\begin{table}%t7
%\centering
\par
\caption{VINCI/VLTI  and FLUOR/IOTA angular diameter measurements of $\zeta$~Gem.
No systematic calibration error is given for FLUOR/IOTA values (negligible compared to the
statistical uncertainty). The baseline is given for the VINCI/VLTI observations (in m), while the spatial frequency (in {\it italic})
is listed for the measurements obtained with FLUOR, expressed in cycles/arcsec. \label{table_angdiams_zeta_gem}}
\begin{tabular}{lcccccccl}
\hline\hline
\noalign{\smallskip}
JD & Stations & B, {\it SF} & Phase & $\theta_{\rm UD}$ (mas) & $\theta_{\rm LD}$ (mas) &
$N$ & $\chi^2_{\rm red}$ & Calibrators\\
 & & & & $\pm$ stat. $\pm$ syst. & $\pm$ stat. $\pm$ syst. & & \\
\hline
\noalign{\smallskip}
%$\zeta$~Gem -- VERSION CORRIGEE DU 01/09/03\\
2~452~214.879 & U1-U3 & 82.423 & 0.408 & $1.677 \pm 0.030 \pm 0.051$ & $1.725 \pm 0.031 \pm 0.052$ & 8 & 0.25 & 39~Eri\\
2~452~216.836 & U1-U3 & 72.837 & 0.600 & $1.712 \pm 0.057 \pm 0.067$ & $1.760 \pm 0.058 \pm 0.069$ & 6 & 0.28 & 39~Eri, $\gamma^2$~Vol\\
2~451~527.972 & IOTA-38m & {\it 84.870} & 0.739 & $1.606 \pm 0.334$ & $1.651 \pm 0.343$ & 1 & - & HD~49968\\
2~451~601.828 & IOTA-38m & {\it 83.917} & 0.014 & $1.709 \pm 0.086$ & $1.795 \pm 0.088$ & 3 & 0.02 & HD~49968\\
2~451~259.779 & IOTA-38m & {\it 83.760} & 0.318 & $2.040 \pm 0.291$ & $2.144 \pm 0.299$ & 1 & -  & HD~49968\\
2~451~262.740 & IOTA-38m & {\it 84.015} & 0.610 & $1.692 \pm 0.273$ & $1.767 \pm 0.281$ & 2 & 0.13 & HD~49968\\
2~451~595.863 & IOTA-38m & {\it 83.790} & 0.427 & $1.391 \pm 0.284$ & $1.306 \pm 0.292$ & 2 & 1.72 & HD~49968\\
2~451~602.764 & IOTA-38m & {\it 85.010} & 0.107 & $1.867 \pm 0.216$ & $1.962 \pm 0.222$ & 2 & 0.02 & HD~49968\\
\hline
\end{tabular}
\end{table}