\begin{table}%t1
%\centering
\par
\caption{Coefficients for the homogenization of diameters and axis ratios.}
\begin{tabular}{rrrrrrrrrrr}
\hline\hline
Ref.    &$b \pm m.e.$     &$b \pm m.e.$     &$b \pm m.e.$     &S.D.  & c&$a \pm m.e.$     &$a \pm m.e.$     &$a \pm m.e.$     &S.D.  &c\\
         &any type      &  Spiral           &  Elliptical   &   &   &any type      &  Spiral    &  Elliptical     &         &       \\
\hline
 27078B&$  0.05\pm  0.00$&$  0.05\pm  0.00$&$  0.05\pm  0.00$&  0.05&ns&$  1.01\pm  0.00$&$  1.00\pm  0.00$&$  1.01\pm  0.01$&  0.04&ns\\
 27081B&$  0.01\pm  0.00$&$  0.01\pm  0.00$&$  0.03\pm  0.00$&  0.06& s&$  1.00\pm  0.00$&$  0.99\pm  0.00$&$  1.01\pm  0.01$&  0.05&ns\\
 29001B&$  0.02\pm  0.00$&$  0.01\pm  0.00$&$  0.05\pm  0.00$&  0.07& s&$  1.07\pm  0.00$&$  1.04\pm  0.01$&$  1.25\pm  0.01$&  0.10& s\\
  2000B&$  0.05\pm  0.00$&$  0.04\pm  0.00$&$  0.18\pm  0.00$&  0.12& s&$  0.99\pm  0.00$&$  0.96\pm  0.00$&$  1.15\pm  0.01$&  0.08& s\\
  1000R&$ -0.04\pm  0.00$&$ -0.04\pm  0.00$&$       -       $&  0.09& s&$  0.98\pm  0.00$&$  0.97\pm  0.00$&$  1.12\pm  0.01$&  0.10& s\\
 27026B&$  0.05\pm  0.00$&$  0.04\pm  0.00$&$  0.16\pm  0.01$&  0.11& s&$  0.85\pm  0.01$&$  0.83\pm  0.01$&$  1.00\pm  0.06$&  0.09& s\\
  3000B&$ -0.06\pm  0.00$&$ -0.07\pm  0.00$&$ -0.02\pm  0.00$&  0.08& s&$  0.98\pm  0.00$&$  0.97\pm  0.00$&$  0.91\pm  0.01$&  0.10& s\\
 33004I&$  0.01\pm  0.00$&$  0.02\pm  0.00$&$  0.01\pm  0.00$&  0.10& s&$  1.04\pm  0.01$&$  1.05\pm  0.01$&$  1.04\pm  0.01$&  0.09&ns\\
 ...   &   ...           &   ...           &   ...           &  ...    &   ...           &   ...           &   ...           &  ... &  \\
 ...   &   ...           &   ...           &   ...           &  ...    &   ...           &   ...           &   ...           &  ... &  \\
 ...   &   ...           &   ...           &   ...           &  ...    &   ...           &   ...           &   ...           &  ... &  \\
\hline
\end{tabular}
\label{tablD}
\end{table}