\begin{table}%T3
%\centering
\par
%\renewcommand{\thetable}{\arabic{table}}
\caption{Data for spectral lines measured in the spectrum of ZNG~4 in~M~13.}\label{t3}
\begin{tabular}{lllll} \hline\hline
\par
$\lambda_{\rm lab}$ (in~$\AA$)&LEP (eV)&log $gf$&$EW$ (m$\AA$)&$\rm \log \epsilon $\\ \hline
He I\\
4471.47&20.96&--0.278&11.3&10.44\\
Na I\\
5889.95&0.00&0.117&63.9&5.05\\
5895.92&0.00&--0.184&40.6&5.04\\
Mg I\\
5167.32&2.71&--1.030&31.9&6.19\\
5172.68&2.71&--0.402&70.2&6.09\\
5183.60&2.72&--0.180&85.8&6.07\\
Mg II\\
4481.13&8.86&0.740&104.1&6.12\\
4481.32&8.86&0.590&80.0&5.92\\
Si II\\
5041.02&10.07&0.291&27.5&6.59\\
5055.98&10.07&0.593&25.5&6.24\\
6347.11&8.12&0.297&84.2&6.49\\
6371.37&8.12&--0.003&64.1&6.48\\
Ca I\\
4226.73&0.00&0.265&76.7&5.21\\
4454.78&1.90&0.335&27.7&5.71\\
Ca II\\
5019.97&7.51&--0.501&18.6&5.77\\
Sc II\\
4246.82&0.32&0.242&54.5&1.58\\
4314.08&0.62&--0.096&47.8&2.03\\
4320.73&0.60&--0.252&49.7&2.21\\
4325.00&0.59&--0.442&35.9&2.18\\
4374.46&0.62&--0.418&39.8&2.23\\
4400.39&0.60&--0.536&32.3&2.21\\
4415.56&0.59&--0.668&31.5&2.32\\
Ti II\\
4161.53&1.08&--2.160&20.8&4.27\\
4163.65&2.59&--0.210&76.3&4.22\\
4171.91&2.60&--0.270&75.0&4.27\\
4287.87&1.08&--1.820&38.8&4.26\\
4290.22&1.17&--0.930&91.1&4.16\\
4294.10&1.08&--0.880&95.2&4.12\\
4300.05&1.18&--0.490&129.9&4.43\\
4301.91&1.16&--1.200&78.7&4.25\\
4307.86&1.17&--1.100&62.6&3.93\\
4312.86&1.18&--1.090&77.5&4.13\\
4314.98&1.16&--1.120&69.8&4.04\\
4320.96&1.17&--1.900&43.4&4.47\\
4330.24&2.05&--1.800&21.6&4.57\\
4330.69&1.18&--2.060&24.3&4.30\\
4344.29&1.08&--1.930&19.8&3.99\\
4350.83&2.06&--1.810&12.6&4.32\\
4367.66&2.59&--0.870&34.9&4.28\\
4386.84&2.60&--0.940&27.2&4.21\\
4391.03&1.23&--2.240&19.2&4.38\\
4394.05&1.22&--1.770&37.7&4.28\\
4395.03&1.08&--0.510&142.4&4.62\\
4395.85&1.24&--1.970&31.7&4.39\\
4399.77&1.24&--1.220&78.3&4.31\\
4407.68&1.22&--2.430&10.4&4.27\\
4411.07&3.10&--0.670&23.0&4.18\\
4417.72&1.17&--1.230&76.0&4.23\\
4418.33&1.24&--1.990&25.0&4.27\\
\hline
Ti II\\
4421.94&2.06&--1.580&14.6&4.16\\
4443.79&1.08&--0.700&118.3&4.33\\
4450.48&1.08&--1.510&56.7&4.20\\
4464.45&1.16&--1.810&39.8&4.31\\
4488.33&3.12&--0.510&40.0&4.36\\
4529.47&1.57&--1.650&27.1&4.21\\
4533.97&1.24&--0.540&126.3&4.42\\
4549.62&1.58&--0.220&102.1&3.89\\
4563.76&1.22&--0.790&108.1&4.32\\
4571.97&1.57&--0.230&69.9&3.42\\
4589.96&1.24&--1.620&38.7&4.14\\
4763.88&1.22&--2.360&18.9&4.47\\
4779.98&2.05&--1.260&32.9&4.24\\
4798.52&1.08&--2.670&12.9&4.49\\
4805.09&2.06&--0.960&52.1&4.24\\
4874.01&3.10&--0.900&18.0&4.27\\
4911.19&3.12&--0.650&28.4&4.28\\
5129.15&1.89&--1.300&33.4&4.17\\
5154.07&1.57&--1.780&26.9&4.29\\
5185.91&1.89&--1.370&26.2&4.10\\
5188.68&1.58&--1.050&68.5&4.20\\
5226.54&1.57&--1.230&52.1&4.16\\
5336.77&1.58&--1.630&31.9&4.25\\
5381.02&1.57&--1.970&21.9&4.38\\
Cr II\\
4554.99&4.07&--1.282&14.8&4.40\\
4558.65&4.07&--0.449&44.5&4.18\\
4588.20&4.07&--0.627&34.6&4.20\\
4616.63&4.07&--1.361&15.0&4.48\\
4618.80&4.07&--0.840&26.1&4.25\\
4634.07&4.07&--0.990&19.1&4.23\\
4824.13&3.87&--0.970&20.6&4.11\\
5237.33&4.07&--1.160&13.0&4.21\\
Fe I\\
4143.87&1.56&--0.511&23.2&6.03\\
4199.10&3.05&0.155 &20.4&6.30\\
4202.03&1.49&--0.708&20.8&6.11\\
4260.47&2.40&0.109 &22.3&5.95\\
4271.76&1.49&--0.164&39.6&5.93\\
4325.76&1.61&0.006 &48.0&5.96\\
4383.55&1.49&0.200 &59.2&5.84\\
4415.12&1.61&--0.615&20.5&6.08\\
4891.49&2.85&--0.112&15.0&6.24\\
4920.50&2.83&0.068 &13.6&6.00\\
4957.60&2.81&0.233 &19.4&6.00\\
5269.54&0.86&--1.321& 8.7&5.82\\
5328.04&0.92&--1.466&14.3&6.24\\
Fe II\\
4173.46&2.58&--2.740&62.2&6.42\\
4178.86&2.58&--2.500&43.0&5.90\\
4233.17&2.58&--1.900&90.5&5.99\\
4296.57&2.70&--3.010&16.5&5.95\\
4351.77&2.70&--2.020&54.1&5.66\\
4385.39&2.78&--2.680&31.0&6.01\\
4416.83&2.78&--2.410&41.3&5.91\\
4489.18&2.83&--2.970&24.0&6.18\\
4491.40&2.86&--2.700&28.9&6.03\\
\hline
Fe II\\
4508.29&2.86&--2.250&43.9&5.84\\
4515.34&2.84&--2.450&34.4&5.87\\
4520.22&2.81&--2.600&33.0&5.98\\
4522.63&2.84&--2.030&43.0&5.60\\
4549.47&2.83&--2.020&80.0&6.10\\
4555.89&2.83&--2.160&46.2&5.76\\
4576.34&2.84&--2.920&18.9&6.01\\
4582.84&2.84&--3.090&16.1&6.10\\
4583.84&2.81&--1.860&79.8&5.92\\
4629.34&2.81&--2.330&45.9&5.91\\
4923.93&2.89&--1.320&121.3&6.14\\
5018.44&2.89&--1.220&127.4&6.15\\
5169.03&2.89&--1.303&134.4&6.37\\
5197.58&3.23&--2.100&45.9&5.96\\
5234.62&3.22&--2.230&47.6&6.11\\
5276.00&3.20&--1.940&57.3&5.95\\
5316.61&3.15&--1.850&67.0&5.97\\
5362.87&3.20&--2.739&29.6&6.31\\
6456.38&3.90&--2.100&45.8&6.46\\
Sr II\\
4215.52&0.00&--0.145&19.8&0.71\\
Y II\\
4177.53&0.41&--0.160&8.98&1.09\\
4374.94&0.41&0.160&11.10&0.86\\
Ba II\\
4554.03&0.00&0.170&17.03&0.95\\
4934.08&0.00&--0.150&8.042&0.88\\
\hline
\end{tabular}
\end{table}