\begin{table}%t3
\caption{Adopted near-IR magnitudes for the combined \epsindibab{} system 
from the 2MASS Point Source Catalog (Cutri \etal{} 2003) and the derived
individual magnitudes for the two components. The NACO and 2MASS $JHK_{\rm s}$ 
colour systems are assumed to be identical for this exercise.}
\label{tab:finalphot}
%\centering
\par
\begin{tabular}{lcccc}
\hline\hline
Filter & System    & Combined        & \epsindiba{}    & \epsindibb \\
\hline
$J$    & 2MASS     & $11\fm91$ & $12\fm29$ & $13\fm23$ \\
$H$    & 2MASS     & $11\fm31$ & $11\fm51$ & $13\fm27$ \\
$K_{\rm s}$  & 2MASS     & $11\fm21$ & $11\fm35$ & $13\fm53$ \\
\hline
\end{tabular}
\end{table}