\begin{table}%[htb]%t1
%\centering
\par
\caption{
Calculated molecular and spectroscopic parameters
for CO$_2$:CH$_3$OH complex from Jamr\'oz et~al.~(\cite{Jamroz95}) (RHF/3-21G* level). Energy is the
stabilization energy of the complex. OOP means
"out of plane".\label{jamroz}}
\begin{tabular}{l c c c c c c}\hline\hline
Geometry      & Energy   & Distance	& Angle & In plane mode & OOP mode	 & Split  \\
              & (kcal~mol$^{-1}$) & (\AA)      & (deg) & (cm$^{-1}$)	 & (cm$^{-1}$)    &	(cm$^{-1}$) \\
\noalign{\smallskip} \hline \noalign{\smallskip}
Parallel	     & 8.59	    & 2.468	   & 174.07	& 676.2	 & 652.5	    & 23.7 \\
Perpendicular & 6.02	    & 2.600	   & 174.95	& 673.5	 & 652.9	    & 20.6 \\
\hline
\end{tabular}
\end{table}