\begin{table}%T5
%\centering
\par
\caption{Spectral fit results for a single-temperature model. The \#\ indicates
the shell number (cf. Table~\ref{tab:boundaries}).}
\label{tab:fit1t}
\begin{tabular}{|l|rrrr|rrrr|rrrr|}
\hline\hline
\# &
 $\chi^2$  & $kT$ & $\log n_{\rm H}$  & $\tau_{{\rm \hbox{cool}}}$ & 
 $\chi^2$  & $kT$ & $\log n_{\rm H}$  & $\tau_{{\rm \hbox{cool}}}$ & 
 $\chi^2$  & $kT$ & $\log n_{\rm H}$  & $\tau_{{\rm \hbox{cool}}}$ \\
   & 
  &(keV)&   (m$^{-3}$)          & (Gyr) &
  &(keV)&   (m$^{-3}$)          & (Gyr) &
  &(keV)&   (m$^{-3}$)          & (Gyr) \\
\hline
\multicolumn{1}{|l|}{ }&
\multicolumn{4}{|c|}{NGC 533 (d.o.f. = 237)}&
\multicolumn{4}{|c|}{Virgo (d.o.f. = 237)}&
\multicolumn{4}{|c|}{A 262 (d.o.f. = 237)}\\
\hline
1& 393& 0.67 $\pm$ 0.01 &  3.73 $\pm$ 0.03 &   0.8 &    &                &                 &       & 487& 1.02 $\pm$ 0.02 &  4.05 $\pm$ 0.02 &   0.7\\
2& 348& 0.96 $\pm$ 0.03 &  3.17 $\pm$ 0.04 &   4.6 & 635& 1.45 $\pm$ 0.02 &  4.48 $\pm$ 0.01 &   0.4 & 241& 1.41 $\pm$ 0.03 &  3.71 $\pm$ 0.02 &   2.3\\
3& 248& 1.23 $\pm$ 0.04 &  2.85 $\pm$ 0.03 &    14 & 494& 1.48 $\pm$ 0.02 &  4.14 $\pm$ 0.01 &   0.9 & 257& 1.88 $\pm$ 0.08 &  3.38 $\pm$ 0.02 &   7.2\\
4& 271& 1.35 $\pm$ 0.11 &  2.66 $\pm$ 0.03 &    25 & 338& 1.83 $\pm$ 0.03 &  3.97 $\pm$ 0.01 &   1.8 & 233& 2.13 $\pm$ 0.11 &  3.21 $\pm$ 0.02 &    12\\
5& 266& 1.25 $\pm$ 0.22 &  2.53 $\pm$ 0.05 &    30 & 271& 1.89 $\pm$ 0.04 &  3.83 $\pm$ 0.01 &   2.5 & 264& 2.16 $\pm$ 0.15 &  3.07 $\pm$ 0.02 &    17\\
6& 244& 1.18 $\pm$ 0.07 &  2.34 $\pm$ 0.04 &    42 & 328& 2.06 $\pm$ 0.04 &  3.66 $\pm$ 0.01 &   4.1 & 268& 2.16 $\pm$ 0.10 &  2.93 $\pm$ 0.01 &    23\\
7& 221& 1.00 $\pm$ 0.11 &  2.24 $\pm$ 0.04 &    42 & 283& 2.34 $\pm$ 0.04 &  3.50 $\pm$ 0.01 &   6.5 & 244& 2.25 $\pm$ 0.12 &  2.71 $\pm$ 0.01 &    39\\
8&    & 	       &		 &	 & 258& 2.50 $\pm$ 0.05 &  3.37 $\pm$ 0.00 &   9.4 & 213& 2.05 $\pm$ 0.16 &  2.56 $\pm$ 0.02 &    52\\
\hline
\multicolumn{1}{|l|}{ }&
\multicolumn{4}{|c|}{A 1837 (d.o.f. = 237)}&
\multicolumn{4}{|c|}{S\'ersic 159$-$3 (d.o.f. = 237)}&
\multicolumn{4}{|c|}{MKW 9 (d.o.f. = 237)}\\
\hline
1& 232& 2.93 $\pm$ 0.20 &  3.47 $\pm$ 0.03 &   8.4 & 288& 2.17 $\pm$ 0.05 &  4.12 $\pm$ 0.01 &   1.5 & 300& 1.28 $\pm$ 0.09 &  3.31 $\pm$ 0.07 &   5.1\\
2& 261& 4.61 $\pm$ 0.52 &  3.14 $\pm$ 0.03 &    24 & 288& 2.37 $\pm$ 0.05 &  3.77 $\pm$ 0.01 &   3.5 & 228& 1.66 $\pm$ 0.20 &  3.08 $\pm$ 0.05 &    12\\
3& 258& 4.15 $\pm$ 0.22 &  2.96 $\pm$ 0.01 &    34 & 278& 2.43 $\pm$ 0.05 &  3.35 $\pm$ 0.01 &   9.6 & 219& 2.25 $\pm$ 0.27 &  2.84 $\pm$ 0.03 &    29\\
4& 274& 3.65 $\pm$ 0.22 &  2.71 $\pm$ 0.02 &    55 & 275& 2.38 $\pm$ 0.10 &  2.98 $\pm$ 0.01 &    22 & 239& 2.45 $\pm$ 0.37 &  2.58 $\pm$ 0.05 &    57\\
5& 248& 3.57 $\pm$ 0.33 &  2.54 $\pm$ 0.02 &    82 & 270& 2.43 $\pm$ 0.16 &  2.73 $\pm$ 0.01 &    40 & 231& 2.06 $\pm$ 0.72 &  2.44 $\pm$ 0.05 &    67\\
6&    & 	       &		 &	 & 244& 2.07 $\pm$ 0.16 &  2.48 $\pm$ 0.01 &    62 & 281& 1.60 $\pm$ 0.33 &  2.37 $\pm$ 0.04 &    60\\
\hline
\multicolumn{1}{|l|}{ }&
\multicolumn{4}{|c|}{2A 0335+096 (d.o.f. = 399)}&
\multicolumn{4}{|c|}{MKW 3s (d.o.f. = 237)}&
\multicolumn{4}{|c|}{A 2052 (d.o.f. = 237)}\\
\hline
1& 585& 1.40 $\pm$ 0.03 &  4.38 $\pm$ 0.02 &   0.5 & 245& 3.00 $\pm$ 0.10 &  3.93 $\pm$ 0.01 &   2.9 & 554& 1.41 $\pm$ 0.07 &  4.07 $\pm$ 0.01 &   1.0\\
2& 480& 1.87 $\pm$ 0.04 &  4.06 $\pm$ 0.01 &   1.5 & 250& 3.33 $\pm$ 0.10 &  3.70 $\pm$ 0.01 &   5.4 & 274& 2.54 $\pm$ 0.06 &  3.80 $\pm$ 0.01 &   3.5\\
3& 450& 2.44 $\pm$ 0.06 &  3.64 $\pm$ 0.01 &   4.9 & 239& 3.39 $\pm$ 0.08 &  3.37 $\pm$ 0.01 &    12 & 233& 2.92 $\pm$ 0.07 &  3.40 $\pm$ 0.01 &   9.7\\
4& 469& 2.86 $\pm$ 0.12 &  3.29 $\pm$ 0.02 &    12 & 266& 3.79 $\pm$ 0.13 &  3.10 $\pm$ 0.01 &    23 & 258& 3.08 $\pm$ 0.10 &  3.16 $\pm$ 0.01 &    18\\
5& 425& 3.02 $\pm$ 0.18 &  3.11 $\pm$ 0.03 &    20 & 257& 3.43 $\pm$ 0.17 &  2.89 $\pm$ 0.01 &    36 & 235& 3.16 $\pm$ 0.15 &  2.97 $\pm$ 0.01 &    28\\
6& 452& 2.86 $\pm$ 0.18 &  2.87 $\pm$ 0.02 &    33 & 201& 3.44 $\pm$ 0.17 &  2.66 $\pm$ 0.01 &    61 & 242& 3.06 $\pm$ 0.12 &  2.77 $\pm$ 0.01 &    43\\
7& 377& 2.68 $\pm$ 0.26 &  2.55 $\pm$ 0.03 &    65 & 301& 2.54 $\pm$ 0.17 &  2.38 $\pm$ 0.01 &    93 & 276& 2.55 $\pm$ 0.12 &  2.50 $\pm$ 0.01 &    70\\
8&    &                &                 &       & 370& 1.70 $\pm$ 0.13 &  2.26 $\pm$ 0.02 &    84 & 322& 1.54 $\pm$ 0.13 &  2.32 $\pm$ 0.02 &    65\\
\hline
\multicolumn{1}{|l|}{ }&
\multicolumn{4}{|c|}{A 4059 (d.o.f. = 399)}&
\multicolumn{4}{|c|}{Hydra A (d.o.f. = 237)}&
\multicolumn{4}{|c|}{A 496 (d.o.f. = 237)}\\
\hline
1& 467& 2.11 $\pm$ 0.14 &  3.81 $\pm$ 0.02 &   3.0 & 288& 2.92 $\pm$ 0.10 &  4.18 $\pm$ 0.01 &   1.6 & 271& 2.14 $\pm$ 0.10 &  4.17 $\pm$ 0.02 &   1.3\\
2& 402& 3.12 $\pm$ 0.15 &  3.58 $\pm$ 0.02 &   6.8 & 253& 3.32 $\pm$ 0.12 &  3.83 $\pm$ 0.01 &   4.0 & 244& 2.51 $\pm$ 0.12 &  3.86 $\pm$ 0.01 &   3.0\\
3& 399& 3.90 $\pm$ 0.12 &  3.33 $\pm$ 0.01 &    14 & 243& 3.19 $\pm$ 0.12 &  3.38 $\pm$ 0.01 &    11 & 278& 3.34 $\pm$ 0.13 &  3.52 $\pm$ 0.01 &   8.2\\
4& 378& 3.89 $\pm$ 0.19 &  3.09 $\pm$ 0.01 &    24 & 265& 3.28 $\pm$ 0.17 &  3.16 $\pm$ 0.01 &    18 & 272& 3.93 $\pm$ 0.24 &  3.25 $\pm$ 0.02 &    17\\
5& 410& 4.14 $\pm$ 0.26 &  2.86 $\pm$ 0.01 &    43 & 236& 3.59 $\pm$ 0.25 &  2.95 $\pm$ 0.01 &    32 & 172& 4.03 $\pm$ 0.30 &  3.06 $\pm$ 0.02 &    26\\
6& 388& 4.26 $\pm$ 0.30 &  2.65 $\pm$ 0.01 &    71 & 268& 3.38 $\pm$ 0.27 &  2.64 $\pm$ 0.02 &    62 & 231& 4.63 $\pm$ 0.36 &  2.88 $\pm$ 0.02 &    44\\
7&    &                &                 &       &    & 	       &		 &	 & 254& 4.02 $\pm$ 0.34 &  2.64 $\pm$ 0.02 &    70\\
\hline
\multicolumn{1}{|l|}{ }&
\multicolumn{4}{|c|}{A 3112 (d.o.f. = 237)}&
\multicolumn{4}{|c|}{A 1795 (d.o.f. = 237)}&
\multicolumn{4}{|c|}{A 399 (d.o.f. = 237)}\\
\hline
1& 317& 2.99 $\pm$ 0.08 &  4.10 $\pm$ 0.01 &   2.0 & 245& 3.47 $\pm$ 0.09 &  4.13 $\pm$ 0.01 &   2.1 & 285& 2.60 $\pm$ 0.58 &  3.38 $\pm$ 0.07 &   9.3\\
2& 286& 3.96 $\pm$ 0.14 &  3.69 $\pm$ 0.01 &   6.2 & 225& 4.15 $\pm$ 0.10 &  3.85 $\pm$ 0.01 &   4.3 & 239& 4.63 $\pm$ 0.84 &  3.31 $\pm$ 0.03 &    16\\
3& 381& 4.34 $\pm$ 0.12 &  3.34 $\pm$ 0.01 &    15 & 229& 5.23 $\pm$ 0.14 &  3.47 $\pm$ 0.01 &    12 & 210& 5.89 $\pm$ 0.71 &  3.05 $\pm$ 0.03 &    34\\
4& 267& 4.42 $\pm$ 0.19 &  2.99 $\pm$ 0.01 &    33 & 188& 5.56 $\pm$ 0.21 &  3.19 $\pm$ 0.01 &    24 & 206& 7.78 $\pm$ 1.18 &  2.92 $\pm$ 0.03 &    54\\
5& 304& 3.78 $\pm$ 0.34 &  2.73 $\pm$ 0.02 &    55 & 195& 5.76 $\pm$ 0.29 &  2.97 $\pm$ 0.01 &    40 & 240& 6.23 $\pm$ 0.88 &  2.77 $\pm$ 0.03 &    68\\
6&    &                &                 &       & 279& 5.89 $\pm$ 0.35 &  2.72 $\pm$ 0.01 &    73 &    & 	       &		 &	\\
\hline
\multicolumn{1}{|l|}{ }&
\multicolumn{4}{|c|}{A 3266 (d.o.f. = 237)}&
\multicolumn{4}{|c|}{Perseus (d.o.f. = 237)}&
\multicolumn{4}{|c|}{Coma (d.o.f. = 237)}\\
\hline
1&    & 	       &		 &	 & 624& 5.35 $\pm$ 0.16 &  4.55 $\pm$ 0.01 &   1.0 &    &                &                 &      \\
2& 299& 7.69 $\pm$ 1.68 &  3.38 $\pm$ 0.04 &    19 & 393& 3.07 $\pm$ 0.05 &  4.32 $\pm$ 0.01 &   1.2 & 244&11.19 $\pm$ 6.40 &  3.36 $\pm$ 0.03 &    24\\
3& 249& 8.35 $\pm$ 1.00 &  3.09 $\pm$ 0.02 &    38 & 626& 3.21 $\pm$ 0.03 &  4.11 $\pm$ 0.00 &   2.0 & 230& 6.45 $\pm$ 1.12 &  3.21 $\pm$ 0.03 &    25\\
4& 231& 9.81 $\pm$ 1.78 &  2.92 $\pm$ 0.01 &    62 & 392& 3.58 $\pm$ 0.05 &  3.90 $\pm$ 0.00 &   3.5 & 218& 7.86 $\pm$ 1.14 &  3.15 $\pm$ 0.02 &    33\\
5& 217& 9.99 $\pm$ 1.77 &  2.82 $\pm$ 0.02 &    80 & 332& 4.34 $\pm$ 0.11 &  3.68 $\pm$ 0.01 &   6.6 & 227& 6.92 $\pm$ 0.87 &  3.09 $\pm$ 0.02 &    34\\
6& 219& 8.37 $\pm$ 0.73 &  2.70 $\pm$ 0.01 &    94 & 252& 4.97 $\pm$ 0.15 &  3.45 $\pm$ 0.01 &    12 & 272& 7.80 $\pm$ 0.57 &  3.07 $\pm$ 0.01 &    39\\
7&    & 	       &		 &	 & 248& 5.27 $\pm$ 0.23 &  3.18 $\pm$ 0.01 &    24 & 205& 7.73 $\pm$ 0.38 &  2.96 $\pm$ 0.01 &    50\\
8&    & 	       &		 &	 & 200& 5.45 $\pm$ 0.37 &  3.03 $\pm$ 0.01 &    34 & 233& 7.21 $\pm$ 0.40 &  2.83 $\pm$ 0.01 &    64\\
\hline
\multicolumn{1}{|l|}{ }&
\multicolumn{4}{|c|}{A 754 (d.o.f. = 237)}&
\multicolumn{4}{|c|}{A 1835 (d.o.f. = 156)}&
\multicolumn{4}{|c|}{ }\\
\hline
1& 280& 5.21 $\pm$ 3.04 &  3.17 $\pm$ 0.21 &    24 & 185& 5.13 $\pm$ 0.14 &  4.12 $\pm$ 0.01 &   2.7 &&&&\\
2& 232& 6.18 $\pm$ 1.29 &  3.34 $\pm$ 0.02 &    18 & 179& 6.91 $\pm$ 0.43 &  3.57 $\pm$ 0.01 &    11 &&&&\\
3& 238& 6.26 $\pm$ 0.55 &  3.21 $\pm$ 0.02 &    25 & 178& 7.25 $\pm$ 0.47 &  3.08 $\pm$ 0.01 &    36 &&&&\\
4& 241& 7.78 $\pm$ 0.84 &  3.03 $\pm$ 0.02 &    42 & 166& 7.01 $\pm$ 0.86 &  2.67 $\pm$ 0.02 &    91 &&&&\\
5& 270& 7.76 $\pm$ 1.04 &  2.90 $\pm$ 0.02 &    56 &    & 	       &		 &	 &&&&\\
6& 229& 8.30 $\pm$ 0.83 &  2.72 $\pm$ 0.02 &    90 &    & 	       &		 &	 &&&&\\
\hline
\end{tabular}
\end{table}