\begin{table}%t2
  \caption{\label{TabDIB}Observed wavelengths,
 heliocentric velocities, and equivalent widths of DIBs in the spectrum
of V838~Mon, and 
 corresponding reddenings~$E(B-V)$. For the visual region DIBs
 the first column of~$E(B-V)$ corresponds
 to Jenniskens \& D\'esert (\cite{jenn}) calibration and the
 second to Josafatsson \& Snow (\cite{josaf}) data. For $\lambda8621$~DIB
the calibration by Munari (\cite{munari99}) was used.}  
   $$
    \begin{array}{lllll} 
      \hline
      \hline
      \noalign{\smallskip}
 \rm{Wavelength~~~} & V_{\rm r}~{[\rm km~s}^{-1}]~~ & W_\lambda~{\rm[\AA]}~~ &
\multicolumn{2}{c}{E(B-V)} \\
      \noalign{\smallskip}
      \hline
      \noalign{\smallskip}
    5781.82 & 63\pm2 & 0.73\pm0.05 & 1.3 & 1.6 \\
    5798.43 & 64 & 0.21 & 1.6 & 1.6 \\
    5851.26 & 62 & 0.1{:} & 2.1 & 1.3 \\
     &&&& \\
    8620.79^1 &    & 0.15 & 0.41 &     \\
      \noalign{\smallskip}
      \hline
    \end{array}
  $$
   \begin{list}{}{}
   \item[] ~~~~~~~~$^1$ Not measured.
   \end{list}
 \end{table}