\begin{table}%T3
\caption{
   {\small XSPEC} best-fit parameters 
   for the X-ray spectrum of XMMU J013636.5$+$155036 
	in 2002 February, 
	from the combined \xmm\ EPIC dataset. The foreground 
	line-of-sight absorption column density 
	$n_{\rm {H,~Gal}}$ has been fixed at $0.5 \times 10^{21}$~cm$^{-2}$. 
	See {\tt http://heasarc.gsfc.nasa.gov/docs/xanadu/xspec}  
	for a full description of the XSPEC spectral models.}
	\label{tab3}
%\centering
\par
\begin{tabular}{lr} 
\hline
\hline 
   \noalign{\smallskip}
\multicolumn{2}{c}{model: wabs$_{\rm Gal}$ $\times$ wabs $\times$ power-law  }\\[5pt]  
\hline 
%parameter &   \\  [5pt] 
%\hline \\
$n_{\rm H}~(\times 10^{21}$~cm$^{-2})$  & $\rm 1.3^{+0.6}_{-0.5}$   \\[5pt] 
$\Gamma$       & $\rm 1.91^{+0.21}_{-0.17}$ \\[5pt]
$K_{\rm pl}~(\times 10^{-5})$    & $\rm 4.0^{+0.9}_{-0.7}$ \\ [5pt]   
\hline 
$\chi_\nu^2$~(d.o.f.) &  0.86~(36)  \\ [5pt] 
$L_{\rm{0.3-12}}~(\times 10^{39}$~erg~s$^{-1})$ & $\rm 1.6^{+0.1}_{-0.3}$  \\[5pt]
\hline 
\end{tabular} 
\end{table}