicolumn{2}{c}{$W_\lambda$(Holweger-M\"uller)}  \\
$ $[nm] & [eV] &&& \multicolumn{2}{c}{log~$\epsilon_{\rm O} = 8.75$} &&
\multicolumn{2}{c}{log~$\epsilon_{\rm O} = 8.91$}\\
        &      &&& \multicolumn{2}{c}{log~$\epsilon_{\rm Be} = 1.40$} &&
\multicolumn{2}{c}{log~$\epsilon_{\rm Be} = 1.40$}\\
\cline{5-6} \cline{8-9}\\
 & & &&
 $\xi_{\rm turb}=1.0$ &
 $\xi_{\rm turb}=1.2$ &&
 $\xi_{\rm turb}=1.0$ &
 $\xi_{\rm turb}=1.2$ \\
 & &&& [km~s$^{-1}$] & [km~s$^{-1}$]&& [km~s$^{-1}$]& [km~s$^{-1}$]
\smallskip\\
\hline\\
%\smallskip
\par
OH 312.80 & 0.102 & $-2.425$ & 0.00 & 6.53 & 6.69 && 6.55 & 6.71 \\
          &       &          & 0.60 & 5.90 & 6.04 && 6.01 & 6.15 \\
OH 312.82 & 0.209 & $-2.074$ & 0.00 & 7.55 & 7.75 && 7.58 & 7.78 \\
          &       &          & 0.60 & 6.89 & 7.07 && 7.02 & 7.21 \\
OH 313.91 & 0.760 & $-1.563$ & 0.00 & 7.47 & 7.67 && 7.51 & 7.71 \\
          &       &          & 0.60 & 6.78 & 6.95 && 6.92 & 7.10 \\
OH 316.71 & 1.108 & $-1.544$ & 0.00 & 6.15 & 6.29 && 6.19 & 6.33 \\
          &       &          & 0.60 & 5.46 & 5.58 && 5.59 & 5.72 \\
Be~{\sc ii} 313.10 & 0.000 & $-0.468$ & 0.00 & 8.79 & 8.91 && 8.63 & 8.74 \\
          &       &          & 0.60 & 7.63 & 7.73 && 7.63 & 7.73 \\
\hline
\end{tabular}
\end{table}