\begin{table}%t6
      \caption{C\_160 (170\micron) sources in LHEX.}\label{tab6}
%\centerline
{
\begin{tabular}{rccrrc}
\hline  \hline
 Name & RA & Dec & \multicolumn{1}{c}{Flux} & $SNR$ & Note \\
  & {\scriptsize (J2000)} & {\scriptsize (J2000)} & \multicolumn{1}{c}{\scriptsize (mJy)} &  & \\
\hline
  2EX028 & 10 49 32.0 & 57 19 13 &  132.3 $\pm$  43.9 &   3.4 &        \\
  2EX032 & 10 49 35.0 & 57 06 20 &  101.9 $\pm$  40.5 &   3.9 &        \\
  2EX066 & 10 49 40.2 & 57 34 27 &  161.2 $\pm$  47.6 &   5.4 &     *  \\
  2EX027 & 10 49 48.6 & 57 17 14 &  248.1 $\pm$  60.7 &   5.4 &        \\
  2EX031 & 10 49 51.7 & 57 34 51 &  343.1 $\pm$  77.0 &   5.4 &        \\
  2EX035 & 10 49 58.4 & 57 40 15 &  159.5 $\pm$  47.4 &   3.4 &        \\
  2EX108 & 10 50 02.0 & 57 14 28 &  177.9 $\pm$  49.9 &   3.9 &        \\
  2EX026 & 10 50 11.6 & 57 28 12 &   91.5 $\pm$  39.5 &   3.0 &        \\
  2EX061 & 10 50 16.6 & 57 12 29 &  165.9 $\pm$  48.2 &   3.4 &        \\
  2EX025 & 10 50 37.6 & 57 28 52 &  149.4 $\pm$  46.0 &   3.9 &        \\
  2EX095 & 10 50 39.7 & 57 16 37 &  156.1 $\pm$  46.9 &   4.5 &        \\
  2EX004 & 10 50 43.9 & 57 07 01 &  407.6 $\pm$  30.0 &  13.6 &        \\
  2EX013 & 10 50 49.7 & 57 35 07 &  353.0 $\pm$  78.8 &   3.9 &        \\
  2EX068 & 10 50 55.5 & 57 15 57 &  211.4 $\pm$  54.9 &   9.0 &        \\
  2EX024 & 10 51 01.9 & 57 41 24 &  224.0 $\pm$  56.9 &   3.9 &        \\
  2EX115 & 10 51 18.3 & 57 14 31 &  259.6 $\pm$  62.6 &   4.5 &        \\
  2EX060 & 10 51 18.5 & 57 35 26 &  177.9 $\pm$  49.9 &   5.4 &        \\
  2EX110 & 10 51 18.7 & 57 19 11 &  154.4 $\pm$  46.7 &   4.5 &        \\
  2EX012 & 10 51 21.0 & 57 16 33 &  128.5 $\pm$  43.4 &   4.5 &        \\
  2EX041 & 10 51 32.0 & 57 40 53 &  238.7 $\pm$  59.2 &   3.0 &        \\
  2EX057 & 10 51 42.4 & 57 21 27 &  120.0 $\pm$  42.4 &   3.0 &        \\
  2EX034 & 10 51 43.8 & 57 29 17 &  160.2 $\pm$  47.5 &   4.5 &        \\
  2EX040 & 10 51 46.4 & 57 38 46 &  262.4 $\pm$  63.1 &   6.8 &        \\
  2EX036 & 10 51 49.4 & 57 09 22 &  285.9 $\pm$  67.0 &   5.4 &        \\
  2EX016 & 10 52 03.3 & 57 07 44 &  242.9 $\pm$  59.9 &   6.8 &        \\
  2EX120 & 10 52 11.6 & 57 03 21 &  148.3 $\pm$  45.9 &   3.4 &        \\
  2EX111 & 10 52 12.3 & 57 39 08 &  157.7 $\pm$  47.1 &   3.4 &        \\
  2EX103 & 10 52 25.4 & 57 01 32 &  301.6 $\pm$  69.7 &   5.4 &        \\
  2EX059 & 10 52 29.2 & 57 09 13 &  143.3 $\pm$  45.2 &   4.5 &        \\
  2EX015 & 10 52 33.9 & 57 31 18 &  224.8 $\pm$  57.0 &   3.9 &        \\
  2EX050 & 10 52 47.6 & 57 36 08 &  190.1 $\pm$  51.7 &   4.5 &        \\
  2EX047 & 10 52 56.1 & 57 07 56 &  230.9 $\pm$  57.9 &   3.9 &        \\
  2EX056 & 10 53 01.0 & 57 15 24 &  118.6 $\pm$  42.3 &   3.9 &        \\
  2EX044 & 10 53 03.3 & 57 05 33 &  150.6 $\pm$  46.2 &   3.4 &        \\
  2EX010 & 10 53 06.4 & 57 34 03 &  233.9 $\pm$  58.4 &   9.0 &        \\
  2EX064 & 10 53 14.5 & 57 20 04 &  170.4 $\pm$  48.9 &   5.4 &        \\
  2EX083 & 10 53 19.6 & 57 37 45 &  157.0 $\pm$  47.0 &   3.9 &        \\
  2EX009 & 10 53 24.7 & 57 17 47 &  182.6 $\pm$  50.6 &   6.8 &        \\
  2EX008 & 10 53 24.9 & 57 14 03 &  152.6 $\pm$  46.4 &   5.4 &        \\
  2EX021 & 10 53 47.0 & 57 07 01 & 1133.0 $\pm$  83.3 &  13.6 &        \\
  2EX045 & 10 53 57.8 & 57 32 57 &   91.5 $\pm$  39.5 &   3.4 &        \\
  2EX100 & 10 54 12.5 & 57 32 02 &  120.5 $\pm$  42.5 &   3.9 &        \\
  2EX087 & 10 54 14.1 & 57 29 57 &  157.8 $\pm$  47.1 &   6.8 &        \\
  2EX046 & 10 54 27.9 & 57 28 15 &  111.7 $\pm$  41.5 &   3.9 &        \\
\hline
\end{tabular}}
\medskip
Columns --  Col.~1 Name coded by 2EXnnn where nnn was given by DAOPHOT.
Column~5 Signal to Noise Ratio. Column~6 "*" means that no C\_90 
observations were made for that source, otherwise both C\_90 and C\_160 
observations were performed.
\end{table}