\begin{table}%T8
\par
%\centering
\par
\caption{List of stars for which the main HIPPARCOS
frequency could be deduced (3${\rm rd}$ column, in d$^{-1}$) and fitted to our spectroscopic data, with its corresponding
amplitude (4${\rm rd}$~column, in mmag). Then the next columns respectively
provide the corresponding radial velocity amplitude [\kms] computed from a sine-fit
with the $f$-frequency (together with the associated fraction of
the variance this frequency accounts for), and then the total velocity range 
[\kms] measured. 
Finally, last column provides the $2K/\Delta m$ amplitudes ratio 
values [\kms~mag$^{-1}$].
}
\label{table7}
\begin{tabular}{rrlrrcc}
\hline\hline
\multicolumn{1}{c}{HD} &
\multicolumn{1}{c}{HIP} &
\multicolumn{1}{c}{$f$} &
\multicolumn{1}{c}{$a$} &
\multicolumn{1}{c}{$K$} &
\multicolumn{1}{c}{Range} &
\multicolumn{1}{c}{$2K/\Delta m$}\\
\hline
%\multicolumn{7}{c}{Photometric and spectroscopic fit}\\
   277 &   623      & 1.0809 & 23 & 1.13 (44\%) & [$-$9; $-$5]   & 49 \\
  9365 &  7280      & 1.5981 & 33 & 2.16 (86\%) & [$-$2; +4]   & 65 \\
 48271 & 32263      & 0.52436& 24 & 0.71 (10\%) & [$-$20; $-$15] & 30 \\
105458 & 59203      & 1.3207 & 15 & 1.44 (51\%) & [$-$14; $-$8]  & 96 \\
112429 & 63076      & 2.3556 & 20 & 1.84 (37\%) & [$-$15; 0]   & 92 \\
113867 & 63951      & 0.93166& 18 & 0.60 (23\%) & [0; +3]    & 33 \\
175337 & 92837      & 1.2712 & 16 & 0.56 (70\%) & [$-$1; +1]   & 35 \\
195068 &100859      & 1.2505 & 37 & 1.69 (48\%) & [$-$29; $-$20] & 46 \\
211699 &110163      & 0.9328 & 42 & 1.52 (50\%) & [+5; +10]  & 36 \\
\hline
\end{tabular}
\end{table}