\begin{table}%T3
%\centering
\par
\caption{ List of the 76 known AGN brighter 
than $O_{\rm USNO}=16.5$, located within 35$\arcsec$ of a ROSAT-FSC source. Column 1: 
right ascension, Col.~2: declination, Col. 3: separation between 
the ROSAT and USNO positions in arcsec, Col. 4: 
X-ray count rate (count s$^{-1}$), Col. 5: magnitude $O_{\rm USNO}$, Col. 6: magnitude 
$O_{\rm APS}$, Col. 7: APS $O-E$ colour, Col. 8: redshift, Col. 9: absolute magnitude 
computed by using the $O_{\rm USNO}$ magnitude ($H_{\rm o}=50$ km s$^{-1}$ Mpc$^{-1}$), 
Col. 10: classification, Col. 11: name.}
\label{xrayq} 
\begin{tabular}{rrr|rrr|r|c|rrr|l|r|l|l}
\hline \hline\multicolumn{6}{c}{J2000 USNO position} \\
%\hline \multicolumn{3}{c}{$\alpha$} & \multicolumn{3}{c}{$\delta$} \\
\hline
h & m  & s & $^{\circ}$ & $'$ & $''$ & $''$ & $c/r$ & $O_{\rm US}$ & $O_{\rm APS}$ & $O-E$ & $z$ & $M_{\rm abs}$ & &  Name  \\
\hline
\par
  0 &  6 & 23.08 & 12 & 35 & 53.2 &  20.8 & 0.030 & 15.8 & 16.26 &   0.36 & 0.98  & --28.4 & Q      & RGB J0006+125        \\
  0 & 24 & 44.10 &  0 & 32 & 21.4 &   9.7 & 0.047 & 16.2 & 16.92 &   0.58 & 0.404 & --25.8 & Q      & PB 5932              \\
  0 & 36 & 12.50 &  5 & 49 & 52.0 &   9.1 & 0.064 & 16.3 & 16.88 &   0.28 & 0.41  & --25.7 & Q      & HS 0033+0533         \\
  0 & 52 &  5.57 &  0 & 35 & 38.4 &  28.6 & 0.024 & 16.3 & 16.80 &   1.04 & 0.399 & --25.7 & Q      & Q 0049+0019A         \\
  0 & 57 &  9.93 & 14 & 46 & 10.4 &  26.7 & 0.246 & 15.9 & 16.11 &   1.12 & 0.171 & --24.0 & Q      & PHL 909              \\
  1 & 20 & 17.29 & 21 & 33 & 46.6 &  25.0 & 0.023 & 15.5 & 15.80 &   0.54 & 1.500 & --29.7 & Q      & PG 0117+213          \\
  1 & 39 & 55.80 &  6 & 19 & 22.5 &   8.4 & 0.031 & 15.7 & 16.55 &   0.60 & 0.396 & --26.5 & Q      & PHL 1092             \\
  1 & 40 & 35.02 & 23 & 44 & 51.1 &  25.1 & 0.029 & 16.1 & 16.64 &   0.98 & 0.32  & --25.4 & Q      & HS 0137+2329         \\
  1 & 41 & 59.60 &  6 & 12 &  5.5 &   2.7 & 0.049 & 16.3 & 16.27 &   0.56 & 0.345 & --27.2 & Q      & PHL 1106             \\
  3 & 18 & 25.57 & 15 & 59 & 56.7 &  11.2 & 0.033 & 16.3 & 16.58 &   0.02 & 0.515 & --25.9 & Q      & US 3828              \\
  3 & 39 &  9.60 &  3 & 45 & 52.5 &  23.7 & 0.038 & 16.4 & 17.55 &   0.44 & 0.199 & --24.0 & Q      & RXS J03391+0346      \\
  4 & 24 & 46.85 &  0 & 36 &  6.4 &   7.4 & 0.052 & 16.1 & 16.75 &   1.26 &       &        & BL     & PKS 0422+00          \\
  8 & 15 & 59.21 & 41 & 44 & 57.1 &  17.9 & 0.021 & 15.8 & 15.97 &   0.32 & 1.28  & --29.3 & Q      & KUV 08126+4154       \\
  8 & 22 & 36.88 & 54 & 18 & 36.4 &  33.7 & 0.042 & 16.3 & 16.65 &   1.12 & 0.086 & --22.3 & S1     & SBS 0818+544         \\
  8 & 43 & 49.78 & 26 & 19 & 11.1 &  19.4 & 0.068 & 16.4 & 17.23 &   0.20 & 0.258 & --24.7 & Q      & HS 0840+2630         \\
  8 & 59 & 24.35 & 46 & 37 & 17.3 &  22.3 & 0.047 & 16.5 & 16.89 &   0.74 & 0.923 & --27.5 & Q      & US 2068              \\
  9 &  0 & 47.30 & 74 & 44 & 26.3 &  16.6 & 0.045 & 16.1 &       &        & 0.77  & --27.4 & Q      & HS 0855+7456         \\
  9 & 19 & 57.63 & 51 &  6 &  9.1 &  17.1 & 0.039 & 15.8 & 16.35 & --0.80 & 0.553 & --27.0 & Q      & SBS 0916+513         \\
  9 & 25 & 14.35 & 54 & 44 & 27.2 &  10.4 & 0.048 & 15.9 & 16.66 & --0.12 & 0.476 & --26.3 & Q      & SBS 0921+549         \\
  9 & 29 &  9.82 & 46 & 44 & 24.1 &  15.9 & 0.025 & 15.6 & 15.66 &   0.18 & 0.240 & --25.3 & Q      & US 645               \\
  9 & 36 & 25.45 & 39 & 49 & 33.7 &  24.8 & 0.033 & 16.1 & 16.81 &   0.82 & 1.25  & --28.7 & Q      & KUV 09333+4003       \\
  9 & 37 &  1.93 & 34 & 25 &  0.0 &  12.7 & 0.031 & 16.0 & 16.55 &   0.22 & 0.908 & --28.1 & Q      & Ton 1078             \\
  9 & 41 & 33.72 & 59 & 48 & 11.3 &  13.2 & 0.045 & 16.3 & 16.70 &   0.36 & 0.966 & --27.9 & Q      & SBS 0938+600         \\
  9 & 56 & 49.89 & 25 & 15 & 16.0 &   8.0 & 0.048 & 16.2 & 16.92 &   0.84 & 0.712 & --27.2 & Q      & OK 290               \\
 10 &  4 & 20.10 &  5 & 13 &  0.6 &  22.1 & 0.021 & 16.2 & 16.55 &   0.26 & 0.161 & --23.8 & Q      & PG 1001+054          \\
 10 & 13 & 30.20 & 53 & 15 & 59.6 &   6.7 & 0.025 & 16.2 & 16.64 &   0.36 & 1.495 & --29.1 & Q      & SBS 1010+535         \\
 10 & 15 & 57.04 &  1 &  9 & 13.7 &  16.1 & 0.082 & 16.3 & 16.97 &   0.94 & 0.779 & --27.2 & Q      & Q 1013+0124          \\
 10 & 33 & 59.50 & 35 & 55 &  9.0 &  14.9 & 0.046 & 16.3 & 16.76 &   0.92 & 0.169 & --23.8 & Q      & CSO 275              \\
 10 & 43 & 55.52 & 56 & 27 & 57.0 &  18.6 & 0.028 & 16.3 & 16.81 & --0.40 & 1.951 & --29.6 & Q      & SBS 1040+567         \\
 11 & 17 &  6.41 & 44 & 13 & 33.8 &   8.1 & 0.023 & 14.8 & 15.06 &   0.40 & 0.144 & --24.9 & Q      & PG 1114+445          \\
 11 & 30 &  4.76 & 41 & 16 & 19.5 &  23.2 & 0.035 & 15.7 & 16.20 &   0.10 & 1.530 & --29.5 & Q      & KUV 11274+4133       \\
 11 & 33 & 35.40 &  9 & 39 &  1.8 &  24.6 & 0.029 & 16.4 & 17.05 &   0.06 & 0.379 & --25.5 & Q      & RX J11335+0939       \\
 11 & 43 & 47.71 & 11 & 28 & 48.1 &  20.6 & 0.046 & 15.5 & 16.38 &   0.80 & 0.118 & --23.8 & Q      & RX J11437+1128       \\
 11 & 52 & 51.90 & 33 &  7 & 18.8 &   2.7 & 0.033 & 16.1 & 16.30 &   0.40 & 1.389 & --28.8 & Q      & CSO 373              \\
 11 & 55 &  7.62 & 52 &  1 & 29.4 &   6.4 & 0.036 & 16.4 & 16.46 &   1.08 & 0.156 & --23.5 & Q      & SBS 1152+523         \\
 11 & 59 &  6.78 & 53 &  6 & 43.5 &   6.1 & 0.043 & 16.5 & 17.19 &   0.36 & 0.482 & --25.9 & Q      & MS 11565+5323        \\
 12 &  7 &  4.53 & 38 & 40 & 24.6 &   3.7 & 0.045 & 16.3 & 16.64 &   0.00 & 0.572 & --26.4 & Q      & RXS J12070+3840      \\
 12 & 17 & 40.83 & 49 & 31 & 17.9 &   1.1 & 0.049 & 16.5 & 17.62 &   0.18 & 0.730 & --26.6 & Q      & SBS 1215+497         \\
 12 & 22 & 10.01 & 27 & 19 &  2.3 &   6.4 & 0.046 & 15.9 & 16.90 &   0.52 & 0.442 & --26.3 & Q      & RXS J12221+2719      \\
 12 & 23 &  0.23 & 55 & 40 &  0.3 &   9.4 & 0.057 & 16.5 & 17.48 &   0.48 & 0.905 & --27.5 & Q      & SBS 1220+559         \\
 12 & 28 & 24.97 & 31 & 28 & 37.7 &  24.8 & 0.024 & 15.6 & 16.28 &   0.28 & 2.219 & --30.4 & Q      & B2 1225+31           \\
 12 & 30 & 50.04 &  1 & 15 & 22.6 &   6.4 & 0.041 & 14.4 & 14.81 &   0.16 & 0.117 & --24.8 & Q      & RX J12308+0115       \\
 12 & 33 & 26.05 & 45 & 12 & 23.1 &  11.2 & 0.032 & 16.5 & 16.91 & --0.24 & 1.958 & --29.4 & Q      & HS 1231+4528         \\
 12 & 44 & 10.82 & 17 & 21 &  4.5 &  16.3 & 0.027 & 15.7 & 16.58 &   0.74 & 1.283 & --28.8 & Q      & PG 1241+176          \\
 13 &  6 &  5.72 & 80 &  8 & 20.5 &  10.9 & 0.035 & 16.3 & 18.35 &   1.01 & 1.183 & --28.3 & Q      & S5 1305+80           \\
 13 & 13 & 21.39 & 78 & 21 & 53.9 &  11.9 & 0.026 & 15.6 & 15.86 &   0.22 & 2.00  & --30.3 & Q      & HS 1312+7837         \\
 13 & 19 & 56.24 & 27 & 28 &  8.4 &  23.4 & 0.031 & 15.5 & 16.54 &   0.22 & 1.014 & --28.7 & Q      & CSO 873              \\
 13 & 41 &  0.81 & 41 & 23 & 14.2 &  17.0 & 0.022 & 16.4 & 16.36 & --0.02 & 1.204 & --28.3 & Q      & PG 1338+416          \\
 13 & 47 & 19.40 & 59 &  2 & 32.5 &  10.3 & 0.025 & 16.2 & 16.48 &   0.22 & 0.768 & --27.3 & Q      & SBS 1345+592         \\
 13 & 47 & 37.45 & 30 & 12 & 52.4 &  20.5 & 0.035 & 15.7 & 16.12 &   0.68 & 0.118 & --23.6 & Q      & Q J1347+3012         \\
 13 & 51 & 28.30 &  1 &  3 & 38.5 &  17.5 & 0.040 & 16.5 & 17.35 &   0.58 & 1.086 & --27.9 & Q      & Q 1348+0118          \\
 14 &  2 & 44.52 & 15 & 59 & 56.2 &   1.9 & 0.031 & 16.3 & 16.66 &   1.56 & 0.245 & --24.5 & BL     & MC 1400+162          \\
 14 & 27 & 35.60 & 26 & 32 & 14.5 &  26.8 & 0.040 & 15.4 & 15.18 & --0.72 & 0.366 & --26.6 & Q      & PG 1425+267          \\
 14 & 36 & 45.79 & 63 & 36 & 37.6 &  32.1 & 0.038 & 15.7 & 16.61 & --0.22 & 2.066 & --30.4 & Q      & S4 1435+63           \\
 14 & 50 & 26.68 & 58 & 39 & 44.7 &   9.9 & 0.046 & 15.8 & 16.13 &   1.14 & 0.210 & --23.8 & Q      & Mark 830             \\
 14 & 51 & 53.63 & 72 & 14 & 46.8 &   5.8 & 0.027 & 16.3 & 16.96 &   0.16 & 0.75  & --27.1 & Q      & HS 1451+7227         \\
\hline
 15 & 27 & 28.64 & 65 & 48 & 10.3 &  14.0 & 0.046 & 16.2 & 16.77 &   0.56 & 0.345 & --25.5 & Q      & FBS 1526+659         \\
 15 & 50 & 43.65 & 11 & 20 & 47.4 &  23.7 & 0.040 & 16.3 & 16.33 &   0.14 & 0.436 & --25.9 & Q      & MC 1548+114          \\
 15 & 51 & 58.16 & 58 &  6 & 44.7 &   4.5 & 0.036 & 16.2 & 16.74 &   1.14 & 1.320 & --28.7 & Q      & SBS 1550+582         \\
 16 & 19 & 40.54 & 25 & 43 & 23.3 &  13.1 & 0.035 & 16.4 & 16.62 &   1.36 & 0.268 & --24.7 & Q      & RX J16196+2543       \\
 16 & 23 & 19.93 & 41 & 17 &  2.7 &  26.3 & 0.030 & 16.5 & 16.88 &   0.32 & 1.618 & --28.9 & Q      & KUV 16217+4124       \\
 16 & 26 & 37.28 & 58 &  9 & 17.2 &   6.0 & 0.044 & 16.2 & 16.52 &   0.83 & 0.751 & --27.2 & Q      & SBS 1625+582         \\
 16 & 28 & 25.70 &  8 & 33 &  0.1 &  10.1 & 0.031 & 16.4 & 17.22 &   0.32 & 0.44  & --25.8 & Q      & HS 1626+0839         \\
 16 & 31 & 43.83 & 52 & 53 & 43.8 &   5.7 & 0.048 & 16.5 & 16.81 &   0.44 & 0.352 & --25.2 & Q      & SBS 1630+530         \\
 16 & 32 &  1.11 & 37 & 37 & 50.0 &  14.5 & 0.034 & 16.0 & 16.60 &   0.54 & 1.478 & --29.4 & Q      & PG 1630+377          \\
 16 & 32 & 34.68 & 73 & 59 & 43.0 &   3.2 & 0.030 & 16.1 & 17.97 &   1.30 & 0.208 & --24.4 & Q      & RXS J16325+7359      \\
 16 & 34 & 29.01 & 70 & 31 & 32.3 &   1.2 & 0.049 & 14.9 & 15.26 &   1.03 & 1.337 & --30.1 & Q      & PG 1634+706          \\
 16 & 37 &  7.53 & 41 & 40 & 26.9 &  17.0 & 0.028 & 16.2 & 16.28 &   1.60 & 0.765 & --27.3 & Q      & KUV 16355+4146       \\
 17 &  1 &  0.62 & 64 & 12 &  9.3 &  19.0 & 0.035 & 15.9 & 16.03 &   0.18 & 2.736 & --31.2 & Q      & HS 1700+6416         \\
 17 &  4 & 41.39 & 60 & 44 & 30.5 &   8.4 & 0.042 & 15.6 & 15.86 &   0.76 & 0.371 & --26.3 & Q      & 3C 351.0             \\
 17 &  6 & 48.06 & 32 & 14 & 22.9 &  17.0 & 0.029 & 16.2 & 16.94 &   0.66 & 1.070 & --28.2 & Q      & RGB J1706+322        \\
 17 & 19 & 34.18 & 25 & 10 & 58.6 &  16.9 & 0.039 & 16.4 & 16.87 &   1.34 & 0.579 & --26.4 & Q      & RX J17195+2510       \\
 22 & 53 &  7.37 & 19 & 42 & 34.7 &  21.5 & 0.039 & 16.4 & 16.75 &   0.92 & 0.284 & --24.9 & Q      & HS 2250+1926         \\
 23 &  7 & 45.62 & 19 &  1 & 20.8 &  11.6 & 0.033 & 16.4 & 17.13 &   0.98 & 0.313 & --25.0 & Q      & PKS 2305+18          \\
 23 & 11 & 59.50 &  9 & 26 &  1.4 &   7.4 & 0.048 & 16.3 & 17.51 &   0.16 & 0.479 & --26.1 & Q      & RX J23119+0925       \\
 23 & 50 & 10.07 &  8 & 12 & 55.3 &  16.6 & 0.025 & 16.4 & 18.19 &   1.00 & 1.70  & --29.1 & Q      & HS 2347+0756         \\
\hline
\end{tabular}
\end{table}