\begin{table}%T2
\par
\caption{Peak count rates of the 12 observed type I
X-ray bursts in the soft (0.3--2 keV) and hard (2--10 keV) X-ray
bands, together with their hard/soft ratio.  Indicated is whether the
bursts occurred during intervals of reduced dipping or full dipping
(corresponding to the lowest count rates in the soft band, and, as
opposed to reduced dips, sometimes also visible as dips in the hard
band). For bursts I, II, and VII this was not completely clear. See
Fig.~\ref{fig:curves} for the labeling (I--XII) of the
bursts.}\label{tab:burst} 
%\centerline
{
\begin{tabular}{lllll}
\hline
\hline
Burst & Pers.$^a$ & Soft peak & Hard peak & Ratio \\
\hline
I    & R(?) & 9.8 $\pm$ 1.4  & 19.8 $\pm$ 2.0	& 2.0 $\pm$ 0.4 \\
II   & R(?) & 8.8 $\pm$ 1.3  & 18.4 $\pm$ 1.9	& 2.1 $\pm$ 0.4 \\
III  & F & 8.4 $\pm$ 1.3     & 42.0 $\pm$ 2.9	& 5.0 $\pm$ 0.8 \\
IV   & R & 20.6 $\pm$ 2.0    & 43.0 $\pm$ 2.9	& 2.1 $\pm$ 0.3 \\
V    & F & 5.0 $\pm$ 1.0     & 38.0 $\pm$ 2.8 	& 7.6 $\pm$ 1.6 \\
VI   & F & 8.6 $\pm$ 1.3     & 104 $\pm$ 5  	& 12.1 $\pm$ 1.9 \\
VII  & R(?) & 87.4 $\pm$ 4.2 & 162 $\pm$ 6	        & 1.9 $\pm$ 0.1  \\
VIII & R & 56.0 $\pm$ 3.3    & 99.4 $\pm$ 4.5	& 1.8 $\pm$ 0.1 \\
IX   & F & 8.0 $\pm$ 1.3     & 27.0 $\pm$ 2.3	& 3.4 $\pm$ 0.6 \\
X    & F & 1.8 $\pm$ 0.6     & 12.4 $\pm$ 1.6  	& 6.9 $\pm$ 2.5 \\
XI   & R & 10.8 $\pm$ 0.5    & 24.4 $\pm$ 2.2   	& 2.3 $\pm$ 0.2 \\
XII  & R & 15.0 $\pm$ 1.7    & 30.4 $\pm$ 2.5   	& 2.0 $\pm$ 0.3 \\
\hline
\end{tabular}}
\par
\medskip
$^a$ Type of persistent emission in the soft band during
which the burst occurred; R = Reduced dipping, F = Full dipping.
\end{table}