\begin{table}%[!ht]%T1
%\centering
\par
\caption{\label{obs}Observation log of EQ~Peg.}
{%\scriptsize
\begin{tabular}{lcc}\hline\hline
 Instrument (Mode) & Duration (s) & Obs-time\\
 MOS (FF, thick F.) & 14~600 & 2000-07-09T11:39:13-15:42:32 \\
 PN  (FF, thick F.) & 12~410 & 2000-07-09T12:20:16-15:47:05 \\\hline
\end{tabular}
}
\end{table}