\begin{table}%T1
\caption{\xmm\ count rates for SN~2002ap on 2002 February 2, in units 
of $10^{-4}$ cts s$^{-1}$. 
The rates have been corrected for the telescope vignetting 
and the finite size of the extraction region. The values listed here are the averages 
of the results obtained with the three measurements described in Sect.~2.2.}
\label{tab1} 
%\centering
\par
         \begin{tabular}[width=textwidth]{lcccc}
            \hline
            \hline
            \noalign{\smallskip}
	Instrument & Count rate & Count rate & Count rate & Count rate \\
        & ($0.3$--$12.0$)~keV & ($0.3$--$1$)~keV & ($1$--$2$)~keV & ($2$--$12$)~keV\\
            \noalign{\smallskip}
            \hline
            \noalign{\smallskip} 
EPIC pn & $27.8\pm3.4$ & $19.5\pm2.6$ & $8.2\pm1.6$ & $0.3\pm2.0$ \\
EPIC MOS1 & $7.5\pm1.8$  & & & \\
EPIC MOS2 & $7.6\pm1.9$  & & & \\[3pt]
            \hline
         \end{tabular}
   \end{table}