\begin{table}%T4
%\centering
\par
\caption{ List of 103 QSO candidates identified with a ROSAT-FSC source
and located in zone IVa.
Column 1: right ascension, Col. 2: declination, Col. 3: separation between 
the ROSAT and USNO positions in arcsec, Col. 4: X-ray count 
rate (count s$^{-1}$), Col. 5: magnitude $O_{\rm USNO}$, Col. 6: magnitude $O_{\rm APS}$, 
Col. 7: APS $O-E$ colour, Col. 8: redshift, Col. 9: absolute $O_{\rm USNO}$ magnitude, 
Col. 10: classification: DA, DN, WD: white dwarfs; *: stars; CV: cataclysmic variable; 
BL: BL~Lac object; S1: Seyfert 1 galaxy; S1n: Narrow Line Seyfert 1; Q: QSO; 
Col. 11: reference: (1) OAGH and (2) OHP observations, Col. 12: name.}
\label{catalog}
\begin{tabular}{rrr|rrr|r|c|crr|c|l|l|c|l}
\hline\hline \multicolumn{6}{c}{J2000 USNO position} \\
%\hline \multicolumn{3}{c}{$\alpha$} & \multicolumn{3}{c}{$\delta$} \\
\hline
h & m  & s & $^{\circ}$ & $'$ & $''$ & $''$ & $c/r$ & $O_{\rm US}$ & $O_{\rm APS}$ & $O-E$ & $z$ & $M_{\rm abs}$ & & Ref. & Name  \\
\hline
\par
  0 & 11 & 19.46 & 28 & 17 & 50.8 &  18.7 & 0.023 & 15.5 & 15.88 &   0.12 &       &        & *     & 1 &                      \\
  0 & 13 &  4.80 & 10 & 11 & 28.6 &   5.8 & 0.023 & 16.0 & 16.25 &   0.32 & 0.239 & --24.9 & Q     & 1 &                      \\
  0 & 40 & 46.17 & 18 & 54 & 24.3 &  17.0 & 0.026 & 16.0 & 16.71 & --0.12 & 0.153 & --23.3 & Q     & 1 &                      \\
  1 &  7 & 37.51 & 22 & 22 & 32.3 &  33.7 & 0.042 & 16.2 & 16.89 &   0.68 &       &        & *     & 2 &                      \\
  1 & 20 & 46.96 & 23 & 31 & 40.1 &  28.7 & 0.047 & 15.9 & 16.27 &   0.54 &       &        & *     & 2 &                      \\
  1 & 37 & 37.24 & 30 &  2 & 49.1 &  13.1 & 0.035 & 13.5 & 16.90 &   0.36 &       &        & DN    &   & TX Tri               \\
  2 & 55 & 30.70 &  7 & 25 & 57.1 &  19.4 & 0.030 & 16.3 & 16.97 &   0.66 & 0.707 & --27.0 & Q     & 1 &                      \\
  3 & 53 & 15.60 &  9 & 56 & 35.1 &  24.0 & 0.030 & 16.0 & 16.49 & --0.82 &       &        & *     & 2 &                      \\
  8 & 23 & 46.65 & 24 & 53 & 51.2 &  18.5 & 0.039 & 15.6 & 15.83 & --0.40 &       &        & WD    & 1 & TON  316             \\
  8 & 39 & 34.28 & 23 & 34 & 10.4 &  12.8 & 0.041 & 15.8 & 16.49 & --0.52 &       &        & DA    &   & PG 0836+237          \\
  8 & 45 & 51.14 & 60 &  9 & 13.7 &  13.3 & 0.027 & 16.0 & 16.30 & --0.46 &       &        & DA    &   & PG 0841+603          \\
  8 & 50 & 20.09 & 54 & 33 & 50.5 &  17.3 & 0.038 & 16.4 & 16.78 &   0.62 &       &        & *     & 1 &                      \\
  8 & 56 & 32.44 & 50 & 41 & 14.1 &   5.1 & 0.027 & 15.8 & 15.57 & --0.58 & 0.235 & --25.0 & Q     & 1 &                      \\
  9 &  3 & 32.62 & 16 & 26 &  1.4 &  21.7 & 0.037 & 16.2 & 16.59 &   0.24 &       & & *     & 1 & LB 9181              \\
  9 & 10 & 35.38 & 31 & 27 & 45.9 &  27.0 & 0.048 & 16.3 & 16.21 &   0.42 &       & & *     & 1 &                      \\
  9 & 10 & 37.97 & 53 & 12 &  2.8 &  19.3 & 0.030 & 16.4 & 16.82 &   0.52 &       & & *     & 1 &                      \\
  9 & 12 & 15.50 &  1 & 19 & 59.3 &   3.8 & 0.041 & 16.5 & 16.76 & --0.50 &       & & *     & 1 &                      \\
  9 & 20 & 47.61 & 51 & 25 & 38.8 &  33.1 & 0.021 & 15.7 & 15.65 &   0.12 &       & & *     & 1 &                      \\
  9 & 30 &  6.76 & 52 & 28 &  4.0 &  12.0 & 0.039 & 15.8 & 16.37 & --0.02 &       & & *     &   & PG 0926+527          \\
  9 & 30 & 21.87 & 23 & 53 & 30.1 &  19.2 & 0.027 & 16.0 & 16.70 &   0.14 & 0.243 & --24.3 & Q     & 1 &                      \\
  9 & 30 & 34.46 & 20 & 44 & 16.9 &   5.2 & 0.045 & 16.1 & 17.09 &   0.64 & 1.169 & --28.4 & Q     & 1 &                      \\
  9 & 45 & 13.97 & 15 & 10 & 11.7 &  17.9 & 0.057 & 15.8 & 17.66 &   0.86 &       & & *     & 1 &                      \\
  9 & 46 & 34.50 & 13 & 50 & 58.3 &  34.4 & 0.027 & 15.8 & 16.75 &   0.10 &       & & CV    & 1 &                      \\
  9 & 49 & 39.77 & 17 & 52 & 49.5 &  12.0 & 0.021 & 16.3 & 18.65 &   0.60 &       & &       &   &                      \\
  9 & 52 & 45.70 &  2 &  9 & 38.7 &  17.1 & 0.025 & 15.2 & 16.32 & --0.76 &       & & DA    &   & PG 0950+024          \\
  9 & 56 & 49.88 & 29 & 50 & 14.6 &  10.7 & 0.046 & 15.4 & 16.09 & --0.10 & 0.845 & --28.5 & Q     & 1 & TON  465             \\
  9 & 57 & 11.78 & 63 & 10 & 10.2 &   3.8 & 0.024 & 16.4 & 16.25 & --0.06 & 0.918 & --27.6 & Q     & 1 &                      \\
 10 &  6 & 14.64 & 44 & 19 &  7.1 &  15.6 & 0.030 & 16.5 & 16.93 & --0.30 &       & & DA    &   &                      \\
 10 & 34 & 53.07 & 44 & 57 & 23.1 &  20.5 & 0.023 & 16.1 & 16.57 &   0.38 & 1.422 & --29.0 & Q     & 1 &                      \\
 10 & 35 & 27.50 & 49 & 58 & 27.7 &  22.8 & 0.021 & 16.5 & 17.44 &   0.36 & 1.427 & --28.5 & Q     & 1 &                      \\
 10 & 44 & 19.33 & 19 & 57 & 47.9 &  24.2 & 0.039 & 15.6 & 15.90 &   0.44 &       & & *     & 1 &                      \\
 10 & 46 & 42.30 & 39 & 20 & 18.2 &   8.3 & 0.043 & 16.4 & 17.16 &   0.22 & 0.390 & --25.3 & Q     & 1 &                      \\
 10 & 47 & 30.55 & 10 & 17 & 28.9 &  17.7 & 0.228 & 15.4 & 15.81 &   0.08 & 0.145 & --24.3 & Q     & 1 &                      \\
 11 &  8 & 42.46 & 16 & 50 & 40.2 &  31.2 & 0.030 & 15.6 & 16.48 &   0.04 &       & & *     & 1 &                      \\
 11 & 14 &  1.95 & 52 & 27 & 11.6 &  29.8 & 0.023 & 15.5 & 15.62 &   0.40 &       & & *     & 1 &                      \\
 11 & 15 &  7.70 &  2 & 37 & 57.7 &   7.6 & 0.024 & 16.5 & 17.08 & --0.04 & 0.564 & --26.1 & Q     & 1 &                      \\
 11 & 26 & 16.19 & 32 & 59 & 53.7 &  29.3 & 0.029 & 16.2 & 15.66 &   0.24 &       & & *     & 1 &                      \\
 11 & 33 & 31.23 & 58 & 57 & 47.8 &  19.9 & 0.025 & 15.9 & 15.98 &   0.44 &       & & *     & 1 &                      \\
 11 & 34 & 25.08 & 23 & 16 &  8.8 &  24.0 & 0.039 & 16.3 & 16.66 &   0.64 &       & & *     & 1 &                      \\
 11 & 38 & 36.32 & 47 & 55 & 10.0 &  13.3 & 0.046 & 16.1 & 17.53 & --0.48 &       & & *     & 1 &                      \\
 11 & 41 & 52.82 & 25 & 35 & 33.5 &  10.8 & 0.042 & 16.3 & 16.82 & --0.96 &       & & *     & 1 &                      \\
 11 & 47 & 47.34 & 26 &  0 & 49.0 &  10.9 & 0.042 & 15.5 & 15.84 &   0.00 &       & & *     & 1 &                      \\
 12 & 19 & 57.97 & 27 &  8 & 57.2 &   9.5 & 0.023 & 16.1 & 17.17 &   0.76 &       & & *     & 1 &                      \\
 12 & 31 & 25.72 & 25 & 55 & 59.8 &   5.7 & 0.032 & 15.8 & 16.16 &   0.54 &       & & *     & 1 &                      \\
 12 & 32 & 54.28 & 36 & 44 &  7.4 &  32.5 & 0.022 & 16.0 & 16.61 & --0.08 &       & & WD    & 1 & CBS  353             \\
 12 & 52 & 30.85 & 14 & 26 &  9.3 &  24.3 & 0.029 & 16.3 & 17.30 &   0.10 &       & &       &   &                      \\
 12 & 57 & 37.02 & 16 & 30 & 48.6 &  13.5 & 0.035 & 16.1 & 16.95 &   0.66 & 1.017 & --28.2 & Q     & 1 &                      \\
 12 & 59 & 38.22 & 60 & 38 & 59.4 &  15.9 & 0.039 & 16.3 & 16.47 & --0.48 &       & & *     & 1 & SBS 1257+609         \\
 12 & 59 & 44.45 & 68 &  4 &  0.8 &  30.9 & 0.022 & 16.3 & 16.64 & --0.72 &       & & *     & 1 & FBS 1257+683         \\
 13 &  0 &  6.40 & 44 & 42 & 50.9 &  13.9 & 0.036 & 16.2 & 16.06 &   0.46 &       & & *     & 1 &                      \\
 13 & 10 & 11.30 &  7 & 58 & 16.5 &  21.2 & 0.030 & 15.8 & 16.52 & --0.08 & 0.578 & --27.0 & Q     & 1 &                      \\
 13 & 13 & 15.90 &  9 & 18 & 20.4 &  27.7 & 0.021 & 16.4 & 17.34 &   0.10 & 1.790 & --29.2 & Q     & 1 &                      \\
 13 & 14 & 30.78 & 13 &  7 & 45.8 &  23.8 & 0.044 & 16.3 & 17.00 &   0.24 & 0.741 & --27.1 & Q     & 1 &                      \\
 13 & 20 &  1.10 &  7 & 18 & 17.1 &  21.1 & 0.038 & 16.5 & 16.97 &   0.74 & 0.866 & --26.9 & Q     & 1 &                      \\
 13 & 20 & 22.53 & 30 & 56 & 22.4 &  19.8 & 0.029 & 16.4 & 17.22 & --0.04 & 1.587 & --28.1 & Q     & 1 & US  583              \\
 13 & 24 & 47.70 &  3 & 24 & 32.9 &  15.5 & 0.040 & 16.5 & 16.84 &   0.54 & 0.303 & --24.9 & Q     & 1 &                      \\
\hline
 13 & 32 & 51.09 & 15 & 29 & 30.9 &  23.9 & 0.042 & 15.5 & 15.56 &   0.14 &       & & *     & 1 &                      \\
 13 & 33 & 45.80 &  5 & 38 & 42.6 &  22.2 & 0.028 & 15.5 & 15.74 &   0.10 &       & & *     & 1 &                      \\
 13 & 40 & 59.95 & 60 & 26 & 11.8 &  17.6 & 0.034 & 16.2 & 16.48 & --0.68 &       & & DA    &   & SBS 1339+606         \\
 13 & 42 & 46.90 & 18 & 44 & 43.8 &  22.4 & 0.039 & 16.4 & 16.69 &   0.12 & 0.382 & --25.5 & Q     & 1 &                      \\
 13 & 50 & 13.97 & 14 & 35 & 47.4 &  30.4 & 0.023 & 16.4 & 16.93 &   0.48 &       & & *     & 1 &                      \\
 13 & 51 & 25.25 & 19 &  5 & 33.4 &  10.8 & 0.027 & 16.4 & 16.89 &   0.64 &       & & *     & 1 &                      \\
 13 & 54 & 48.82 & 49 & 13 & 37.1 &  19.8 & 0.028 & 15.5 & 15.68 &   0.32 &       & & *     & 1 &                      \\
 13 & 55 & 43.99 & 20 & 12 & 31.8 &  19.9 & 0.030 & 15.6 & 16.11 &   0.30 &       & & *     & 1 &                      \\
 13 & 58 & 41.50 &  2 & 49 & 12.5 &  21.1 & 0.046 & 16.2 & 16.85 & --0.08 &       & & *     & 1 &                      \\
 14 &  6 & 58.74 & 14 & 42 & 38.6 &  13.0 & 0.034 & 15.4 & 15.84 &   0.34 & 0.264 & --25.7 & Q     & 1 &                      \\
 14 &  9 & 39.24 & 28 & 16 & 49.9 &  25.2 & 0.035 & 16.1 & 16.93 &   0.34 & 0.165 & --23.9 & Q     & 1 &                      \\
 14 & 10 & 57.74 & 64 & 33 & 10.6 &  18.8 & 0.041 & 16.4 & 16.83 &   0.06 & 0.462 & --25.9 & Q     & 1 &                      \\
 14 & 17 & 30.16 & 13 &  0 &  1.6 &  11.6 & 0.021 & 15.7 & 16.00 &   0.38 &       & & *     & 1 &                      \\
 14 & 19 & 25.77 & 38 &  2 & 49.0 &  12.7 & 0.039 & 16.2 & 17.22 &   0.08 & 0.517 & --26.3 & Q     & 1 &                      \\
 14 & 31 & 10.98 & 14 & 23 &  8.3 &   3.7 & 0.022 & 16.1 & 15.91 & --0.04 & 1.425 & --29.0 & Q     & 1 &                      \\
 14 & 47 & 50.12 & 38 &  5 & 30.3 &  12.2 & 0.023 & 15.8 & 16.28 &   0.04 &       & & *     & 1 &                      \\
 15 &  0 & 31.80 & 48 & 36 & 47.0 &  16.0 & 0.021 & 16.4 & 16.72 &   0.48 & 1.031 & --27.9 & Q     & 1 &                      \\
 15 &  5 & 27.62 & 29 & 47 & 18.7 &   8.7 & 0.036 & 15.0 & 15.65 & --0.34 & 0.527 & --27.6 & Q     & 1 & CSO 1080             \\
 15 &  8 & 32.28 & 67 & 42 & 43.4 &   9.0 & 0.032 & 16.0 & 17.12 &   0.14 & 0.336 & --25.8 & Q     & 1 &                      \\
 15 & 12 & 44.60 &  9 & 31 &  0.8 &  23.0 & 0.037 & 15.9 & 16.61 &   0.56 &       & & *     & 1 &                      \\
 15 & 16 & 32.30 & 12 & 13 & 50.5 &  10.6 & 0.028 & 16.2 & 17.26 &   0.78 &       & & BL    & 1 &                      \\
 15 & 44 &  3.76 & 26 & 48 & 38.6 &  21.7 & 0.023 & 16.4 & 17.15 &   0.74 &       & & *     & 1 &                      \\
 15 & 45 & 53.50 &  9 & 36 & 20.6 &  19.6 & 0.032 & 16.1 & 16.40 & --0.22 &       & &       &   &                      \\
 15 & 48 & 33.03 & 44 & 22 & 26.1 &  12.7 & 0.021 & 16.3 & 16.97 &   0.48 & 0.322 & --25.2 & Q     & 1 &                      \\
 15 & 51 &  9.60 & 45 & 42 & 52.1 &  22.5 & 0.036 & 15.6 & 15.95 &   0.32 &       & &       &   &                      \\
 15 & 51 & 52.45 & 19 & 11 &  4.1 &  34.9 & 0.034 & 15.8 & 16.31 &   0.50 &       & &       &   &                      \\
 15 & 53 &  4.93 & 35 & 48 & 28.6 &  25.2 & 0.033 & 16.1 & 17.20 &   0.72 & 0.722 & --26.8 & Q     & 1 &                      \\
 15 & 56 &  9.90 &  3 &  9 & 22.5 &   9.6 & 0.037 & 16.3 & 16.80 &   0.48 & 0.131 & --23.2 & S1n   & 1 &                      \\
 16 &  5 & 19.72 & 14 & 48 & 52.5 &  15.5 & 0.040 & 16.2 & 16.51 &   0.00 & 0.371 & --25.7 & Q     & 1 &                      \\
 16 &  9 & 47.80 &  7 & 12 & 33.2 &  27.8 & 0.021 & 16.4 & 16.95 &   0.64 &       & & *     & 1 &                      \\
 16 & 11 & 36.58 & 15 & 20 & 54.6 &  18.8 & 0.030 & 16.3 & 16.69 &   0.40 & 1.309 & --28.6 & Q     & 1 &                      \\
 16 & 17 & 42.10 &  6 &  2 & 23.8 &  20.4 & 0.078 & 15.5 & 15.69 &   0.42 &       & &*     & 1 &                      \\
 16 & 28 & 35.38 & 45 & 20 & 43.3 &  34.1 & 0.022 & 16.4 & 17.00 &   0.68 &       & & *     & 1 &                      \\
 16 & 30 &  9.65 & 45 & 16 & 37.9 &  21.7 & 0.022 & 16.5 & 16.96 &   0.32 &       & & *     & 1 &                      \\
 16 & 31 & 10.46 & 38 & 44 & 49.6 &   7.8 & 0.036 & 15.8 & 15.97 &   0.48 &       & & *     & 1 &                      \\
 16 & 45 & 20.15 & 61 & 35 &  9.7 &   3.8 & 0.023 & 16.4 & 16.89 &   0.64 & 0.410 & --25.5 & Q     & 1 &                      \\
 16 & 46 & 15.52 & 25 & 41 & 43.3 &  15.7 & 0.047 & 16.4 & 17.26 &   0.56 & 0.188 & --23.9 & Q     & 1 &                      \\
 17 & 18 & 28.97 & 57 & 34 & 22.3 &   6.4 & 0.039 & 15.9 & 16.07 &   0.48 & 0.100 & --22.9 & S1n   & 1 &                      \\
 17 & 20 & 13.19 & 49 & 55 & 26.4 &  28.8 & 0.027 & 16.0 & 15.89 &   0.36 &       & & *     & 1 &                      \\
 17 & 21 & 45.75 & 57 & 16 & 56.7 &  31.5 & 0.021 & 15.8 & 15.87 &   0.24 &       & & *     & 1 &                      \\
 17 & 28 & 13.44 & 32 & 22 &  5.8 &  10.8 & 0.022 & 16.4 & 17.08 &   0.34 & 0.563 & --26.3 & Q     & 1 &                      \\
 17 & 29 & 35.53 & 52 & 30 & 47.5 &   3.0 & 0.029 & 16.2 & 15.96 &   0.02 & 0.278 & --25.0 & Q     & 1 &                      \\
 17 & 49 & 12.30 & 55 & 12 &  8.9 &  28.7 & 0.023 & 16.3 & 16.58 &   0.44 &       & & WD    & 1 &                      \\
 22 & 37 & 31.84 & 10 & 19 &  4.0 &   3.8 & 0.024 & 16.5 & 16.77 & --0.46 & 0.103 & --22.5 & S1    & 1 &                      \\
 22 & 37 & 33.28 & 10 & 18 & 42.7 &  26.3 & 0.024 & 15.9 & 16.10 &   0.50 &       & & *     & 1 &                      \\
 23 &  7 & 13.30 &  4 & 32 &  2.5 &  29.8 & 0.079 & 15.9 & 17.25 & --0.92 &       & & *     & 1 &                      \\
 23 & 15 & 52.73 & 11 & 33 &  2.1 &  21.4 & 0.036 & 16.5 & 17.20 &   0.24 & 0.567 & --26.2 & Q     & 1 & KUV 23134+1117       \\
\hline
\end{tabular}
\end{table}