\begin{table}%TA1
      \caption{Source ID and average count rates (total and in three narrow bands) 
of the discrete X-ray sources detected by 
{\it Chandra} ACIS-S in the combined 2001 June--October observation. 
The count rates are in units of $10^{-4}$ cts s$^{-1}$. Errors are $1\sigma$, with $3\sigma$ upper limits 
for sources not detected in a certain band.}
         \label{tabA1}
         %\centering
\begin{tabular}{lrrrr}
            \hline
            \hline
            \noalign{\smallskip}
           {{\rm IAU~Name}}  
%                 & 10^4 \times{{\rm ct~rate}}^{{\rm a}}
		 & ~~{{\rm Count}}~{{\rm rate}}
		 & ~~{{\rm Count}}~{{\rm rate}}
		 & ~~{{\rm Count}}~{{\rm rate}}
		 & ~~{{\rm Count}}~{{\rm rate}}\\
%            \noalign{\smallskip}
%                 & 10^4 \times{{\rm ct~rate}}^{{\rm a}}
		 & ~~(0.3{--}8)~{{\rm keV}}
		 & ~~(0.3{--}1)~{{\rm keV}}
		 & ~~~(1{--}2)~{{\rm keV}}
		 & ~~(2{--}8)~{{\rm keV}}\\
            \noalign{\smallskip}
            \hline
            \noalign{\smallskip}
%\footnotesize{
{{\rm CXOU~J013623.5}}+{{\rm 154458}}~~	&  	5.7 $\pm$  1.2 	&  0.8 $\pm$ 0.4 & 	2.3 $\pm$ 0.7 &	1.8 $\pm$ 0.6 \\
{{\rm CXOU~J013623.6}}+{{\rm 154309}}~~ 	&	8.5 $\pm$ 1.5 &	1.3 $\pm$ 0.4 &	4.0 $\pm$ 1.0 & 	3.4 $\pm$ 0.9 \\
{{\rm CXOU~J013625.1}}+{{\rm 154859}}~~	&      17.9 $\pm$ 1.4 &     2.9 $\pm$ 0.6 &     10.1 $\pm$ 1.1 &  	4.7 $\pm$ 0.7 \\
{{\rm CXOU~J013626.6}}+{{\rm 154458}}~~	&      1.9 $\pm$ 0.5 &    	0.6 $\pm$ 0.1 &    	0.7 $\pm$ 0.3 &	0.5 $\pm$ 0.2 \\
{{\rm CXOU~J013626.7}}+{{\rm 154304}}~~	&      5.6 $\pm$ 1.2 & 	0.1 $\pm$ 0.1 &	2.2 $\pm$ 0.7 &	3.2 $\pm$ 0.9 \\
{{\rm CXOU~J013627.8}}+{{\rm 154752}}~~	&      33.4 $\pm$ 1.9 &     12.1 $\pm$ 1.2 &     12.6 $\pm$ 1.2 &   8.7 $\pm$ 1.0 \\
{{\rm CXOU~J013628.7}}+{{\rm 154859}}~~	&      1.7 $\pm$ 0.5 &    	0.1 $\pm$ 0.1 &    	0.1 $\pm$ 0.1 &     1.1 $\pm$ 0.4 \\
{{\rm CXOU~J013629.0}}+{{\rm 154319}}~~	&      1.2 $\pm$ 0.4 &	0.2 $\pm$ 0.1 &    	0.5 $\pm$ 0.2 &    	0.5 $\pm$ 0.2 \\
{{\rm CXOU~J013629.5}}+{{\rm 154656}}~~	&      4.3 $\pm$ 0.7 &	$<$0.1 &   	$<$0.1 &     	4.3 $\pm$ 0.7 \\
{{\rm CXOU~J013630.0}}+{{\rm 154855}}~~	&      3.2 $\pm$ 0.6 &     	2.5 $\pm$ 0.5 &    	0.6 $\pm$ 0.2 &   	$<$0.1 \\
{{\rm CXOU~J013630.1}}+{{\rm 154520}}~~	&      8.5 $\pm$ 1.0 &    	0.2 $\pm$ 0.1 &     4.7 $\pm$ 0.7 &     3.7 $\pm$ 0.7 \\
{{\rm CXOU~J013630.4}}+{{\rm 154519}}~~	&      9.4 $\pm$ 1.1 &     	2.7 $\pm$ 0.6 &     3.9 $\pm$ 0.7 &     2.9 $\pm$ 0.6 \\
{{\rm CXOU~J013631.1}}+{{\rm 154458}}~~	&      4.5 $\pm$ 0.8 &   	$<$0.1 &     	1.9 $\pm$ 0.5 &     2.2 $\pm$ 0.5 \\
{{\rm CXOU~J013631.7}}+{{\rm 154848}}~~	&      15.2 $\pm$ 1.3 &     3.4 $\pm$ 0.6 &     8.3 $\pm$ 1.0 &     3.4 $\pm$ 0.6 \\
$^{a}${{\rm CXOU~J013631.9}}+{{\rm 154507}}~~&      12.2 $\pm$ 1.2 &   	10.1 $\pm$ 1.1 &   	1.9 $\pm$ 0.5 &    	0.2 $\pm$ 0.1 \\
{{\rm CXOU~J013635.2}}+{{\rm 154657}}~~	&      3.1 $\pm$ 0.6 &	0.2 $\pm$ 0.1 &     1.1 $\pm$ 0.4 &     1.8 $\pm$ 0.5 \\
{{\rm CXOU~J013635.3}}+{{\rm 154711}}~~	&      4.0 $\pm$ 0.7 &     	1.6 $\pm$ 0.4 &     1.9 $\pm$ 0.5 &    	0.3 $\pm$ 0.2 \\
{{\rm CXOU~J013635.3}}+{{\rm 154227}}~~	&      2.2 $\pm$ 0.6 &   	$<$0.1 &    	0.5 $\pm$ 0.2 &     1.7 $\pm$ 0.5 \\
{{\rm CXOU~J013635.4}}+{{\rm 154953}}~~	&      1.7 $\pm$ 0.5 &    	0.4 $\pm$ 0.2 &    	0.3 $\pm$ 0.1 &    	1.0 $\pm$ 0.3 \\
{{\rm CXOU~J013635.7}}+{{\rm 154556}}~~	&      7.4 $\pm$ 0.9 &     	2.2 $\pm$ 0.5 &     2.9 $\pm$ 0.6 &     2.2 $\pm$ 0.5 \\
{{\rm CXOU~J013637.5}}+{{\rm 155030}}~~	&      1.3 $\pm$ 0.4 &  	$<$0.1 &    	0.8 $\pm$ 0.3 &    	0.5 $\pm$ 0.2 \\
{{\rm CXOU~J013637.6}}+{{\rm 154717}}~~	&      4.6 $\pm$ 0.7 &     	1.9 $\pm$ 0.5 &     1.9 $\pm$ 0.5 &    	0.7 $\pm$ 0.3 \\
{{\rm CXOU~J013637.7}}+{{\rm 154740}}~~	&      9.0 $\pm$ 1.0 &     	2.7 $\pm$ 0.6 &     3.4 $\pm$ 0.6 &     2.9 $\pm$ 0.6 \\
{{\rm CXOU~J013637.9}}+{{\rm 154749}}~~	&      2.1 $\pm$ 0.5 &    	0.6 $\pm$ 0.2 &     1.0 $\pm$ 0.4 &    	0.3 $\pm$ 0.2 \\
{{\rm CXOU~J013638.8}}+{{\rm 154404}}~~	&      1.3 $\pm$ 0.4 &     	1.1 $\pm$ 0.4 &   	$<$0.2 & 		$<$0.2  \\  
{{\rm CXOU~J013639.0}}+{{\rm 154755}}~~	&      5.7 $\pm$ 0.8 &     	2.0 $\pm$ 0.5 &     2.1 $\pm$ 0.5 &     1.7 $\pm$ 0.4 \\
{{\rm CXOU~J013639.1}}+{{\rm 154309}}~~	&      35.6 $\pm$ 2.1 &     11.0 $\pm$ 1.2 &    16.9 $\pm$ 1.4 &   	7.4 $\pm$ 1.0 \\
{{\rm CXOU~J013639.2}}+{{\rm 154600}}~~	&      3.0 $\pm$ 0.6 &     	1.5 $\pm$ 0.4 &    	1.0 $\pm$ 0.3 &    	0.1 $\pm$ 0.1 \\
{{\rm CXOU~J013639.3}}+{{\rm 154744}}~~	&      10.2 $\pm$ 1.1 &   	$<$0.1 &     	2.3 $\pm$ 0.5 &     8.1 $\pm$ 0.9 \\
{{\rm CXOU~J013639.4}}+{{\rm 154905}}~~	&      3.3 $\pm$ 0.6 &     	2.0 $\pm$ 0.5 &    	0.9 $\pm$ 0.3 &    	0.3 $\pm$ 0.2 \\
{{\rm CXOU~J013639.6}}+{{\rm 154830}}~~	&      2.4 $\pm$ 0.6 &     	1.6 $\pm$ 0.4 &    	0.5 $\pm$ 0.2 &    	0.1 $\pm$ 0.1 \\
{{\rm CXOU~J013639.6}}+{{\rm 154749}}~~	&      1.2 $\pm$ 0.4 &     	1.0 $\pm$ 0.4 &    	0.1 $\pm$ 0.1 &   	$<$0.1 \\
{{\rm CXOU~J013640.0}}+{{\rm 154625}}~~	&      4.1 $\pm$ 0.7 &     	2.5 $\pm$ 0.5 &     1.4 $\pm$ 0.4 &   	$<$0.1 \\
{{\rm CXOU~J013640.3}}+{{\rm 154735}}~~	&      1.4 $\pm$ 0.4 &     	1.2 $\pm$ 0.4 &   	$<$0.1 &   	$<$0.1 \\
{{\rm CXOU~J013640.5}}+{{\rm 154928}}~~	&      6.9 $\pm$ 0.9 &    	0.9 $\pm$ 0.3 &     3.1 $\pm$ 0.6 &     2.8 $\pm$ 0.6 \\
{{\rm CXOU~J013640.6}}+{{\rm 154713}}~~	&      7.0 $\pm$ 0.9 &     	2.5 $\pm$ 0.5 &     2.2 $\pm$ 0.5 &     2.2 $\pm$ 0.5 \\
{{\rm CXOU~J013640.6}}+{{\rm 154647}}~~	&      4.0 $\pm$ 0.7 &     	1.0 $\pm$ 0.4 &     1.7 $\pm$ 0.4 &     1.2 $\pm$ 0.4 \\
{{\rm CXOU~J013641.0}}+{{\rm 154705}}~~	&      1.7 $\pm$ 0.5 &    	0.4 $\pm$ 0.2 &    	0.6 $\pm$ 0.2 &    	0.4 $\pm$ 0.2 \\
{{\rm CXOU~J013641.3}}+{{\rm 154650}}~~	&      1.0 $\pm$ 0.4 &    	0.3 $\pm$ 0.1 &    	0.4 $\pm$ 0.2 &    	0.2 $\pm$ 0.1 \\
{{\rm CXOU~J013641.6}}+{{\rm 155117}}~~	&      2.0 $\pm$ 0.5 &  	$<$0.1 &    	0.1 $\pm$ 0.1 &       1.8 $\pm$ 0.5 \\
{{\rm CXOU~J013641.6}}+{{\rm 154552}}~~	&      32.9 $\pm$ 1.9 &     7.9 $\pm$ 0.9 &     14.5 $\pm$ 1.3 &  	10.5 $\pm$ 1.1 \\
%
$^b${{\rm CXOU~J013641.7}}+{{\rm 154701}}~~	&      18.7 $\pm$ 1.5 &     6.7 $\pm$ 0.9 &     7.3 $\pm$ 0.9 &     4.8 $\pm$ 0.7 \\
{{\rm CXOU~J013641.9}}+{{\rm 154721}}~~	&      1.1 $\pm$ 0.4 &     	1.2 $\pm$ 0.4 &  	$<$0.1 &  	$<$0.1 \\
{{\rm CXOU~J013642.0}}+{{\rm 154430}}~~	&      1.3 $\pm$ 0.4 &     	1.2 $\pm$ 0.4 &    	0.1 $\pm$ 0.1 &    	0.1 $\pm$ 0.1 \\
{{\rm CXOU~J013642.0}}+{{\rm 154857}}~~	&      2.9 $\pm$ 0.6 &    	0.6 $\pm$ 0.3 &     1.3 $\pm$ 0.4 &    	0.8 $\pm$ 0.3 \\
{{\rm CXOU~J013642.4}}+{{\rm 154701}}~~	&      2.2 $\pm$ 0.5 &     	1.6 $\pm$ 0.4 &    	0.3 $\pm$ 0.1 &    	0.1 $\pm$ 0.1 \\
{{\rm CXOU~J013643.2}}+{{\rm 154709}}~~	&      5.1 $\pm$ 0.8 &    	0.6 $\pm$ 0.2 &     2.0 $\pm$ 0.5 &     2.3 $\pm$ 0.5 \\
{{\rm CXOU~J013643.6}}+{{\rm 154742}}~~	&      4.5 $\pm$ 0.7 &     	1.0 $\pm$ 0.3 &     1.8 $\pm$ 0.4 &     1.0 $\pm$ 0.4 \\
{{\rm CXOU~J013643.8}}+{{\rm 154357}}~~	&      5.4 $\pm$ 0.8 &    	1.0 $\pm$ 0.3 &     2.4 $\pm$ 0.5 &     1.8 $\pm$ 0.5 \\        
{{\rm CXOU~J013643.8}}+{{\rm 155022}}~~	&      4.1 $\pm$ 0.7 &    	0.9 $\pm$ 0.3 &     1.8 $\pm$ 0.5 &     1.5 $\pm$ 0.4 \\
{{\rm CXOU~J013644.0}}+{{\rm 154908}}~~	&      2.7 $\pm$ 0.6 &    	0.4 $\pm$ 0.2 &     1.3 $\pm$ 0.4 &    	0.9 $\pm$ 0.3 \\
{{\rm CXOU~J013644.1}}+{{\rm 154818}}~~	&      31.1 $\pm$ 1.9 &     5.3 $\pm$ 0.8 &     16.5 $\pm$ 1.3 &     9.4 $\pm$ 1.0 \\
{{\rm CXOU~J013644.3}}+{{\rm 154629}}~~	&      4.0 $\pm$ 0.7 &     	3.2 $\pm$ 0.6 &    	0.5 $\pm$ 0.2 &    	0.3 $\pm$ 0.2 \\
{{\rm CXOU~J013644.6}}+{{\rm 154848}}~~	&      1.4 $\pm$ 0.5 &     	1.1 $\pm$ 0.4 &   	0.1 $\pm$ 0.1 &    	0.1 $\pm$ 0.1 \\
{{\rm CXOU~J013644.9}}+{{\rm 154546}}~~	&      5.6 $\pm$ 0.9 &     	1.7 $\pm$ 0.4 &     1.4 $\pm$ 0.4 &     2.0 $\pm$ 0.5 \\
{{\rm CXOU~J013645.1}}+{{\rm 154837}}~~	&      1.4 $\pm$ 0.4 &    	0.1 $\pm$ 0.1 &    	0.5 $\pm$ 0.2 &    	0.8 $\pm$ 0.2 \\
{{\rm CXOU~J013645.2}}+{{\rm 154747}}~~	&      3.7 $\pm$ 0.7 &     	1.5 $\pm$ 0.4 &     1.3 $\pm$ 0.4 &    	0.2 $\pm$ 0.2 \\
{{\rm CXOU~J013645.3}}+{{\rm 154910}}~~	&      2.7 $\pm$ 0.6 &    	0.5 $\pm$ 0.2 &     1.1 $\pm$ 0.4 &     1.0 $\pm$ 0.4 \\
{{\rm CXOU~J013646.0}}+{{\rm 154422}}~~	&      11.0 $\pm$ 1.2 &     1.9 $\pm$ 0.5 &     5.8 $\pm$ 0.8 &     3.1 $\pm$ 0.6 \\
{{\rm CXOU~J013646.1}}+{{\rm 154842}}~~	&      3.1 $\pm$ 0.6 &     	3.0 $\pm$ 0.6 &    	0.1 $\pm$ 0.1 &   	$<$0.1 \\
{{\rm CXOU~J013646.6}}+{{\rm 154611}}~~	&     0.7 $\pm$ 0.3 &    	0.7 $\pm$ 0.3 &   	$<$0.1 &		$<$0.1 \\
$^c${{\rm CXOU~J013647.4}}+{{\rm 154745}}~~	&      35.7 $\pm$ 2.0 &     28.5 $\pm$ 1.8 &     5.9 $\pm$ 0.8 &    0.8 $\pm$ 0.2 \\
{{\rm CXOU~J013648.0}}+{{\rm 154445}}~~	&      1.8 $\pm$ 0.5 &    	0.3 $\pm$ 0.2 &     1.3 $\pm$ 0.4 &    	0.2 $\pm$ 0.1 \\
{{\rm CXOU~J013648.8}}+{{\rm 154653}}~~	&      3.9 $\pm$ 0.7 &    	0.7 $\pm$ 0.3 &     1.6 $\pm$ 0.4 &     1.5 $\pm$ 0.4 \\
{{\rm CXOU~J013649.1}}+{{\rm 154527}}~~	&      5.2 $\pm$ 0.8 &    	0.1 $\pm$ 0.1 &    	0.9 $\pm$ 0.3 &     3.8 $\pm$ 0.7 \\
{{\rm CXOU~J013650.0}}+{{\rm 154931}}~~	&      7.0 $\pm$ 0.9 &     	1.2 $\pm$ 0.4 &     2.2 $\pm$ 0.5 &     2.8 $\pm$ 0.6 \\
{{\rm CXOU~J013650.2}}+{{\rm 154915}}~~	&      9.6 $\pm$ 1.1 &     	2.7 $\pm$ 0.6 &     3.9 $\pm$ 0.7 &     2.1 $\pm$ 0.5 \\
{{\rm CXOU~J013650.3}}+{{\rm 155117}}~~	&      1.3 $\pm$ 0.4 &   	$<$0.1 &	    	0.6 $\pm$ 0.2 &    	0.6 $\pm$ 0.2 \\
{{\rm CXOU~J013651.1}}+{{\rm 154547}}~~	&      131.2 $\pm$ 3.9 &    60.5 $\pm$ 2.6 &    48.0 $\pm$ 2.3 &    23.3 $\pm$ 1.7 \\
{{\rm CXOU~J013651.2}}+{{\rm 154339}}~~	&      13.5 $\pm$ 1.4 &     2.9 $\pm$ 0.6 &     8.1 $\pm$ 0.9 &     1.9 $\pm$ 0.5 \\
{{\rm CXOU~J013651.8}}+{{\rm 155135}}~~	&      2.4 $\pm$ 0.6 &    	0.6 $\pm$ 0.3 &    	0.7 $\pm$ 0.3 &    	0.8 $\pm$ 0.4 \\
{{\rm CXOU~J013652.3}}+{{\rm 154737}}~~	&      9.4 $\pm$ 1.1 &     	2.6 $\pm$ 0.6 &     4.3 $\pm$ 0.7 &     2.4 $\pm$ 0.6 \\
{{\rm CXOU~J013653.0}}+{{\rm 155008}}~~	&      6.2 $\pm$ 0.9 &     	1.3 $\pm$ 0.4 &     3.2 $\pm$ 0.6 &     1.1 $\pm$ 0.4 \\
{{\rm CXOU~J013653.0}}+{{\rm 154510}}~~	&      1.7 $\pm$ 0.5 &    	0.1 $\pm$ 0.1 &     0.6 $\pm$ 0.3 &    	0.8 $\pm$ 0.3 \\
{{\rm CXOU~J013653.8}}+{{\rm 154537}}~~	&      1.4 $\pm$ 0.5 &   	$<$0.1 &	         0.1 $\pm$ 0.1 &	1.3 $\pm$ 0.4 \\
{{\rm CXOU~J013654.4}}+{{\rm 154539}}~~	&     1.4 $\pm$ 0.5 &    	0.4 $\pm$ 0.2 &    	0.5 $\pm$ 0.3 &    	0.3 $\pm$ 0.2 \\
{{\rm CXOU~J013659.3}}+{{\rm 154631}}~~	&      5.6 $\pm$ 0.9 &    	0.4 $\pm$ 0.2 &     1.4 $\pm$ 0.4 &     4.2 $\pm$ 0.7 \\
           \hline
\end{tabular}	   
$^a$  ~\mbox{Foreground star}. \\
$ ^b$  ~\mbox{Nucleus of M~74}.\\ 	   
$^c$ ~\mbox{Foreground star}.         
 \end{table}