\begin{table}%t1
\caption{\label{tab1}The $R, I$~magnitudes of the nova NMS-1 during outburst. The fractional value
for the Julian date is given for those points where we calibrated the~magnitude
for each individual frame of that night.}
%\centering
\par
\begin{tabular}{cccc|ccc}
\hline\hline
JD     &  $R$ &  JD    & $I$ &JD     &  $R$ &  $I$ \\  
(+2~450~000)&  (mag)       & (+2~450~000)&  (mag)  &  (+2~450~000)&  (mag)       &  (mag)   \\  \hline
1836.287 & 18.69~$\pm$~0.02 & 1836.316 & 18.38~$\pm$~0.03&1869     & 19.64~$\pm$~0.03   & 19.32~$\pm$~0.06\\
1836.292 & 18.64~$\pm$~0.02 & 1836.321 & 18.38~$\pm$~0.02&1870     & 19.67~$\pm$~0.02   & 19.23~$\pm$~0.05\\
1836.296 & 18.60~$\pm$~0.02 & 1836.327 & 18.36~$\pm$~0.02&1872     & 19.69~$\pm$~0.03   & 19.39~$\pm$~0.05\\
1836.299 & 18.57~$\pm$~0.02 & 1836.333 & 18.36~$\pm$~0.02&1874     & 19.80~$\pm$~0.02   & 19.42~$\pm$~0.05\\
1836.303 & 18.59~$\pm$~0.02 & 1836.338 & 18.15~$\pm$~0.05&1877     & 19.84~$\pm$~0.03   & 19.34~$\pm$~0.07\\
1838.213 & 17.19~$\pm$~0.01 & 1838.236 & 16.97~$\pm$~0.01&1878     & 19.93~$\pm$~0.02   & 19.24~$\pm$~0.06\\
1838.218 & 17.16~$\pm$~0.01 & 1838.245 & 16.95~$\pm$~0.01&1879     & 20.00~$\pm$~0.03   & 19.44~$\pm$~0.08\\
1838.224 & 17.19~$\pm$~0.01 & 1838.250 & 16.94~$\pm$~0.01&1881     & 19.97~$\pm$~0.02   & 19.70~$\pm$~0.06\\
  --      &    --           & 1838.255 & 16.96~$\pm$~0.01&1884     & 20.13~$\pm$~0.02   & 19.55~$\pm$~0.05\\
  --      &    --           & 1838.259 & 16.94~$\pm$~0.01&1888     & 19.97~$\pm$~0.07   & 19.35~$\pm$~0.08\\
 1843     & 17.74~$\pm$~0.01&          & 17.27~$\pm$~0.01&1890     & 20.18~$\pm$~0.06   & 19.37~$\pm$~0.05\\
 1845     & 18.09~$\pm$~0.02&          & 17.67~$\pm$~0.02&1905     & 20.88~$\pm$~0.06   & 19.72~$\pm$~0.05\\
 1851     & 18.69~$\pm$~0.02&          & 18.44~$\pm$~0.03&1915     & 20.60~$\pm$~0.12   & 19.40~$\pm$~0.12\\
 1853     & 18.84~$\pm$~0.02&          & 18.54~$\pm$~0.05&1918     & --                & 19.12~$\pm$~0.08\\
 1855     & 19.04~$\pm$~0.02&          & 18.71~$\pm$~0.04&1921     & 20.82~$\pm$~0.08   & 19.40~$\pm$~0.06\\
 1862     & 19.20~$\pm$~0.03&          & 18.89~$\pm$~0.04&1924     & 20.96~$\pm$~0.07   & 19.56~$\pm$~0.04\\
 1863     & 19.35~$\pm$~0.03&          & 19.03~$\pm$~0.04&1925     & 20.81~$\pm$~0.06   & 19.52~$\pm$~0.04\\
 1866     & 19.57~$\pm$~0.02&          & 19.29~$\pm$~0.07&1926     & 20.85~$\pm$~0.08   & --             \\
 1867     & 19.61~$\pm$~0.03&          & 19.09~$\pm$~0.04&1927     & 21.28~$\pm$~0.09   & 19.50~$\pm$~0.07\\
 1868     & 19.68~$\pm$~0.02&          & 19.19~$\pm$~0.06&1929     & 21.63~$\pm$~0.11   & --             \\
 \hline   
\end{tabular}
\end{table}