\begin{table}%T1
\par
\caption{\label{tab:balmer}Wavelength ranges around the hydrogen Balmer lines for which the Land\'e
factor has been set to~1. In all other wavelength ranges the Land\'e factor $g_{\rm eff}=1.25$ has 
been adopted. 
}
%\centering
\par
\begin{tabular}{cc}
\hline\hline
Line(s) & Wavelength range [\AA{}] \\
\hline
H$_{16}$--H$_{10}$ & 3701--3801 \\
H$_9$ & 3820.5--3852.5 \\
H$_8$ & 3870.2--3910.2 \\
H$_\epsilon$ & 3941.2--4001.2 \\
H$_\delta$ & 4082.9--4122.9 \\
H$_\gamma$ & 4311.7--4371.7 \\
H$_\beta$ & 4812.7--4912.7 \\
H$_\alpha$ & 6512--6612 \\
\hline
\end{tabular}
\end{table}