\begin{table}%t1
\caption{Broad-band mid-IR photometry of Arp~299.}
\label{tab:fluxes}
%\centerline
{\begin{tabular}{lccc}
\hline 
\hline
Source & LW2$^{\dag}$ (mJy)   &  LW3$^{\dag}$   (mJy)  &  LW3/LW2
\\
\hline
A            &  325 &  1860 & 5.72 \\
B            &  505 &  1951 & 3.86 \\
C            &  126 &   461 & 3.66 \\
C$^\prime$   &   76 &   232 & 3.05 \\
Total        & 1846 &  7037 & 3.81 \\
\hline
\end{tabular}}
$^{\dag}$ Using a beam of 4.5{\arcsec} in diameter 
(aperture corrections were applied to account for the
overall extension of the PSF).
\end{table}