\begin{table}%t1
%\centering
\par
\caption{Clouds observed in the survey, the pointing positions used and the resulting
image rms~noise values. Each cloud is identified by its SIMBAD ID, which corresponds 
to
the cloud number in Sugitani \& Ogura (\cite{so94}).\label{tbl:sources}}
\begin{tabular}{ccccc}
\hline\hline
Cloud ID & \multicolumn{2}{c}{Primary beam centre} &  $\lambda$ & Image rms\\\
&$\alpha$(2000)&$\delta$(2000) &(cm) &  (mJy/beam)\\
\hline
SFO 45 & 07:18:23.7 & --22:06:13  & 20/13  & 1.72/0.73\\
SFO 46 & 07:19:25.8 & --44:35:01  & 20/13  & 1.45 /0.24\\
SFO 47 & 07:31:48.9 & --19:27:33  & 20/13  & 1.10/0.60\\
SFO 48 & 07:34:24.9 & --46:54:12  & 20/13  & 0.86/0.57 \\
SFO 49 & 07:35:41.0 & --18:48:59  & 20/13  &  1.42/1.62\\
SFO 50 & 07:40:28.5 & --43:06:20  & 20/13  & 1.2/0.50\\
SFO 51 & 08:09:32.8 & --36:05:00  & 20/13  & 0.94/0.28\\
SFO 52 & 08:25:43.9 & --51:00:37  & 20/13  & 3.15/1.05 \\
SFO 53 & 08:26:31.7 & --50:40:30  & 20/13  & 3.20/3.60 \\
SFO 54 & 08:35:31.7 & --40:38:28  & 20/13  & 1.70/0.53 \\
SFO 55 & 08:41:13.0 & --40:52:03  & 20/13  & 0.50/0.50\\
SFO 56 & 08:42:59.6 & --39:59:56  & 20/13  & 1.20/0.30\\
SFO 57 & 08:44:07.7 & --41:16:14  & 6/3    & 0.67/0.33\\
SFO 58 & 08:45:25.4 & --41:16:02  & 20/13  &0.61/0.33\\
SFO 59 & 08:58:04.2 & --47:22:57  & 20/13  & 83.40/101.58\\
SFO 60 & 09:00:01.2 & --47:31:37  & 20/13  & 120/200\\
SFO 61 & 11:00:13.5 & --59:36:09  & 6/3    & 0.50/0.18 \\
SFO 62 & 11:01:15.8 & --59:51:01  & 6/3    & 0.40/0.21 \\
SFO 63 & 11:03:18.8 & --59:48:01  & 6/3    & 0.68/0.34\\
SFO 64 & 11:12:18.1 & --58:46:20  & 20/13  & 1.00/0.52\\
SFO 65 & 11:32:55.3 & --63:27:59  & 20/13  & 3.10/1.30\\
SFO 66 & 11:33:49.5 & --63:16:20  & 6/3    & 0.67/0.32 \\
SFO 67 & 11:34:00.7 & --63:11:19  & 6/3    &0.67/0.32\\
SFO 68 & 11:35:31.9 & --63:14:51  & 6/3    &0.80/0.33\\
SFO 69 & 11:41:11.2 & --63:23:13  & 20/13  &4.98/5.00\\
SFO 70 & 11:42:11.2 & --63:07:50  & 6/3    &0.51/0.33\\
SFO 71 & 13:08:12.7 & --62:10:27  & 20/13  &7.10/4.10\\
SFO 72 & 13:19:07.7 & --62:33:44  & 20/13  &3.60/1.80\\
SFO 73 & 13:20:05.7 & --62:24:03  & 20/13  &1.00/6.02 \\
SFO 74 & 14:19:42.1 & --61:25:17  & 20/13  &1.67/0.6\\
SFO 75 & 15:55:50.4 & --54:38:58  & 20/13  &41.00/9.00\\
SFO 76 & 16:10:38.6 & --49:05:52  & 6/3    & 0.32/1.02\\
SFO 77 & 16:19:53.9 & --25:33:39  & 6/3    &0.67/0.22\\
SFO 78 & 16:20:52.9 & --25:08:07  & 6/3    &0.53/0.23\\
SFO 79 & 16:40:00.1 & --48:51:45  & 6/3    &43.33/41.02\\
%\hline 
%\end{tabular}
%%\end{center}
\par
%\end{table}