\begin{table}%T1
      \caption{\label{table1}List of millisecond pulsars observed at 8.35~GHz. Number of pulses, period, mean flux density $S_{{\rm mean}}$, dispersion measure smearing~$\sigma_{\rm DM}$ and pulse width at~50\% of maximum intensity $W_{50}$ are listed. }
      %\centering
\par
                   \begin{tabular}{lrrrrl}  
            \hline\hline
            \noalign{\smallskip}
            PSR &  Number  &   Period   &$S_{{\rm mean}}$ & $\sigma_{\rm DM}$ & $W_{50}$\\
	     & of pulses &   [ms]    &[mJy] & [deg] & [deg]\\
            \noalign{\smallskip}
            \hline
            \noalign{\smallskip}
            J1022+1001 &  653~187 & 16.45&$<$0.05 &  0.6 &  \\
            J1713+0747 & 1~151~982 & 4.57 &0.11    &  4.1 & 23  \\
             	       & 2~346~630&  &$<$0.17 &       & \\
	    B1855+09   & 1~910~351 & 5.36 &0.1     &  2.5 & 33 (MP)  \\
	    	       &         & &        &      & 15 (IP) \\
	               & 1~418~079 & &$<$0.28 &      &   \\
	               & 1~997~058 & &$<$0.22 &      &  \\
	    J2145-0750 &  333~438 & 16.05& 0.07   &  0.6 & 9  \\
	               &  671~546& &$<$0.08   &     &   \\
\par
            \noalign{\smallskip}
            \hline
         \end{tabular}
	      \end{table}