\begin{table}%[tb]%T1
%\centering
\par
\caption{Quantitative measures of the $\Omegam~$-$\sigma_8$ likelihood contours for the
300 uncorrelated $13^\prime \times 13^\prime$ images. Table entries
are in units of~$10^{-4}$.}\label{tab:q-single}
\begin{tabular}{llll} 
\hline\hline\\[-6mm]
$q_{\rm tot}$ & $q_+$ & $q_-$ & $\qE$\\ 
\hline
3.825 & 4.606 & 26.53 & 12.31 \\
\hline
\end{tabular}
\end{table}