\begin{table}
%\caption{Summary of the best fit LD angular diameters and distances 
%of the seven Cepheids observed with VINCI. The detailed results for each
%star and fitting order are presented in Tables \ref{results_cepheids0}
%to \ref{results_cepheids2}. }
%\label{results_cepheids_summary}
%\begin{tabular}{lccll}
%\hline
%\noalign{\smallskip}
%Star & Order & $\overline{\theta_{\rm LD}}$~(mas) & $d$~(pc) \\
%\noalign{\smallskip}
%\hline
%\noalign{\smallskip}
%X~Sgr & 0 & $1.471 \pm 0.033$ & $324 \pm 18$ \\
%\noalign{\smallskip}
%$\eta$~Aql & 2 & $1.839 \pm 0.028$ & $276^{+55}_{-38}$ \\
%\noalign{\smallskip}
%W~Sgr & 2 & $1.312 \pm 0.029$ & $379^{+216}_{-130}$\\
%\noalign{\smallskip}
%$\beta$~Dor & 2 & $1.891 \pm 0.024$ & $345^{+175}_{-80}$ \\
%\noalign{\smallskip}
%$\zeta$~Gem & 0 & $1.747 \pm 0.061$ & $360 \pm 25$\\
%\noalign{\smallskip}
%Y~Oph & 1 & $1.438 \pm 0.051$ & $648 \pm 52$ \\
%\noalign{\smallskip}
%$\ell$~Car & 2 & $2.988 \pm 0.012$ & $603^{+24}_{-19}$ \\
%\noalign{\smallskip}
%\hline
%\end{tabular}
%\end{table}