\begin{table}%t8
    \caption{C\_160 (170\micron) sources associated with C\_90 (90\micron) 
sources in LHEX.}\label{tab8}
%\centerline
{
\begin{tabular}{rrccrrrrrr}
\hline  \hline
  Name & Name & RA & Dec & \multicolumn{1}{c}{Flux ({\scriptsize C\_160})} & 
  \multicolumn{1}{c}{Flux ({\scriptsize C\_90})} & Flux ratio & Distance &
 $SNR$ & $SNR$  \\
 {\scriptsize (C\_160)} & {\scriptsize (C\_90)} & {\scriptsize (J2000)} & 
{\scriptsize (J2000)} & \multicolumn{1}{c}{\scriptsize (mJy)} & \multicolumn{1}{c}{\scriptsize (mJy)} 
& {\scriptsize (C\_160/C\_90)} & 
 (arcsec) & {\scriptsize (C\_160)} & {\scriptsize (C\_90)} \\
\hline
    2EX027 &     1EX279 & 10 49 48.6 & 57 17 14 &  248.1 $\pm$  60.7 &  131.7 $\pm$  29.1 &   1.8 &       33 &   5.4 &   3.9 \\
    2EX108 &     1EX305 & 10 50 02.0 & 57 14 28 &  177.9 $\pm$  49.9 &  115.4 $\pm$  27.2 &   1.5 &       36 &   3.9 &   3.9 \\
    2EX061 &     1EX116 & 10 50 16.6 & 57 12 29 &  165.9 $\pm$  48.2 &  150.8 $\pm$  31.3 &   1.1 &       40 &   3.4 &   9.1 \\
    2EX025 &     1EX088 & 10 50 37.6 & 57 28 52 &  149.4 $\pm$  46.0 &  148.5 $\pm$  31.1 &   1.0 &        3 &   3.9 &   4.5 \\
    2EX004 &     1EX048 & 10 50 43.9 & 57 07 01 &  407.6 $\pm$  30.0 &  273.4 $\pm$  48.1 &   1.4 &       10 &  13.6 &  13.6 \\
    2EX013 &     1EX041 & 10 50 49.7 & 57 35 07 &  353.0 $\pm$  78.8 &  321.3 $\pm$  55.2 &   1.1 &       17 &   3.9 &   3.9 \\
    2EX068 &     1EX085 & 10 50 55.5 & 57 15 57 &  211.4 $\pm$  54.9 &  123.4 $\pm$  28.1 &   1.7 &       33 &   9.1 &   3.0 \\
    2EX115 &     1EX081 & 10 51 18.3 & 57 14 31 &  259.6 $\pm$  62.6 &  136.2 $\pm$  29.6 &   1.9 &       45 &   4.5 &   5.4 \\
    2EX057 &     1EX037 & 10 51 42.4 & 57 21 27 &  120.0 $\pm$  42.4 &   83.0 $\pm$  24.0 &   1.4 &       23 &   3.0 &   3.0 \\
    2EX040 &     1EX078 & 10 51 46.4 & 57 38 46 &  262.4 $\pm$  63.1 &  108.5 $\pm$  26.5 &   2.4 &        7 &   6.8 &   3.4 \\
    2EX036 &     1EX047 & 10 51 49.4 & 57 09 22 &  285.9 $\pm$  67.0 &  156.3 $\pm$  32.0 &   1.8 &       19 &   5.4 &   5.4 \\
    2EX016 &     1EX034 & 10 52 03.3 & 57 07 44 &  242.9 $\pm$  59.9 &  165.2 $\pm$  33.1 &   1.4 &       25 &   6.8 &   6.8 \\
    2EX103 &     1EX148 & 10 52 25.4 & 57 01 32 &  301.6 $\pm$  69.7 &  155.3 $\pm$  31.9 &   1.9 &       29 &   5.4 &   3.9 \\
    2EX059 &     1EX130 & 10 52 29.2 & 57 09 13 &  143.3 $\pm$  45.2 &  108.2 $\pm$  26.5 &   1.3 &       36 &   4.5 &   4.5 \\
    2EX047 &     1EX269 & 10 52 56.1 & 57 07 56 &  230.9 $\pm$  57.9 &  232.7 $\pm$  42.3 &   0.9 &       29 &   3.9 &   3.9 \\
    2EX044 &     1EX062 & 10 53 03.3 & 57 05 33 &  150.6 $\pm$  46.2 &  399.6 $\pm$  67.0 &   0.3 &       21 &   3.4 &  13.6 \\
    2EX064 &     1EX027 & 10 53 14.5 & 57 20 04 &  170.4 $\pm$  48.9 &  107.0 $\pm$  26.3 &   1.5 &       43 &   5.4 &   3.9 \\
    2EX008 &     1EX125 & 10 53 24.9 & 57 14 03 &  152.6 $\pm$  46.4 &  132.1 $\pm$  29.1 &   1.1 &       25 &   5.4 &   6.8 \\
    2EX021 &     1EX023 & 10 53 47.0 & 57 07 01 & 1133.0 $\pm$  83.3 & 1218.0 $\pm$  44.9 &   0.9 &       16 &  13.6 &  27.1 \\
    2EX087 &     1EX111 & 10 54 14.1 & 57 29 57 &  157.8 $\pm$  47.1 &  108.1 $\pm$  26.4 &   1.4 &       24 &   6.8 &   3.9 \\
\hline
\end{tabular}}
\medskip
Columns -- Col.~1 C\_160 source name. 
Column~2 C\_90 source name.
Columns~3--4 C\_160 source coordinates in J2000. 
Column~5 C\_160 source flux in mJy. Column~6 C\_90 source flux in mJy. 
Column~7 Flux ratio of C\_160 over C\_90. 
Column~8 Distance of C\_160 source to the nearest C\_90 source. 
Column~9 Signal to Noise Ratio at C\_160. 
Column~10 Signal to Noise Ratio at C\_90.
\end{table}