\begin{table}%T8
%\centering
\par
\caption{Constraints for the isobaric cooling flow model.  The lower limit,
best-fit value and upper limit are given for both $T_{\min}$ (in keV) and
$T_{\min}/T_{\max}$.  Only shells with a cooling time less than 30~Gyr (as
determined from the single temperature fits) are listed.  No entries are listed
whenever the data cannot constrain the ratio $T_{\min}/T_{\max}$ (i.e., any
value between 0--1 is statistically allowed).  The \#\ indicates the shell
number.}
\label{tab:fittemp}
\begin{tabular}{|l|rrr|rrr|rrr|rrr|rrr|rrr|}
\hline\hline
\multicolumn{1}{|c|}{\#} & 
\multicolumn{3}{|c|}{$T_{\min}$} &
\multicolumn{3}{|c|}{$T_{\min}/T_{\max}$} & 
\multicolumn{3}{|c|}{$T_{\min}$} &
\multicolumn{3}{|c|}{$T_{\min}/T_{\max}$} & 
\multicolumn{3}{|c|}{$T_{\min}$} &
\multicolumn{3}{|c|}{$T_{\min}/T_{\max}$} \\
  & 
  low & best & upp & low & best & upp & 
  low & best & upp & low & best & upp & 
  low & best & upp & low & best & upp \\
\hline
\multicolumn{7}{|l|}{NGC 533}&
\multicolumn{6}{|l|}{Virgo}&
\multicolumn{6}{|l|}{A 262}\\
\hline
1&   0.2& 0.7& 1.3&   0.21&0.94&1 &    &    &    &     &    &     &   0.5& 0.6& 1.3&   0.23&0.32&0.92 \\
2&$<$0.1& 0.6& 2.1&      0&0.45&1 & 0.8& 1.5& 1.6& 0.31&0.45&0.78 &   0.7& 1.1& 1.5&   0.32&0.47&0.86 \\
3&   0.4& 0.7& 1.8&   0.15&0.25&1 & 0.8& 1.4& 1.6& 0.33&0.46&0.72 &   0.6& 1.4& 4.0&   0.20&0.46&1    \\
4&   0.4& 0.6& 2.7&   0.18&0.29&1 & 0.9& 1.5& 1.9& 0.32&0.47&0.86 &   1.0& 2.0& 4.3&   0.30&0.48&1    \\
5&   0.4& 0.7& 2.9&   0.20&0.31&1 & 1.0& 1.7& 2.0& 0.32&0.47&0.90 &$<$0.1& 1.4& 6.5&      0&0.33&1    \\
6&      &    &    &       &    &  & 0.7& 1.6& 4.4& 0.22&0.44&1    &   0.9& 1.6& 4.5&   0.27&0.48&1    \\
7&      &    &    &       &    &  & 0.8& 1.3& 4.9& 0.22&0.34&1    &      &    &    &       &    &     \\
8&      &    &    &       &    &  & 0.8& 1.1& 5.7& 0.20&0.27&1    &      &    &    &       &    &     \\
\hline
\multicolumn{7}{|l|}{A 1837}&
\multicolumn{6}{|l|}{S\'ersic~159$-$3}&
\multicolumn{6}{|l|}{MKW 9}\\
\hline
1&   1.1& 1.5& 5.9& 0.25  &0.31&1    & 1.1& 1.1& 2.3& 0.31&0.33&0.91&$<$0.1& 1.1& 2.7&    0  &0.44&1 \\
2&$<$0.1& 1.8& 3.3&    0  &0.16&0.29 & 1.0& 2.5& 2.8& 0.25&0.80&1   &   0.8& 1.6& 3.2& 0.32  &0.94&1 \\
3&      &    &    &       &    &     & 0.9& 2.6& 4.8& 0.24&0.94&1   &   0.3& 1.2& 4.7& 0.08  &0.31&1 \\
4&      &    &    &       &    &     & 0.9& 2.6& 5.1& 0.25&0.93&1   &      &    &    &       &    &  \\
\hline
\multicolumn{7}{|l|}{2A 0335+096}&
\multicolumn{6}{|l|}{MKW 3s}&
\multicolumn{6}{|l|}{A 2052}\\
\hline
1& 0.6& 0.7& 0.7& 0.26&0.28&0.30& 1.3& 1.6& 5.9& 0.28&0.35&1 & 0.5& 0.6& 1.1& 0.17&0.21&0.26 \\
2& 0.9& 0.9& 1.0& 0.29&0.30&0.31& 0.6& 1.3& 4.8& 0.09&0.19&1 & 1.1& 1.2& 1.4& 0.26&0.29&0.32 \\
3& 1.0& 1.1& 1.3& 0.25&0.28&0.31& 1.5& 2.5& 6.5& 0.30&0.56&1 &    &    &    &     &    &     \\
4&    &    &    &     &    &    & 0.7& 1.5& 5.2& 0.09&0.21&1 &    &    &    &     &    &     \\
\hline
\multicolumn{7}{|l|}{A 4059}&
\multicolumn{6}{|l|}{Hydra A (A 780)}&
\multicolumn{6}{|l|}{A 496}\\
\hline
1& 0.7& 1.0& 4.6& 0.21&0.27&1 &$<$0.1& 2.9& 6.8&      0&0.72&1 &   0.9& 1.0& 2.3&   0.27&0.29&0.93 \\
2&    &    &    &     &    &  &   1.4& 3.7& 6.3&   0.28&0.91&1 &   0.7& 2.5& 4.8&   0.20&0.94&1    \\
3&    &    &    &     &    &  &$<$0.1& 1.4& 7.9&      0&0.24&1 &$<$0.1& 2.6& 8.4&      0&0.29&1    \\ 
4&    &    &    &     &    &  &   1.2& 2.8& 6.7&   0.25&0.47&1 &   0.9& 1.9& 7.6&   0.18&0.30&1    \\ 
5&    &    &    &     &    &  &      &    &    &       &    &  &   0.4& 1.9& 9.2&   0.05&0.27&1    \\  
\hline
\multicolumn{7}{|l|}{A 3112}&
\multicolumn{6}{|l|}{A 1795}&
\multicolumn{6}{|l|}{A 399}\\
\hline
1&  1.4 & 2.9 & 5.7 &   0.31& 0.88 & 1    &$<$0.1& 3.9& 9.2&      0&0.72&1   & 0.6 & 2.6 & 4.8 & 0.17 & 1 & 1 \\
2&$<$0.1& 1.0 & 2.1 &      0& 0.09 & 0.19 &   1.8& 2.1& 8.2&   0.28&0.31&1   &     &     &     &      &   &   \\ 
3&$<$0.1& 1.6 & 2.1 &      0& 0.16 & 0.19 &   1.0& 2.0& 3.1&   0.09&0.16&0.24&     &     &     &      &   &   \\ 
\hline
\multicolumn{7}{|l|}{Perseus (A 426)}&
\multicolumn{6}{|l|}{A 1835}&
\multicolumn{6}{|l|}{ }\\
\hline
1&      &      &    &     &     &  & 1.5& 2.6& 11.6&0.18&0.27&1 &      &      &      &      &   &   \\
2&   1.0&  1.8 & 4.9& 0.15& 0.29& 1& 3.3& 7.8& 14.8&0.26&0.93&1 &      &      &      &      &   &   \\
3&   1.2&  1.4 & 4.0& 0.22& 0.24& 1&    &    &     &    &    &  &      &      &      &      &   &   \\
4&$<$0.1&  2.0 & 4.7&    0& 0.25& 1&    &    &     &    &    &  &      &      &      &      &   &   \\
5&   1.5&  2.1 & 5.6& 0.19& 0.25& 1&    &    &     &    &    &  &      &      &      &      &   &   \\
6&   0.5&  2.6 &12.2& 0.06& 0.26& 1&    &    &     &    &    &  &      &      &      &      &   &   \\
\hline
\end{tabular}
\end{table}