\begin{table}%T2
%\centering
\par
\caption{The minimum variance for several combinations of parameters, for the 300
uncorrelated image configuration. In each row, those parameters which
have an entry are assumed to be determined from the data, the other
parameters are fixed. The counterpart of the three rows for the patch
geometries are the Figs. \ref{fig:fisherf-OGs}--\ref{fig:fisherf-OGsn}.}
\label{tab:mvb}
\begin{tabular}{lllll} \hline\hline
$\Omegam$ & $\sigma_8$ & $\Gamma$ & $\Omega_\Lambda$ & $n_{\rm s}$\\
\hline 0.53 & 0.76 & 0.09 & & \\ 0.53 & 0.76 & 0.14 & 0.64 & \\ 0.53 &
0.77 & 0.16 & & 0.20 \\ \hline
\end{tabular}
\end{table}