\begin{table}%T7
\caption{\label{surfacefluxes}Surface fluxes (in units of~10$^{3}$~erg~cm$^{-2}$~s$^{-1}$), and {\it FWHM}~(km~s$^{-1}$) of a selection of lines present in the~spectra
of both  \object{$\alpha$~Cen~A}  and the \object{Sun}.  Included lines
have fluxes in the \object{$\alpha$~Cen~A}~spectrum greater than~$5\times 10^{-14}$~erg~s$^{-1}$~cm$^{-2}$. }
%\centering
\par
\begin{tabular}{cc|ccc|ccc||cc|ccc|ccc}
\hline
\hline
 \multicolumn{1}{c} {Line} &  \multicolumn{1}{c} {Lab}  &
\multicolumn{2}{|c}{Surface Flux} & \multicolumn{1}{c}{Flux}
&\multicolumn{2}{|c}{{\it FWHM}}  & {\it FWHM} & \multicolumn{1}{|c} {Line} &  \multicolumn{1}{c} {Lab}  &
\multicolumn{2}{|c}{Surface Flux} & \multicolumn{1}{c}{Flux}
&\multicolumn{2}{|c}{{\it FWHM}}  & \multicolumn{1}{c}{{\it FWHM}}  \\
\par
  \multicolumn{1}{c}{ID} &\multicolumn{1}{c|} {Wavel.} &  \multicolumn{2}{l}{$\alpha$~Cen~A}     &\multicolumn{1}{c|}{Ratio} &
 \multicolumn{2}{l}{$\alpha$ Cen} & Ratio &  \multicolumn{1}{|c}{ID} &\multicolumn{1}{c|} {Wavel.} &  \multicolumn{2}{l}{$\alpha$~Cen~A}  &  \multicolumn{1}{c|}{Ratio} &
 \multicolumn{2}{l}{$\alpha$~Cen~A} & \multicolumn{1}{c}{Ratio}\\
\par
 & \multicolumn{1}{c|}{(\AA )} &\multicolumn{2}{r}{Sun} &
 \multicolumn{1}{c|}{$\frac{\rm Sun}{\alpha \rm Cen A}$}
 & \multicolumn{2}{r}{Sun}
 &$\frac{\rm Sun}{\alpha \rm Cen A}$ &   & \multicolumn{1}{c|}{(\AA )}&\multicolumn{2}{r}{Sun} & 
 \multicolumn{1}{c|}{$\frac{\rm Sun}{\alpha \rm Cen A}$}
 &\multicolumn{2}{r}{Sun}
 &\multicolumn{1}{c}{$\frac{\rm Sun}{\alpha \rm Cen A}$}\\
 \hline
         S I & 1300.907 &    0.15 &    0.12 & 0.82 &  13 &  18 & 1.36  & C I+ & 1608.438 &    0.30 &    0.46 & 1.55 &  31 &  28 & 0.92 \\
         O I & 1302.169 &    1.98 &    1.80 & 0.91 &  33 &  32 & 0.96  &	 +Fe II  & & & & & & & \\
       Si II & 1304.372 &    0.18 &    0.16 & 0.88 &  31 &  33 & 1.04   &	       Fe II & 1610.921 &    0.31 &    0.24 & 0.76 &  23 &  20 & 0.89  \\
         O I & 1304.858 &    2.10 &    1.84 & 0.88 &  33 &  27 & 0.80  &	       Fe II & 1611.201 &    0.21 &    0.17 & 0.82 &  17 &  15 & 0.85  \\
         O I & 1306.029 &    2.17 &    1.96 & 0.90 &  29 &  24 & 0.83   &	       Fe II & 1612.802 &    0.39 &    0.34 & 0.87 &  26 &  26 & 0.97 \\
        C II & 1334.532 &    3.27 &    2.68 & 0.82 &  43 &  31 & 0.74   &	         C I & 1613.376 &    0.18 &    0.15 & 0.85 &  12 &  13 & 1.12 \\
        C II & 1335.708 &    4.53 &    3.82 & 0.84 &  47 &  36 & 0.76   &	         C I & 1613.803 &    0.17 &    0.13 & 0.77 &  12 &  13 & 1.07  \\
        Cl I & 1351.657 &    0.30 &    0.32 & 1.06 &  12 &  12 & 0.97 &	         C I & 1614.507 &    0.19 &    0.13 & 0.68 &  13 &  12 & 0.97 \\
         O I & 1355.598 &    0.46 &    0.42 & 0.91 &  12 &  12 & 0.99  &	       Fe II & 1618.470 &    0.25 &    0.30 & 1.21 &  24 &  20 & 0.83 \\
       Si IV & 1393.755 &    2.22 &    2.14 & 0.97 &  44 &  31 & 0.72  &	       Fe II & 1623.091 &    0.28 &    0.25 & 0.89 &  24 &  22 & 0.92  \\
       O IV] & 1401.157 &    0.23 &    0.16 & 0.72 &  46 &  36 & 0.79&	       Fe II & 1625.520 &    0.47 &    0.32 & 0.69 &  27 &  23 & 0.86 \\
       Si IV & 1402.770 &    1.12 &    0.83 & 0.75 &  42 &  29 & 0.69   &	       Fe II & 1625.909 &    0.20 &    0.20 & 0.98 &  17 &  18 & 1.02 \\
      O IV]+ & 1404.806 &    0.12 &    0.08 & 0.66 &  47 &  45 & 0.97   &	       Fe II & 1632.668 &    0.37 &    0.39 & 1.06 &  20 &  18 & 0.90  \\
      +S IV  & & & & & & & &	       Fe II & 1633.908 &    0.37 &    0.32 & 0.86 &  26 &  24 & 0.94 \\
         S I & 1472.972 &    0.38 &    0.28 & 0.74 &  18 &  18 & 1.02   &	       Fe II & 1637.397 &    0.49 &    0.43 & 0.89 &  25 &  24 & 0.94 \\
         S I & 1473.995 &    0.21 &    0.20 & 0.92 &  16 &  15 & 0.96   &	       Fe II & 1640.152 &    0.52 &    0.69 & 1.33 &  22 &  22 & 1.00 \\
        N IV & 1486.496 &    0.16 &    0.06 & 0.40 &  45 &  33 & 0.74    &	       He II & 1640.400 &    0.62 &    1.60 & 2.59 &  52 &  52 & 1.00  \\
       Si II & 1526.708 &    0.67 &    1.64 & 2.44 &  32 &  32 & 0.98    &	       Fe II & 1643.576 &    0.45 &    0.42 & 0.94 &  22 &  22 & 1.00 \\
       Si II & 1533.432 &    0.74 &    1.65 & 2.23 &  37 &  31 & 0.86    &	       Fe II & 1649.423 &    0.30 &    0.21 & 0.71 &  22 &  18 & 0.84 \\
        C IV & 1548.187 &    4.50 &    5.11 & 1.13 &  49 &  45 & 0.88     &	         C I & 1656.260 &    1.68 &    2.05 & 1.22 &  37 &  30 & 0.84 \\
       Fe II & 1550.260 &    0.13 &    0.11 & 0.89 &  20 &  20 & 1.01 &	         C I & 1656.928 &    1.34 &    2.25 & 1.69 &  58 &  54 & 0.92 \\
        C IV & 1550.772 &    2.39 &    2.39 & 1.00 &  52 &  47 & 0.88    &	         C I & 1657.380 &    1.51 &    1.86 & 1.23 &  35 &  31 & 0.89 \\
       Fe II & 1559.084 &    0.47 &    0.39 & 0.82 &  30 &  29 & 0.96    &	         C I & 1657.900 &    0.99 &    1.52 & 1.53 &  28 &  27 & 0.96  \\
          C I & 1560.310 &    0.51 &    0.60 & 1.17 &  27 &  29 & 1.06   &	         C I & 1658.120 &    1.22 &    1.76 & 1.44 &  30 &  26 & 0.87  \\
          C I & 1560.683 &    0.60 &    0.73 & 1.22 &  30 &  36 & 1.21  &	       Fe II & 1658.771 &    0.50 &    0.42 & 0.83 &  24 &  20 & 0.85 \\
          C I & 1561.341 &    0.83 &    1.19 & 1.42 &  56 &  51 & 0.92   &	       Fe II & 1659.483 &    0.75 &    0.69 & 0.91 &  27 &  26 & 0.97 \\
       Fe II & 1563.788 &    0.42 &    0.37 & 0.88 &  28 &  26 & 0.92  &	       O III & 1660.803 &    0.17 &    0.12 & 0.73 &  20 &  22 & 1.07 \\
       Fe II & 1566.819 &    0.30 &    0.25 & 0.81 &  25 &  24 & 0.96  &	       O III & 1666.153 &    0.31 &    0.13 & 0.43 &  45 &  34 & 0.76 \\
       Fe II & 1569.674 &    0.24 &    0.29 & 1.24 &  22 &  22 & 0.99 &	       Fe II & 1669.663 &    0.22 &    0.15 & 0.67 &  16 &  12 & 0.75 \\
       Fe II & 1570.242 &    0.35 &    0.39 & 1.12 &  23 &  25 & 1.07  &	       Al II & 1670.787 &    1.78 &    3.57 & 2.01 &  44 &  41 & 0.94 \\
       Fe II & 1577.166 &    0.15 &    0.19 & 1.22 &  18 &  18 & 0.95 &	       Fe II & 1674.254 &    0.40 &    0.35 & 0.87 &  20 &  17 & 0.85 \\
       Fe II & 1580.625 &    0.30 &    0.30 & 1.02 &  22 &  24 & 1.07  &	      Fe II+ & 1685.954 &    0.29 &    0.38 & 1.30 &  23 &  21 & 0.92  \\
       Fe II & 1584.949 &    0.28 &    0.30 & 1.08 &  23 &  22 & 0.94 &	 +Ni II  & & & & & & & \\
       Fe II & 1588.286 &    0.36 &    0.55 & 1.53 &  21 &  19 & 0.90 &	       Fe II & 1686.455 &    0.44 &    0.55 & 1.26 &  23 &  20 & 0.84  \\
         C I & 1602.972 &    0.13 &    0.13 & 0.99 &  15 &  16 & 1.07 &	       Fe II & 1686.692 &    0.60 &    0.59 & 0.99 &  25 &  26 & 1.04  \\
\hline
\end{tabular}
\end{table}