\begin{table}%t5
%\centering
\par
\caption{Values for the measured ionising flux, predicted
ionising flux, the
measured electron density and ionised gas pressure for radio sources detected in the
survey.\label{tbl:ibl_results}}
\begin{tabular}{lccccc}\hline\hline
 & Cloud radius & Measured ionising flux & Predicted ionising flux & Electron density & Ionised gas
 pressure \\
Source ID & $R$ (pc) &  $\Phi$ (10$^{8}$ cm$^{-2}$~s$^{-1}$) &$\Phi_{\rm P}$ (10$^{8}$
 cm$^{-2}$~s$^{-1}$)
 & $n_{\rm e}$ (cm$^{-3}$ )& $P_{\rm i}/k_{B}$ (cm$^{-3}$~K)\\ \hline
SFO 57 & 0.10 & 7.7 & 29 & 214 & $4.3\times10^{6}$ \\
SFO 58b & 0.18 & 1.5 & 15 & 72 & $2.8\times10^{5}$ \\
SFO 61a & 0.81 & 3.1 & 0.2 & 85 & $1.9\times10^{5}$ \\
SFO 63 & 0.57 & 2.1 & 0.2 & 147 & $2.9\times10^{6}$ \\
SFO 64 & 0.75 & 2.3 & 20 & 133 &  $2.7\times10^{6}$ \\
SFO 66a & 0.16 & 2.4 & 6.4 & 93 & $1.9\times10^{6}$ \\
SFO 66b & 0.16 & 2.7 & 6.4 & 98 & $2.0\times10^{6}$ \\
SFO 67a & 0.35 & 3.0 & 22 & 72 & $1.4\times10^{6}$ \\
SFO 68 & 0.38 & 15 & 63 & 153 &  $3.1\times10^{6}$ \\
SFO 75 & 0.22 & 200 & 570 & 730 &$1.5\times10^{7}$ \\
SFO 76 & 0.12 & 22 & 110 & 333 & $6.7\times10^{6}$ \\
SFO 77 & 0.002 & 9.4 & 1.6 & 1660 & $3.3\times10^{7}$ \\
SFO 78 &  0.002 & 1.3 & 0.5 & 533 & $1.1\times10^{7}$ \\
SFO 82b & 0.24 & 4.9 & 1.0 & 111 &  $2.2\times10^{6}$ \\
SFO 83 & 0.19 & 3.7 & 1.9 & 108 &   $2.2\times10^{6}$ \\
SFO 84 & 0.40 & 5.4 & 2.3 & 89 &    $1.8\times10^{6}$ \\
SFO 89 & 0.10 & 16 & 19 & 303 &     $6.1\times10^{6}$ \\ \hline
\end{tabular}
\end{table}