\begin{table}%T4
\caption{{\small XSPEC} best-fit parameters 
   for CXOU~J13651.1$+$154547 in 2003 January, 
	from the combined \xmm\ EPIC dataset. 
	$n_{\rm {H,~Gal}} \equiv 0.5 \times 10^{21}$~cm$^{-2}$ as in Table~\ref{tab3}.}
\label{tab4} 
%\centering
\par
\begin{tabular}{lr} 
\hline
\hline 
   \noalign{\smallskip}
\multicolumn{2}{c}{model: wabs$_{\rm Gal}$ $\times$ wabs $\times$ power-law  }\\[5pt]  
\hline \\ 
%parameter &   \\  [5pt] 
%\hline \\
$n_{\rm H}~(\times 10^{21}$~cm$^{-2})$  & $\rm 1.2^{+0.9}_{-0.8}$   \\[5pt] 
$\Gamma$       & $\rm 2.46^{+0.47}_{-0.41}$ \\[5pt]
$K_{\rm pl}~(\times 10^{-5})$    & $\rm 2.5^{+1.1}_{-0.7}$ \\[5pt]   
\hline \\ 
$\chi_\nu^2$~(d.o.f.) &  1.16~(18)  \\[5pt] 
$L_{\rm{0.3-12}}~(\times 10^{38}$~erg~s$^{-1})$ & $\rm 8.0^{+2.8}_{-3.8}$  \\[5pt]
\hline 
\hline
\multicolumn{2}{c}{model: wabs$_{\rm Gal}$ $\times$ wabs $\times$ bmc  }\\[5pt]  
\hline 
$n_{\rm H}~(\times 10^{21}$~cm$^{-2})$  & $\rm 1.2^{+4.3}_{-1.2}$   \\[5pt] 
$T_{\rm bb}$~(keV) & $\rm 0.13^{+0.13}_{-0.13}$ \\[5pt] 
$\Gamma$       & $\rm 2.22^{+0.82}_{-1.22}$ \\[5pt]
$K_{\rm bmc}~(\times 10^{-7})$    & $\rm 9.2^{+5.0}_{-5.0}$ \\ [5pt]   
\hline 
$\chi_\nu^2$~(d.o.f.) &  1.25~(16)  \\ [5pt] 
$L_{\rm{0.3-12}}~(\times 10^{38}$~erg~s$^{-1})$ & $\rm 7.7^{+1.2}_{-3.0}$  \\[5pt]
\hline 
\end{tabular}
\end{table}