\begin{table}%t3
%\centering
\par
\caption{Summary of the modes detected in BV Cir.\label{tab3}}
\begin{tabular}{rrrrrrrr}
\hline\hline\noalign{\smallskip}
Freq.&\multicolumn{3}{c}{Spectr.}&&\multicolumn{2}{c}{Photom.}&Comment\\
\cline{2-4}\cline{6-7}
[\cd]  &1995&1996& 1998 &&1980 &1998\\
\hline
0.65  & N & Y & Y && Y & Y& doubtful\\
1.47  & Y & Y & Y && N & N & HNRR\\
2.22  & N & N & Y && N & N& doubtful\\
6.33  & Y & Y & Y && Y & Y& R\\
7.89  & Y & Y & Y && Y & Y& LNR\\
8.02  & Y & N & N && N & N& doubtful\\
9.91  & N & N & N && Y & Y& LNR\\
10.23 & N & N & N && Y & Y& LNR\\
11.08 & N & N & N && Y & N& doubtful\\
11.13 & N & N & N && Y & N& LNR\\
11.63 & N & Y & Y && Y & Y& LNR \\
12.29 & N & N & N && Y & Y& LNR\\ 
12.38 & N & Y & N && Y & Y& ?NR \\
13.85 & Y & Y & Y && N & N& HNRP \\
14.38 & Y & Y & Y && N & N& HNRP \\
14.62 & Y & N & N && N & N& HNRP \\
14.94 & Y & Y & Y && N & N& HNRP \\
15.80 & N & N & Y && N & N& HNRP \\
16.44 & N & N & Y && N & N& HNRP \\
17.28 & N & N & Y && N & N& HNRP \\ 
\hline
\end{tabular}
\par
\end{table}