\begin{table}%t2
\par
\caption{\label{sssdata}Positions and photometry of
\object{1RXS~J115928.5--524717} measured at different epochs.}
%\centerline
{
\begin{tabular}{llcrl}
\hline\hline
~~$\alpha$(J2000)& ~~$\delta$(J2000)& epoch    & photometry & $\!\!\!\!$note \\
\hline
11 59 30.178 & $-$52 47 15.85 & 1976.26 & $B_J =21.00$& 1 \\
11 59 30.147 & $-$52 47 17.04 & 1977.41 & $B_J =20.75$& 1, $*$ \\
11 59 29.665 & $-$52 47 16.28 & 1980.23 & $I =14.49$  & 1 \\
11 59 29.340 & $-$52 47 16.65 & 1983.18 & $I =13.76$  & 1 \\
11 59 29.089 & $-$52 47 16.92 & 1985.19 & $RE =17.70$ & 2 \\
11 59 28.996 & $-$52 47 16.55 & 1986.14 & $RE =17.44$ & 2, $*$ \\
11 59 28.425 & $-$52 47 17.45 & 1991.12 & $OR =17.66$ & 1, $*$ \\
11 59 28.268 & $-$52 47 17.98 & 1992.24 & $OR =18.07$ & 1 \\
11 59 27.531 & $-$52 47 18.64 & 1998.32 & $RHa =17.30$ & 3 \\
11 59 27.515 & $-$52 47 18.56 & 1998.39 & $SR2 =17.96$ & 3 \\
11 59 27.43  & $-$52 47 18.8  & 1999.36 & $J=11.430$ & 4 \\
             &              &         & $H=10.763$ & 4 \\
             &              &         & $K_{\rm s}=10.322$& 4 \\
11 59 27.32  & $-$52 47 19.0  & 2000.78 & $I=14.499$ & 5, $*$ \\
             &              &         & $J=11.398$ & 5 \\
             &              &         & $K=10.343$ & 5 \\
11 59 27.047 & $-$52 47 19.32 & 2002.55 & $R=17.08$  & 6 \\
\hline
\end{tabular}}
\smallskip
Notes: \\
1 -- SSS measurements of UKST plates. \\
2 -- SSS measurements of ESO Schmidt plates. \\
3 -- SHS film scans. \\
4 -- 2MASS all-sky data release. \\
5 -- DENIS second data release. \\
6 -- Position from two DFOSC acquisition images ($R$ and $I$). \\
$*$ -- Measurements not used in final proper motion solution, due to
       overlap with a background object. Photometry is also affected. \\
\end{table}