\begin{table}%t4
\caption{\label{tab:col4}Broadband colors in stellar magnitudes for pure iron atmospheres.
Models are computed with nonideal EOS and Los~Alamos (TOPS) opacities.
Units of $\te$ and $\log g$ are the same as in Table~\ref{tab:col1}. }
%\centering
\par
\begin{tabular}{cccccrc}
    \hline \hline
$Z$ &  $\te$ & $\log g$ &  $U-B$ & $B-V$ & $V-R$ & $V-I$ \\
\hline 
26 &  20 &  7 & $-$1.330 &   $-$0.284   &  0.097 &  $-$0.063 \\
26 &  20 &  8 & $-$1.188 &   $-$0.191   &  0.011 &  $-$0.133 \\
26 &  20 &  9 & $-$1.110 &   $-$0.111   & $-$0.047 &  $-$0.185 \\
26 &  20 & 10 & $-$1.094 &   $-$0.088   & $-$0.040 &  $-$0.191 \\[5pt]
26 &  30 &  7 & $-$1.432 &   $-$0.225   & $-$0.083 &  $-$0.287 \\
26 &  30 &  8 & $-$1.432 &   $-$0.214   & $-$0.108 &  $-$0.278 \\
26 &  30 &  9 & $-$1.418 &   $-$0.214   & $-$0.137 &  $-$0.284 \\
26 &  30 & 10 & $-$1.377 &   $-$0.231   & $-$0.139 &  $-$0.279 \\[5pt]
26 &  50 &  7 & $-$1.360 &   $-$0.363   & $-$0.177 &  $-$0.432 \\ 
26 &  50 &  8 & $-$1.376 &   $-$0.313   & $-$0.194 &  $-$0.467 \\
26 &  50 &  9 & $-$1.431 &   $-$0.256   & $-$0.202 &  $-$0.459 \\
26 &  50 & 10 & $-$1.440 &   $-$0.235   & $-$0.188 &  $-$0.418 \\[5pt]
26 &  70 &  7 & $-$1.322 &   $-$0.387   & $-$0.174 &  $-$0.420 \\
26 &  70 &  8 & $-$1.311 &   $-$0.396   & $-$0.188 &  $-$0.443 \\
26 &  70 &  9 & $-$1.303 &   $-$0.379   & $-$0.193 &  $-$0.459 \\
26 &  70 & 10 & $-$1.313 &   $-$0.340   & $-$0.197 &  $-$0.467 \\[5pt]
26 &  100&  7 & $-$1.323 &   $-$0.376   & $-$0.168 &  $-$0.423 \\
26 &  100&  8 & $-$1.315 &   $-$0.358   & $-$0.133 &  $-$0.321 \\
26 &  100&  9 & $-$1.327 &   $-$0.419   & $-$0.187 &  $-$0.442 \\
26 &  100& 10 & $-$1.321 &   $-$0.425   & $-$0.195 &  $-$0.461 \\
\hline
\end{tabular}
\end{table}